Copyright: Digital Equipment Corporation


D21x4 Family
Digital Semiconductor's 21X4 PCI Ethernet Controller Family

21040

21041

21140

21142

21143

EB40

EB41

EB140

EB142

EB143

MULTIA


Digital Semiconductor's 21040 PCI Ethernet Controller

Use this dialog box to setup the medium connection for Digital Equipment Corporation's Digital Semiconductor's 21040 based Adapter.

AutoDetect

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test

BNC (10Base2)

AUI (10Base5)


Digital Semiconductor's 21041 PCI Ethernet Controller

Use this dialog box to setup the medium connection for Digital Equipment Corporation's Digital Semiconductor's 21041 based Adapter.

AutoSense

AutoSense No_Nway

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test

BNC (10Base2)

AUI (10Base5)


Digital Semiconductor's 21140 PCI Fast Ethernet Controller

Use this dialog box to setup the medium connection for Digital Equipment Corporation's Digital Semiconductor's 21140 based Adapter.

AutoSense

AutoSense No_Nway

100BaseTx

100BaseTx Full_Duplex

100BaseT4

100BaseFx

10BaseT

10BaseT Full_Duplex


Digital Semiconductor's DC21142 PCI Ethernet Controller
Digital Semiconductor's 21142 PCI Ethernet Controller

Use this dialog box to setup the medium connection for Digital Equipment Corporation's Digital Semiconductor's 21142 based Adapter.

AutoSense

100BaseTx

100BaseTx Full_Duplex

100BaseT4

100BaseFx

10BaseT

10BaseT Full_Duplex

10BaseT No_Link_Test

10Base2 (BNC)

10Base5 (AUI)


Digital Semiconductor's DC21143 PCI Ethernet Controller
Digital Semiconductor's 21143 PCI Ethernet Controller

Use this dialog box to setup the medium connection for Digital Equipment Corporation's Digital Semiconductor's 21143 based Adapter.

AutoSense

100BaseTx

100BaseTx Full_Duplex

100BaseT4

100BaseFx

10BaseT

10BaseT Full_Duplex

10BaseT No_Link_Test

10Base2 (BNC)

10Base5 (AUI)


EB40 - Digital Semiconductor's 21040 Evaluation Board
EB40 - Digital Semiconductor's 21040's Evaluation Board

Use this dialog box to setup the medium connection for Digital Equipment Corporation's EB40 Evaluation Board.

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test


EB41 - Digital Semiconductor's 21041 Evaluation Board
EB41 - Digital Semiconductor's 21041's Evaluation Board

Use this dialog box to setup the medium connection for Digital Equipment Corporation's EB41 Evaluation Board.

AutoSense

AutoSense No_Nway

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test

BNC (10Base2)

AUI (10Base5)


EB140 - Digital Semiconductor's 21140 Evaluation Board
EB140 - Digital Semiconductor's 21140's Evaluation Board

Use this dialog box to setup the medium connection for Digital Equipment Corporation's EB140 Evaluation Board.

AutoSense

100BaseTx

100BaseTx Full_Duplex

10BaseT

10BaseT Full_Duplex


EB142 - Digital Semiconductor's 21142's Evaluation Board

Use this dialog box to setup the medium connection for Digital Equipment Corporation's EB142 Evaluation Board.

AutoSense

100BaseTx

100BaseTx Full_Duplex

100BaseT4

100BaseFx

10BaseT

10BaseT Full_Duplex

10BaseT No_Link_Test

10Base2 (BNC)


EB143 - Digital Semiconductor's 21143's Evaluation Board

Use this dialog box to setup the medium connection for Digital Equipment Corporation's EB143 Evaluation Board.

AutoSense

100BaseTx

100BaseTx Full_Duplex

100BaseT4

100BaseFx

10BaseT

10BaseT Full_Duplex

10BaseT No_Link_Test

10Base2 (BNC)


DEC multia's Ethernet Controller

Use this dialog box to setup the medium connection for Digital Equipment Corporation multia's Ethernet Controller.

AutoDetect

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test

BNC (10Base2)

AUI (10Base5)


DEC DE434 EtherWORKS Turbo PCI TP Adapter

Use this dialog box to setup the medium connection for Digital Equipment Corporation's DE434 EtherWORKS Turbo PCI TP Adapter.

AutoDetect

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test


DEC DE435 EtherWORKS Turbo PCI Adapter

Use this dialog box to setup the medium connection for Digital Equipment Corporation's DE435 EtherWORKS Turbo PCI Adapter.

AutoDetect

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test

BNC (10Base2)

AUI (10Base5)


DEC DE436 EtherWORKS Turbo PCI Quad Adapter

Use this dialog box to setup the medium connection for Digital Equipment Corporation's DE436 EtherWORKS Turbo PCI Quad Adapter.

AutoDetect

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test


DEC DE435 EtherWORKS Turbo PCI Adapter
DEC DE450 EtherWORKS Turbo PCI Adapter

Use this dialog box to setup the medium connection for Digital Equipment Corporation's DE450 EtherWORKS Turbo PCI Adapter.

AutoDetect

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test

BNC (10Base2)

AUI (10Base5)


DEC DE500 FastEtherWORKS Turbo PCI Adapter

Use this dialog box to setup the medium connection for Digital Equipment Corporation's DE500 FastEtherWORKS Turbo PCI Adapter.

AutoSense

100BaseTx

100BaseTx Full_Duplex

10BaseT

10BaseT Full_Duplex


AutoDetect
Check once the 10BaseT (TP), 10Base2 (BNC) and 10Base5 (AUI) media ports and select the first live media.

This detection takes place during driver initialization: the wire should be connected before the system boots and media  cannot be switched during run time.

AutoDectect does not check 10BaseT's Full_Duplex and No_Link_Test modes.


AutoSense
Autosense the media ports supported by the Adapter and dynamically switch to the live media.

(AutoSense does not sense 10BaseT's No_Link_Test mode.)


AutoSense - No_Nway
Autosense the media ports supported by the Adapter and dynamically switch to the live media.

Nway's negociation is disabled.

(AutoSense no_Nway does not sense 10BaseT's No_Link_Test mode.)


10BaseT
Select the 10BaseT medium connection (RJ connector).


10BaseT - Full_Duplex
Select the 10BaseT Full_Duplex medium connection (RJ connector).


10BaseT No_Link_Test
Select the 10BaseT medium connection (RJ connector) with no Link Integrity Test.

Choose this option if the Adapter is connected to a hub which does not generate link pulses to check the link integrity.


10Base2 - BNC
Select the 10Base2 medium connection (BNC connector).


10Base5 - AUI
Select the 10Base5 medium connection (AUI 15_pin connector).


100BaseTx
Select the Fast Ethernet 100BaseTx medium connection (RJ connector).


100BaseTx Full_Duplex
Select the Fast Ethernet 100BaseTx Full_Duplex medium connection (RJ connector).


100BaseT4
Select the Fast Ethernet 100BaseT4 medium connection (RJ connector).


100BaseFx
Select the Fast Ethernet 100BaseFx medium connection.