mips

Open RISC Technology

Real-Time OS Suppliers Accelerated Technologies,Inc.

JMI Software Systems, Inc.

KADAK

Lynx Real-Time Systems, Inc.

Wind River Systems, Inc.

Real-Time Operating Systems

mips

Open RISC Technology

Accelerated Technologies, Inc.

Nucleus

Features:

Full Source code Available, Designed for Embedded Applications Standard No Royalty Licensing No Restrictions on the number of Workstations Nucleus Products can be purchased individually Ported to Major MIPS^{TM} Products All Development Environments supported

Includes:

Nucleus RTX - Basic Real-Time Kernel Nucleus PLUS - Full Featured Real-Time Kernel Nucleus NET - TCP/IP Networking Protocols Nucleus FILE - MS-DOS Compatible File System Nucleus DBUG - Multi-Tasking Debugger Nucleus LWT - SUN Solaris I & II Development Environment Nucleus PC - PC Development Environment

Contact:

James E. Little II or Sales Department P.O. Box 850245, Mobile, AL 36685 (205) 661-5770 or (800) 468-NUKE FAX (205) 661-5788

MIPS is a registered trademark of MIPS Technologies, Inc.

Real-Time Operating Systems

Nucleus mips

Open RISC Technology

JMI Software Systems, Inc.

C Executive®

Features:

Real-Time Kernel implemented as C function calls C language Device Drivers Optimized for C language applications Standard I/O and redirection Highly portable R3000®, R4000® - 32 bit Mode Support Available for MIPS® ANSI C, Green Hills C, IDT C

Includes:

CD-DOSFILE^{TM}, DOS compatible file system CE-VIEW^{TM}, System level debugger/analyzer CE-TCP^{TM}, TCP/IP communications

Contact:

JMI Software Systems, Inc. P.O Box 481, 904 Sheble Lane, Spring House, PA 19477 (215) 628-0840 (215) 628-0353 FAX

MIPS, R3000 and R4000 are registered trademarks of MIPS Technologies, Inc. C EXECUTIVE is a registered trademark of JMI Software Systems, Inc. CE-DOSFILE, CE-VIEW, and CE-TCP are trademarks of JMI Software Systems, Inc.

Real-Time Operating Systems

C Executive mips

Open RISC Technology

KADAK Products Ltd.

AMX 3000

Features:

Full-featured, compact, ROMable kernel Fast interrupt response Preemptive, priority scheduling, Optional Time-Slicing Separate message, semaphore, synchronization, allocation, list manipulation, and memory managers.

Configuration Builder utility to ease system construction InSight Debugger views system internals and gathers execution statistics No binary royalties, Source Code included One price for all applications

Contact:

Douglas Seymour 206-1847 West Broadway, Vancouver, BC, Canada, V6J 1Y5 (604) 734-2796

Real-Time Operating Systems

AMX 3000 mips

Open RISC Technology

Real-Time Operating Systems

LynxOS

Lynx Real-Time Systems, Inc.

LynxOS

Features:

Fast, predictable real-time Performance Compact, ROMable kernel Application Programming Interfaces to UNIX System V.3, BSD 4.3, and POSIX allow developers to easily port POSIX and UNIX software to LynxOS True multi-process OS - provides memory protection between processes while allowing multiple threads per process Implements POSIX.4 (real-time extensions) and POSIX.4a (threads extensions)

Includes/Options:

Operating system source code with development tools Optional TCP/IP, NFS, STREAMS, X Window System, Motif

Contact:

Lynx Real-Time Systems 16780 Lark Avenue, Los Gatos, CA 95030 (408) 354-7770, (408) 354-7085 FAX, email: sales@lynx.com

mips

Open RISC Technology

Real-Time Operating Systems

VxWorks

Wind River Systems, Inc.

VxWorks®

Features:

High-performance, multitasking wind^{TM} microkernel Easily configured for execution environment Symbolic and source-level debugging Seamless environment from development to delivery

Includes:

Integrated networking facilities such as TCP/IP, sockets, NFS, & SNMP Support for industry standards including ANSI-C and POSIX Optional WindPower^{TM} Tools for enhanced developer productivity

Contact:

Lauren Hartley 1010 Atlantic Avenue, Alameda, CA, 94501 (510) 748-4100

VxWorks is a registered trademark of Wind River Systems, Inc. wind and WindPower are trademarks of Wind River Systems, Inc.