Copyright: Help<ENU> Version 1.02


Device Setup Utility
  Device Setup Utility Help

Device Setup Utility

Device Setup Utility is an application program that lets the user change the settings of the standard and optional devices.  You can change the I/O address, the IRQ number and the DMA channel number.  You can also switch the device on and off according to the device type.

Press F1 key to display how to use the help.

Contents

Device Setup Screen

Changing the I/O Address

Changing the IRQ Number

Changing the DMA Channel Number

Switching the Device On and Off

Switching the Device

Displaying the Device List

Changing the Device Setting and Quitting the Program

Canceling the Device Setting and Quitting the Program


Device Setup Screen
  Device Setup Utility Help

Device Setup Screen

This utility has two screens according to the device type.  When the number of the devices connected to the computer is one, this utility displays the <Screen 1>.  When the number of the devices is two or more, this utility displays the <Screen 2>.  You can change the device settings and display the device list in those screens.

<Screen 1>

<Screen 2>

[Device Name]

Displays the name of the current device.

[Help Guideline]

Displays the help guideline of the button or the list box selected currently.

See Also

Changing the I/O Address

Changing the IRQ Number

Changing the DMA Channel Number

Switching the Device On and Off

Switching the Device

Displaying the Device List

Changing the Device Setting and Quitting the Program

Canceling the Device Setting and Quitting the Program


Changing the I/O Address
  Device Setup Utility Help

Changing the I/O Address

Select the value in the [I/O] list box to change the I/O address of the device.  You can select one of the values in the drop-down list displayed by clicking the list box.  You cannot input the value from the keyboard.

If you can switch the device on and off, you cannot change the I/O address when the device is set to [Off].  Set the device to [On] and then change the I/O address.

See Also

Device Setup Screen

Switching the Device On and Off

Changing the Device Setting and Quitting the Program

Canceling the Device Setting and Quitting the Program


Changing the IRQ Number
  Device Setup Utility Help

Changing the IRQ Number

Select the value in the [IRQ] list box to change the IRQ number of the device.  You can select one of the values in the drop-down list displayed by clicking the list box.  You cannot input the value from the keyboard.

If you can switch the device on and off, you cannot change the IRQ number when the device is set to [Off].  Set the device to [On] and then change the IRQ number.

See Also

Device Setup Screen

Switching the Device On and Off

Changing the Device Setting and Quitting the Program

Canceling the Device Setting and Quitting the Program


Changing the DMA Channel Number
  Device Setup Utility Help

Changing the DMA Channel Number

Select the value in the [DMA] list box to change the DMA channel number of the device.  You can select one of the values in the drop-down list displayed by clicking the list box.  You cannot input the value from the keyboard.

If you can switch the device on and off, you cannot change the DMA channel number when the device is set to [Off].  Set the device to [On] and then change the DMA channel number.

See Also

Device Setup Screen

Switching the Device On and Off

Changing the Device Setting and Quitting the Program

Canceling the Device Setting and Quitting the Program


Switching the Device On and Off
  Device Setup Utility Help

Switching the Device On and Off

You can switch the device [On] and [Off] according to the device type.  Select either the [On] or the [Off] option button.

When you select the [Off] button, you cannot change the I/O address, the IRQ number and the DMA channel number settings.  Select the [On] button to change the settings.

See Also

Device Setup Screen

Changing the I/O Address

Changing the IRQ Number

Changing the DMA Channel Number

Changing the Device Setting and Quitting the Program

Canceling the Device Setting and Quitting the Program


Switching the Device
  Device Setup Utility Help

Switching the Device

Select the buttons displayed below the device name to switch another device.

Select the [image] button to display the previous device or the [image] button to display the next device.

Note: These buttons are displayed when two or more devices are connected to the computer.  When one device is connected, these buttons are not displayed.

When you switch the device, the error message may be displayed.  It indicates that the current values are used by another device.  Select [Yes] to switch the device or [No] not to switch the device.

You can display the device list to confirm the device names and the current settings.

See Also

Device Setup Screen

Displaying the Device List


Displaying the Device List
  Device Setup Utility Help

Displaying the Device List

Select the [List] button to display the list of the device names and the current settings.

Note: This button are displayed when two or more devices are connected to the computer.  When one device is connected, this button are not displayed.

If the current values are used by another device, these values are displayed in inversion.  The device names set to the [Off] are displayed in gray.

See Also

Device Setup Screen


Changing the Device Setting and Quitting the Program
  Device Setup Utility Help

Changing the Device Setting and Quitting the Program

Select the [OK] button to save the device settings and quit the program.  At this time, the program checks whether the settings are used by another device.  If the settings are used by another device, the warning message is displayed.  You can change the device settings.

You need to restart Windows or reboot the system according to the device type to make the device setting effective.

See Also

Device Setup Screen

Canceling the Device Setting and Quitting the Program


Canceling the Device Setting and Quitting the Program
  Device Setup Utility Help

Canceling the Device Setting and Quitting the Program

Select the [Cancel] button to cancel all the device settings and quit the program.

See Also

Device Setup Screen

Changing the Device Setting and Quitting the Program