NIC Diagnostics

3Com Megahertz LAN+Modem PC Card (3CCFEM556 PC Card family)

Help is not implemented for this release of the LAN+Modem card.

This file provides information that became available after the 3Com

Megahertz LAN+Modem PC Card User Guide was published.

This file is divided into the following sections:

    Windows 95 - The latest Windows 95 information.

    Windows NT - The latest Windows NT information.

    Firmware Upgrades - Information on upgrading the modem firmware.

    Novell NetWare Information - Information for Novell NetWare users.

    Problems and Solutions - Solutions to recently discovered problems.

Windows 95

==========

The information in the User's Guide for 3CCFEM556 is current; however

the user may want to refer to trouble.exe or W95NDIS3.TXT for more information.

Windows NT

==========

While the instructions in the manual will be sufficient for a majority of installations,

the customer may want to refer to WINNT.TXT for more detailed information.

Firmware Upgrades

===================

If any updated firmwares exist, they will be located at our Website (www.3Com.com).

Firmware update installation instructions will also be included.

Novell Netware Information

==========================

The information in the User's Guide for 3CCFEM556 is current.

Refer to WFWNETWR.TXT for more information on connecting to bot Novell

and Windows networks in Windows for Workgroups.

Problems and Solutions

======================

For Problems and Solutions, please refer to the TROUBLE.TXT file.