Copyright: Copyright ｩ 2003, Atheros Communications, Inc. All Rights Reserved
Citation: Copyright ｩ 2003, Atheros Communications, Inc. All Rights Reserved


現在のワイヤレス接続の周波数と最高速度を表示します。


現在選択されているプロファイルの名前を表示します。


そのステーションがワイヤレス ネットワークに接続しているかどうかを表示します。


現在の送信速度を表示します。


現在の受信速度を表示します。


接続しているネットワークがインフラストラクチャ通信かアドホック通信かを表示します。


使用しているセキュリティのモード (オフ、WEP、AES、または CKIP) を表示します。


このワイヤレス カードに対して TCP/IP が使用しているインターネット プロトコル アドレス（IPアドレス）を表示します。


設定されているプロファイルのリストを表示します。他のプロファイルに変更するには、[プロファイル] リストでプロファイル名をクリックして [アクティブ化] をクリックします。


選択されたプロファイルの詳細を表示します。


選択されたプロファイルの SSID1 を表示します。


選択されたプロファイルの SSID2 を表示します。


選択されたプロファイルの SSID3 を表示します。


選択されたプロファイルのネットワーク接続の種類を表示します。


選択されたプロファイルのワイヤレス カード アドレスを表示します。


選択されたプロファイルで設定されているセキュリティ モードを表示します。


選択されたプロファイルのデフォルト キーを表示します。


選択されたプロファイルの現在の省電力モードを表示します。


このボタンをクリックすると、新規のプロファイルを作成して基本情報、セキュリティ情報、および詳細情報を追加します。


このボタンをクリックすると、現在選択されているプロファイルの情報を変更します。


このボタンをクリックすると、現在選択されているプロファイルを削除します。


このボタンをクリックすると、現在選択されているプロファイルに変更を追加します。


ワイヤレス カードの名前を表示します。これは OS によってワイヤレスカードに割り当てられた名前です。


ワイヤレス カードの MAC アドレスを表示します。


ワイヤレス カードのドライバ名とパスを表示します。


ワイヤレス カード ドライバのバージョンを表示します。


ワイヤレス カード ドライバの作成日を表示します。


選択されたワイヤレス LAN の SSID を表示します。


ワイヤレス カードが接続している AP の MAC アドレス (BSSID) を表示します。


ワイヤレス カードの操作状態を表示します。


ステーションに対する操作チャネルと周波数を表示します。


利用可能なネットワークを表示し、SSID、セキュリティ、シグナルの強さ、ワイヤレス モード、チャネル番号、および周波数を示します。使用可能なネットワークをダブルクリックすると、既にプロファイルが作成されている場合は接続します。プロファイルが作成されていない場合は SSID に対するプロファイルを作成します。


送信済みのマルチキャスト、ブロードキャスト、およびユニキャストの各フレーム数、および送信済み総バイト数を表示します。


送信済みのマルチキャスト フレーム数を表示します。マルチキャスト フレームは、複数のホストに送信されます。


送信済みのブロードキャスト フレーム数を表示します。ブロードキャスト フレームは、ネットワークのすべてのホストに送信されます。


送信済みのユニキャスト フレーム数を表示します。ユニキャスト フレームは、単一のホストに送信されるフレームです。


すべてのフレームの送信済み総バイト数を表示します。


受信されたマルチキャスト、ブロードキャスト、およびユニキャストの各フレーム数、および受信された総バイト数を表示します。


受信済みのマルチキャスト フレーム数を表示します。マルチキャスト フレームは、複数のホストに送信されます。


受信済みのブロードキャスト フレーム数を表示します。ブロードキャスト フレームは、ネットワークのすべてのホストに送信されます。


受信済みのユニキャスト フレーム数を表示します。ユニキャスト フレームは、単一のホストに送信されるフレームです。


すべてのフレームの受信済み総バイト数を表示します。


ワイヤレス カードの接続時間の合計を表示します。


このボタンをクリックすると、すべての統計情報がゼロ (0) にリセットされます。


このボタンをクリックすると、詳細な統計情報が表示されます。


このボタンをクリックすると、ドライバ情報が表示されます。


このボタンをクリックすると、無線機能が有効または無効になります。


このボタンをクリックすると、PC のシステム トレイのトレイアイコンが表示されたり非表示になったりします。トレイアイコンはシグナルの強さに基づくカラー コードで、操作周波数も表示します。


このボタンをクリックすると、Site Survey アプリケーションにアクセスします。

一度初期化されると、このアプリケーションは接続された AP に対するシグナルの強さと品質をグラフィック表示で表します。ワイヤレス カードの場所を変更するとき、この測定値を使用してネットワーク内の AP を追加する必要があるかどうかを識別します。


このプロファイルの名前を指定します。


このプロファイルに対する SSID を指定します。ANY 接続で接続する場合には、全ての SSID を空白にします。


このプロファイルに対する 1 番目の SSID を指定します。ANY 接続で接続する場合には、全ての SSID を空白にします。


このプロファイルに対する 2 番目の SSID を指定します。ANY 接続で接続する場合には、全ての SSID を空白にします。


このプロファイルに対する 3 番目の SSID を指定します。ANY 接続で接続する場合には、全ての SSID を空白にします。


このプロファイルに対するネットワークの種類を指定します。


このプロファイルに対する省電力モードを指定します。


ラジオ ボタンをクリックして、暗号化の種類を選択します。


このラジオ ボタンをクリックすると、暗号化をオフにします。


動的セキュリティを有効にするには、[動的セキュリティ] ラジオ ボタンをクリックし、ドロップダウン メニューで必要なセキュリティを選択して、[設定] をクリックしてユーザー定義情報を入力します。


このラジオ ボタンをクリックして、PSK を指定します。


キー入力方法を表示します。


キー入力に 16 進数文字 (0-9, A-F) を使用することを表示します。


キー入力に ASCII テキスト文字 (スペースを除くキーボードのすべての文字) を使用することを表示します。


[Per-User Key] ラジオ ボタンをクリックして、これをデフォルトの WEP キーとして設定します。


[1 番目] ラジオ ボタンをクリックして、これをデフォルトの WEP キーとして設定します。


[2 番目] ラジオ ボタンをクリックして、これをデフォルトの WEP キーとして設定します。


[3 番目] ラジオ ボタンをクリックして、これをデフォルトの WEP キーとして設定します。


[4 番目] ラジオ ボタンをクリックして、これをデフォルトの WEP キーとして設定します。


ユーザーごとの WEP キーの値を、この入力フィールドに入力します。


1 番目の WEP キーの値を、この入力フィールドに入力します。


2 番目の WEP キーの値を、この入力フィールドに入力します。


3 番目の WEP キーの値を、この入力フィールドに入力します。


4 番目の WEP キーの値を、この入力フィールドに入力します。


ドロップダウン メニューからユーザーごとの WEP キーの長さを選択します。


ドロップダウン メニューから 1 番目の WEP キーの長さを選択します。


ドロップダウン メニューから 2 番目の WEP キーの長さを選択します。


ドロップダウン メニューから 3 番目の WEP キーの長さを選択します。


ドロップダウン メニューから 4 番目の WEP キーの長さを選択します。


このチェックボックスを使用して、LEAP (Lightweight Extensible Authentication Protocol) を有効にします。


ここをクリックして、LEAP/EAP-FAST のユーザー名とパスワードを指定します。名前の長さは最長 64 文字です。


LEAP/EAP-FAST のパスワードを指定します。パスワードの長さは最長 64 文字です。


このチェックボックスを使用して、ワイヤレス MAC アドレスを入力します。このアドレスは、ワイヤレス カードのグローバル MAC アドレスを上書きします。


16 進数でワイヤレス カード アドレスを入力します。


AP ネットワークまたはアドホック通信ネットワークを検出するためにワイヤレス カードが使用するスキャン方式を選択できるようにします。


このラジオ ボタンをクリックすると、パッシブ スキャンを指定します。パッシブ スキャンは、ワイヤレス カードがリスンオンリー モードであることを示します。


このラジオ ボタンをクリックすると、自動スキャンを指定します。ドライバは国/地域コードを使用して使用するスキャンの種類 (アクティブかパッシブか) を判断します。


ドロップダウン メニューを使用して送信パワーのレベルを指定します。実際の送信パワーは、規制ドメインまたはハードウェアの限界によって制限されます。


ワイヤレス カードのワイヤレス モードを選択します。


現在の SSID のアドホック通信ネットワークが検出されない場合に、アドホック通信ネットワークを開始するときのワイヤレス モードを選択します。


このチェックボックスを使用すると、ワイヤレス カードは 5 GHz で 54 Mbps というワイヤレス モードを使用できるようになります。


このチェックボックスを使用すると、ワイヤレス カードは 5 GHz ワイヤレス モードを使用できるようになります。


このチェックボックスを使用すると、ワイヤレス カードは 2.4 GHz で 11 Mbps というワイヤレス モードを使用できるようになります。


このチェックボックスを使用すると、アドホック通信ネットワークを開始するときに 5 GHz で 54 Mbps のワイヤレス モードを指定します。


このチェックボックスを使用すると、アドホック通信ネットワークを開始するときに 5 GHz のワイヤレス モードを指定します。


このチェックボックスを使用すると、アドホック通信ネットワークを開始するときに 2.4 GHz で 11 Mbps のワイヤレス モードを指定します。


送信パワー レベルをミリワット (mW) 単位で表示します。


ステーションが接続しているか、接続を試みている SSID を表示します。


このプロファイルが QoS (Quality of Service) ネットワークに参加できるかどうかを表示します。


現在の接続のノイズレベルを dBm 単位で表示します。


このプロファイルに対する省電力モードの状態を表示します。


現在の接続に対する周波数を表示します。


このボタンをクリックすると、[詳細設定の状態] ダイアログ ボックスが閉じます。


送信統計情報を表示します。


ワイヤレス カードによって送信されたビーコン数を表示します。


ワイヤレス カードによって正しく送信されたフレーム数を表示します。


ステーションによるフレーム受信エラーのために再送されたフレーム数を表示します。


受信ステーションが結果的に正常に受信できなかったために欠落したフレーム数を表示します。


ワイヤレス カードによって送信された RTS (送信要求) フレーム数を表示します。


受信統計情報を表示します。


ワイヤレス カードによって受信されたビーコン数を表示します。


ワイヤレス カードによって正しく受信されたフレーム数を表示します。


ワイヤレス カードによって受信エラーになったフレーム数を表示します。


ワイヤレス カードが正常に暗号解読できなかった受信フレーム数を表示します。


重複したフレームが既に受信されているためにワイヤレス カードによって拒否されたフレーム数を指定します。


ワイヤレス カードによって受信された CTS (送信可) フレーム数を指定します。


ワイヤレス カードによって受信された AP 認証失敗の数を表示します。


ワイヤレス カードによって受信された AP 関連付け拒否の数を表示します。


このボタンをクックすると、[詳細統計情報] ダイアログ ボックスが閉じます。


このボタンをクリックすると、すべての統計情報がゼロ (0) にリセットされます。


ワイヤレス カードが操作のために設定されている国/地域を選択します。


このラジオ ボタンをクリックすると、個別の規制ドメインで使用可能として示されているすべてのチャネルを全世界からパッシブ スキャンできるようになります。


このラジオ ボタンをクリックすると、国/地域コードを変更できるようになります。


このラジオ ボタンをクリックすると、[国/地域コードの選択] セレクタを終了して閉じます。


シグナルの強さをパーセンテージか dB 単位で表示します。


このボタンをクリックすると、シグナルの強さがパーセンテージで表示されます。


このボタンをクリックすると、シグナルの強さが dB 単位で表示されます。


更新間隔 (相対) または総経過時間 (累積) に基づいて、統計データを表示します。


このボタンをクリックすると、更新間隔に基づいて統計情報を収集します。


このボタンをクリックすると、統計情報を積算します。


相対統計情報を収集するための間隔 (秒単位) を表示します。


このラジオ ボタンをクリックすると、[表示設定] ダイアログ ボックスを変更できるようになります。


このラジオ ボタンをクリックすると、[表示設定] ダイアログ ボックスを終了して閉じます。


[基本] タブを使用して、プロファイルのネットワーク名と設定名を設定します。


ツール ボタンをクリックして、無線を有効化/無効化し、[国/地域コードの選択] を開き、トレイアイコンを有効化/無効化します。


[プロファイル管理] タブを使用して、新規の設定の追加、設定の変更、設定の削除、または異なるプロファイルへの変更ができます。


[診断] タブにはドライバの統計情報が表示されます。


802.11b および 802.11g ネットワークに対して、[ロングのみ] または [ロング & ショート] というプリアンブル モードを選択します。[ロングのみ] は、従来のワイヤレス カードとの下位互換性のために使用されます。


このページを使用して、静的セキュリティの WEP キーを追加します。


[更新] ボタンをクリックすると、再スキャンを行い、利用可能なネットワークを更新します。


[詳細設定] タブを使用して、プロファイルを詳細に設定します。


[PSK の定義] ボタンをクリックして、ダイアログ ボックスを開いて PSK を入力します。


[セキュリティ] タブを使用して、暗号化の種類を設定し、動的セキュリティを設定します。


プリアンブル モードを [ショート&ロング] に設定し、ワイヤレス カードが使用するプリアンブル モードを選択できるようにします。


プリアンブル モードを [ロングのみ] に設定します。このモードは、従来のワイヤレス カードとの下位互換性のために使用されます。


デフォルト キーを選択するためのラジオ ボタンをクリックし、ドロップダウン メニューから長さを選択してから、キー フィールドに WEP キーを入力します。


ドライバに関する現在の情報を表示します。


[WLAN status] タブを使用して、現在の接続情報と、利用可能なネットワークのリストを表示します。このリストから新しい接続に切り替えます。


ワイヤレス カードの送信および受信の詳細な統計情報を表示します。


リンクに関する詳細な情報を表示します。


[詳細設定] ボタンをクリックして、リンクに関する詳細な情報を表示します。


[国/地域コードの選択] を使用して、ワイヤレス カードが設定されている国/地域を変更します。


[現在の状態] タブに、リンクに関する情報が表示されます。


[バージョン情報] ボックスに、このアプリケーションの作成日とバージョンが表示されます。


[Settings] ボックスを使用すると、累積モードと更新間隔モードの表示と情報収集間隔を変更できます。更新間隔モードは測定間隔の開始ごとに統計情報をゼロ (0) にします。情報収集間隔は秒単位で表示されます。新しい値を入力するか、右側の上向き/下向き矢印を使用して、その間隔を変更します。間隔を短くすると、より多くの CPU 時間を使用します。相対的なシグナルの強さをデシベル (dB) 単位またはパーセンテージで表示します。


[アクティブ化] ボタンをクリックして、選択した AP ネットワークまたはアドホック通信ネットワークに切り替えます。または、[SSID] をダブルクリックします。その SSID に対するプロファイルがない場合、新規のプロファイルが開いて選択した SSID が自動的に入力されます。そのプロファイルの設定に入力して、[OK] をクリックするとプロファイルがアクティブになります。


[アクティブ化] ボタンをクリックして、選択したプロファイルに切り替えます。または、プロファイル名をダブルクリックします。


現在選択しているチャネルを表示します。


このチェックボックスを使用すると、ワイヤレス カードは 2.4 GHz で 54 Mbps というワイヤレス モードを使用できるようになります。


このチェックボックスを使用すると、アドホック通信ネットワークを開始するときに 2.4 GHz で 54 Mbps のワイヤレス モードを指定します。


このドロップダウン メニューを使用して、アドホック通信ネットワークを開始するチャネルを選択します。


LEAP/EAP-FAST のパスワードを入力します。


入力した LEAP/EAP-FAST のパスワードを確認します。


ここをクリックして、LEAP/EAP-FAST の入力を有効にします。


ここをクリックすると、[ユーザー情報の定義] ダイアログ ボックスをクリアして閉じます。


ここをクリックすると、利用可能なネットワークのリストが表示されます。


LEAP/EAP-FAST のユーザー名を入力します。


ここをクリックすると、[プロファイル管理] ダイアログ ボックスに対する変更が有効になります。


ここをクリックすると、[プロファイル管理] ダイアログ ボックスに対する変更が取り消されてダイアログ ボックスが閉じます。


ここをクリックすると、Wireless Zero Configuration (WZCSVC) が無効になります。


ここをクリックすると、Wireless Zero Configuration (WZCSVC) は有効のままです。


チェック ボックスをオンにすると、このダイアログ ボックスは今後表示されなくなります。


インストール プロセス中に ACU が選択されました。Wireless Zero Configuration (WZCSVC) も有効です。ACU と Wireless Zero Configuration (WZCSVC) のどちらを使用するか、選択してください。


ここをクリックすると、[ユーザー情報の定義] ダイアログ ボックスをクリアして閉じます。


このプロファイルに対する SSID を指定します。


次のラジオ ボタンを使用して、セキュリティオプションを指定します。


[設定] ボタンを使用して、指定されたセキュリティオプションのユーザー情報を入力します。


[WPA] チェックボックスを有効にして [設定] をクリックし、ワイヤレス保護アクセス情報を入力します。


ドロップダウン メニューで必要な動的セキュリティを指定します。


[OK] をクリックして、WPA パスフレーズを有効にします。


ここをクリックすると、変更が取り消されてダイアログ ボックスが閉じます。


WPA セキュリティのパスワードを入力します。パスワードは最小で 8 文字です。


このダイアログ ボックスを使用して、動的セキュリティ モードに関する情報を入力します。


動的セキュリティのユーザー名とパスワードをデータ入力フィールドに入力します。


動的セキュリティのユーザー名をデータ入力フィールドに入力します。


このデータ入力フィールドを使用して、動的セキュリティのユーザー名を入力します。


動的セキュリティのパスワードをデータ入力フィールドに入力します。


このデータ入力フィールドを使用して、動的セキュリティのパスワードを入力します。


動的セキュリティのパスワードをデータ入力フィールドに再入力します。


このデータ入力フィールドを使用して、動的セキュリティのパスワードを再入力します。


ドロップダウン メニューから必要な証明書を選択します。


このエリアから使用する認証機関を指定します。


このラジオ ボタンをクリックして、任意の認証機関を使用します。


このラジオ ボタンをクリックして、ドロップダウン メニューから使用する認証機関を指定します。


このドロップダウン メニューを使用して、使用する認証機関を指定します。


RADIUS サーバーのサーバー/ドメイン名を入力します。


RADIUS サーバーのログイン名を入力します。


ここをクリックすると、[証明書の定義] ダイアログ ボックスに対する変更が適用されます。


ここをクリックすると、変更が取り消されて [証明書の定義] ダイアログ ボックスが閉じます。


このエリアから使用する認証機関を指定します。


このラジオ ボタンをクリックして、任意の認証機関を使用します。


このラジオ ボタンをクリックして、ドロップダウン メニューから使用する認証機関を指定します。


このドロップダウン メニューを使用して、使用する認証機関を指定します。


セキュリティ サーバーのサーバー/ドメイン名を入力します。


セキュリティ サーバーのログイン名を入力します。


ここをクリックして、セキュリティ サーバーに対する [ユーザー情報の定義] ダイアログ ボックスに情報を入力します。


ここをクリックすると、[証明書の定義] ダイアログ ボックスに対する変更が適用されます。


ここをクリックすると、変更が取り消されて [証明書の定義] ダイアログ ボックスが閉じます。


このダイアログ ボックスを使用して、WPA パスワード フレーズを入力します。


このダイアログ ボックスを使用して、TLS 動的セキュリティ モードに関する情報を入力します。


[インポート] をクリックして、プロファイルをインポートします。そのプロファイルがあるディレクトリに移動し、プロファイルを選択して、[オープン] をクリックしてプロファイルをインポートします。


[エクスポート] をクリックして、プロファイルをエクスポートします。プロファイルを保存するディレクトリに移動して、[上書き保存] をクリックしてプロファイルをエクスポートします。


[プロファイルの順序] をクリックして、プロファイルが [プロファイル管理] ウィンドウに表示される順序を設定します。[自動プロファイル選択の管理] ウィンドウで適宜 [上に移動] または [下に移動] をクリックし、[OK] をクリックします。


[プロファイル管理] タブの [プロファイルの自動選択] チェック ボックスをオンにすることでプロファイルの自動選択が有効になると、クライアント アダプタは利用可能なネットワークをスキャンします。ネットワークとの接続に使用されるプロファイルは、優先度が最も高く、検出されたネットワークの 1 つと同じ SSID を持つものです。その接続が失敗すると、クライアント アダプタはその次の優先度で SSID が一致するプロファイルを試みます。それが失敗すると、その次のものを試します。


トラブルシューティング ユーティリティはオプションのユーティリティで、アダプタがアクセスポイント (インフラストラクチャ通信) モードのときに、ワイヤレス アダプタの設定および関連する問題を識別および解決します。このユーティリティは、Mini PCI ソリューションでのみ利用できます。


認証サーバによる認証方式を示します。


認証サーバによる認証方式を示します。


データの暗号化に使用されるセキュリティ モードを示します。


認証の種類を示します。「自動」の場合、アダプタは「共有」モードを使用して認証を試み、「共有」で失敗すると「オープン」認証に切り替えます。「オープン」の場合、アダプタは WEP 設定に関係なく認証を試みます。アダプタとアクセスポイントの両方の WEP キーが一致する場合にのみ、アクセスポイントを関連付けます。「共有」の場合、アダプタは同じ WEP キーを持つアクセスポイントとのみ関連付けが許可されます。


MIC が有効かどうかを示します。MIC は、暗号化されたパケットに対するビット反転攻撃を防ぎます。


関連しているアクセスポイントの名前を表示します。


関連しているアクセスポイントの IP アドレスを表示します。


関連しているアクセスポイントの MAC アドレスを表示します。


現在のシグナルの強さを dBm 単位またはパーセンテージで表示します。


現在のノイズレベル (シグナルの精度) を dBm 単位またはパーセンテージで表示します。


クライアント アダプタがパワーを供給されてからの時間 (時:分:秒) を示します。アダプタが 24 時間以上実行している場合は、その時間を日:時:分:秒で示します。


802.11b プリアンブルのフォーマットを表示します。プリアンブルのフォーマットは、[詳細設定] タブで設定します。


現在の受信速度を Mbps 単位で示します。


現在の送信速度を Mbps 単位で示します。


現在接続しているチャネルを表示します。


ステーションが使用している周波数を表示します。


受信応答 (Acknowledgement) を必要としない送信済みフレームの数を表示します。


受信応答 (Acknowledgement) を受信した送信済みフレームの数を表示します。


巡回冗長検査 (CRC) エラーを受信した数を表示します。


アクセスポイントの不一致を受信した数を表示します。


データ速度の不一致を受信した数を表示します。


送信済みの RTS (送信要求) フレーム数を表示します。


送信済みの CTS (送信可) フレーム数を表示します。


送信済みの非 CTS (非送信可) フレーム数を表示します。


送信済みの再試行された RTS (送信要求) フレーム数を表示します。


送信済みの再試行されたデータ フレーム数を表示します。


認証タイムアウトを受信した数を表示します。


関連付けタイムアウトを受信した数を表示します。


標準 MIC 認証を受信した数を表示します。


標準 MIC エラーを受信した数を表示します。


CKIP MIC 認証を受信した数を表示します。


CKIP MIC エラーを受信した数を表示します。


受信した CTS フレーム数を表示します。


クライアント コンピュータの名前を表示します。


ワイヤレス アダプタのシリアル番号を表示します。


シグナルの強さを表示します。


このフィールドには、自動プロファイル選択の管理で使用可能なプロファイルが表示されます。


[追加] をクリックして、自動プロファイル選択にプロファイルを追加します。[プロファイル管理] タブで [プロファイルの順序] ボタンをクリックします。[自動プロファイル選択の管理] ウィンドウが表示され、作成済みのすべてのプロファイルが [使用可能なプロファイル] ボックスに表示されます。自動プロファイル選択に追加するプロファイルを選択し、[追加] をクリックします。そのプロファイルは [自動的に選択されたプロファイル] ボックスに表示されます。


このフィールドには、自動的に選択されたプロファイルが表示されます。


使用可能なプロファイルか自動的に選択されるプロファイルを選択し、[上に移動] をクリックして選択したプロファイルのリスト内の順序を上位に移動します。


使用可能なプロファイルか自動的に選択されるプロファイルを選択し、[下に移動] をクリックして選択したプロファイルのリスト内の順序を下位に移動します。


使用可能なプロファイルか自動的に選択されるプロファイルを選択し、[削除] をクリックして選択したプロファイルをリストから削除します。


[OK] をクリックして、[自動プロファイル選択の管理] ウィンドウに対する変更を受け入れます。


[キャンセル] をクリックして、[自動プロファイル選択の管理] ウィンドウに対する変更をキャンセルします。


802.11a の送信パワー レベルをミリワット (mW) 単位で選択します。実際の送信パワーは、規制ドメインまたはハードウェアの限界によって制限されます。


ワイヤレス アダプタが認証のために使用するモードを選択します。「自動」の場合、アダプタは「共有」モードを使用して認証を試み、「共有」で失敗すると「オープン」認証に切り替えます。「オープン」の場合、アダプタは WEP 設定に関係なく認証を試みます。アダプタとアクセスポイントの両方の WEP キーが一致する場合にのみ、アクセスポイントを関連付けます。「共有」の場合、アダプタは同じ WEP キーを持つアクセスポイントとのみ関連付けが許可されます。


インフラストラクチャ通信 (アクセスポイント) ネットワークの場合は、[優先する AP] ボタンをクリックして、クライアント アダプタが関連付けを試みるアクセスポイントを 4 個まで指定します。


クライアント マシンを識別します。


ワイヤレス アダプタが関連付けられているアクセスポイントで WEP が [Optional] に設定され、クライアントで WEP が有効になっている場合、関連付けを許可するには [セキュリティ] タブの [混合セルとの関連付けを許可する] チェック ボックスがオンになっていることを確認します。


ラジオ ボタンをクリックすることで、[一時ユーザー名とパスワードを使用する] を選択します。

認証ユーザー名として Windows のユーザー名を使用するには、[Windows ユーザー名の使用] ボックスをオンにします。または[ユーザー名とパスワードを手動で要求する] をオンにして、手動ログインによって認証プロセスを開始します。


認証ユーザー名として Windows のユーザー名を使用するには、[Windows ユーザー名の使用] ボックスをオンにします。


[ユーザー名とパスワードを手動で要求する] をオンにして、手動ログインによって認証プロセスを開始します。


静的な情報としての認証ユーザー名、パスワード、およびドメインを指定するために選択します。


静的な情報としての認証ユーザー名を指定するために選択します。


静的な情報としての認証パスワードを指定するために選択します。


静的な情報としての認証パスワードを確認します。


静的な情報としての専用ドメイン名を指定するために選択します。


[ユーザー名にWindowsログオンドメインを含める] をオンにすることで、Windows ログイン ドメインおよびユーザー名を RADIUS サーバーに渡すように設定します。(デフォルトの設定)


必要な場合は、[ユーザーがログインしない限りネットワークに接続しない] をオンにして、ログオフ後にワイヤレス アダプタの関連付けを強制的に解消します。


認証のタイムアウト時間 (30 秒から 500 秒の間で設定) を入力して、認証が認証失敗を宣言してエラー メッセージを送信するまでの待機時間を指定します。デフォルトは、90 秒です。


[OK] をクリックして、[設定] ウィンドウに対する変更を保存します。


[キャンセル] をクリックして、[設定] ウィンドウに対する変更をキャンセルします。


ドロップダウン リストから適切なネットワーク認証機関を選択します。


EAP-GTC ユーザー名として Windows のユーザー名を使用するには、[Windows ユーザー名の使用] ボックスをオンにします。


別のユーザー名を使用して EAP-GTC 認証プロセスを開始するには、[ユーザー名] フィールドに PEAP ユーザー名を入力します。


パスワードとしてトークンを選択します。[トークン] がハードウェア トークン デバイスか Secure Computing SofToken プログラム (バージョン 1.3 以上) を使用して、認証中にワンタイムパスワードを取得および入力することに注意してください。


静的パスワードを選択します。


[設定] をクリックして、専用のサーバーまたはドメインとログイン名を指定します。[ネットワーク認証機関] ドロップダウン リストに含まれる認証機関によって署名された証明書を持つサーバーからの証明書をクライアントが受け取るために、サーバー名を空白にしておきます。(推奨) またはクライアントが証明書を受け取るサーバーのドメイン名を入力します。


静的パスワードを編集します。


[OK] をクリックして、[EAP-GTC configuration] ウィンドウに対する変更を保存します。


[キャンセル] をクリックして、[EAP-GTC configuration] ウィンドウに対する変更をキャンセルします。


インフラストラクチャ通信 (アクセスポイント) ネットワークの場合、クライアントが関連付けを試行するときに 1 番目に優先されるアクセスポイントの MAC アドレスを入力します。


インフラストラクチャ通信 (アクセスポイント) ネットワークの場合、クライアントが関連付けを試行するときに 2 番目に優先されるアクセスポイントの MAC アドレスを入力します。


インフラストラクチャ通信 (アクセスポイント) ネットワークの場合、クライアントが関連付けを試行するときに 3 番目に優先されるアクセスポイントの MAC アドレスを入力します。


インフラストラクチャ通信 (アクセスポイント) ネットワークの場合、クライアントが関連付けを試行するときに 4 番目に優先されるアクセスポイントの MAC アドレスを入力します。


[OK] をクリックして、[優先する AP] ウィンドウに対する変更を保存します。


[キャンセル] をクリックして、[優先する AP] ウィンドウに対する変更をキャンセルします。


セキュリティ ユーザー名として Windows のユーザー名を使用するには、[Windows ユーザー名の使用] ボックスをオンにします。


このラジオ ボタンを使用して、PSK の長さを 64 ビットに設定します。64 ビットキーには、16 進数は 10 桁、ASCII 文字は 5 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


このラジオ ボタンを使用して、PSK の長さを 64 ビットに設定します。64 ビットキーには、16 進数は 10 桁、ASCII 文字は 5 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


このラジオ ボタンを使用して、PSK の長さを 64 ビットに設定します。64 ビットキーには、16 進数は 10 桁、ASCII 文字は 5 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


このラジオ ボタンを使用して、PSK の長さを 64 ビットに設定します。64 ビットキーには、16 進数は 10 桁、ASCII 文字は 5 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


このラジオ ボタンを使用して、PSK の長さを 128 ビットに設定します。128 ビットキーには、16 進数は 26 桁、ASCII 文字は 13 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


このラジオ ボタンを使用して、PSK の長さを 128 ビットに設定します。128 ビットキーには、16 進数は 26 桁、ASCII 文字は 13 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


このラジオ ボタンを使用して、PSK の長さを 128 ビットに設定します。128 ビットキーには、16 進数は 26 桁、ASCII 文字は 13 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


このラジオ ボタンを使用して、PSK の長さを 128 ビットに設定します。128 ビットキーには、16 進数は 26 桁、ASCII 文字は 13 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


このラジオ ボタンを使用して、PSK の長さを 152 ビットに設定します。152 ビットキーには、16 進数は 32 桁、ASCII 文字は 16 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


このラジオ ボタンを使用して、PSK の長さを 152 ビットに設定します。152 ビットキーには、16 進数は 32 桁、ASCII 文字は 16 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


このラジオ ボタンを使用して、PSK の長さを 152 ビットに設定します。152 ビットキーには、16 進数は 32 桁、ASCII 文字は 16 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


このラジオ ボタンを使用して、PSK の長さを 152 ビットに設定します。152 ビットキーには、16 進数は 32 桁、ASCII 文字は 16 文字を入力します。この長さは、アクセスポイントのキーの長さと一致する必要があります。


保存と使用のための LEAP/EAP-FAST ユーザー名を指定します。


保存と使用のための LEAP/EAP-FAST パスワードを指定します。


[LEAP/EAP-FAST ユーザー名とパスワードの設定] ウィンドウを使用して、LEAP ログインを設定します。


[OK] をクリックして、[LEAP/EAP-FAST 設定] ウィンドウに対する変更を保存します。


[キャンセル] をクリックして、[LEAP/EAP-FAST 設定] ウィンドウに対する変更をキャンセルします。


ワイヤレス アダプタがアクセスポイントを認証するために使用するモードを「自動」に設定します。「自動」の場合、アダプタは「共有」モードを使用して認証を試み、「共有」で失敗すると「オープン」認証に切り替えます。


ワイヤレス アダプタがアクセスポイントを認証するために使用するモードを「オープン」に設定します。「オープン」の場合、アダプタは WEP 設定に関係なく認証を試みます。アダプタとアクセスポイントの両方の WEP キーが一致する場合にのみ、アクセスポイントを関連付けます。


ワイヤレス アダプタがアクセスポイントを認証するために使用するモードを「共有」に設定します。「共有」の場合、アダプタは同じ WEP キーを持つアクセスポイントとのみ関連付けが許可されます。


80211b/g の送信パワーのレベルをミリワット (mW) 単位で選択します。実際の送信パワーは、規制ドメインまたはハードウェアの限界によって制限されます。


802.11a の送信パワー レベルをミリワット (mW) 単位で選択します。実際の送信パワーは、規制ドメインまたはハードウェアの限界によって制限されます。


「80211b/g」または「802.11a」の送信パワーのレベルをミリワット (mW) で選択します。実際の送信パワーは、規制ドメインまたはハードウェアの限界によって制限されます。


802.11a で使用できるパワー レベルを表示します。


シグナルの強さを表示します。


[プロファイル管理] リスト ボックスに、作成済みのプロファイルが表示されます。アクティブなプロファイルはアイコンによって示されます。


Wi-Fi Protected Access (WPA) セキュリティの使用を有効にします。セキュリティ ラジオ ボタンをクリックして、ドロップダウン メニューから [EAP の種類] を選択します。[設定] をクリックして、設定します。


Wi-Fi Protected Access (WPA) パスフレーズ セキュリティの使用を有効にします。セキュリティ ラジオ ボタンをクリックして、[設定] をクリックして設定します。


802.1X セキュリティの使用を有効にします。セキュリティ ラジオ ボタンをクリックして、ドロップダウン メニューから [EAP の種類] を選択します。[設定] をクリックして、設定します。


アクセスポイントとステーションの両方で定義された PSK の使用を有効にします。セキュリティ ラジオ ボタンをクリックして、[設定] をクリックして設定します。


セキュリティなし (非推奨)。


使用するセキュリティの種類のラジオ ボタンをクリックし、[設定] をクリックしてセキュリティの種類を設定します。


セキュリティ ラジオ ボタンをクリックして、ドロップダウン メニューから [Wi-Fi Protected Access (WPA) security EAP type] を選択します。[設定] をクリックして、設定します。


ドロップダウン リストから [802.1X security EAP type] を選択します。[設定] をクリックして、設定します。


[ネットワーク認証機関] ドロップダウン リストに含まれる認証機関によって署名された証明書を持つサーバーからの証明書をクライアントが受け取るために、サーバー名を空白にしておきます。(推奨)、またはクライアントが証明書を受け取るサーバーのドメイン名を入力します。


必要な場合はログイン名を変更します。


[アダプタ情報] ボタンには、ネットワーク インターフェイス カード (ワイヤレス ネットワーク アダプタ) と NDIS (Network Driver Interface Specification) ドライバに関する一般情報が含まれます。


802.11b/g で使用できるパワー レベルを表示します。


現在の国情報を表示します。


このチェックボックスを使用すると、ワイヤレス カードは Super AG モードを使用できるようになります。


このチェックボックスを使用すると、ワイヤレス カードは eXtended Range (XR) モードを使用できるようになります。


このチェックボックスを使用すると、ワイヤレス カードは QoS (WMM) モードを使用できるようになります。


このチェックボックスを使用すると、セキュリティ ユーザー名としてマシン名が使用されます。


このチェックボックスを使用すると、セキュリティ ユーザー名として Windows のユーザー名が使用されます。


このチェックボックスを使用して、ユーザー情報を指定します。


別のユーザー名を使用して認証プロセスを開始するには、このフィールドにユーザー名を入力します。


別のパスワードを使用して認証プロセスを開始するには、このフィールドにパスワードを入力します。


別のパスワードを確認して認証プロセスを開始するには、このフィールドにパスワードを再入力します。


ここをクリックして、クライアントが証明書を受け取る新しいドメインの名前を入力します。


クライアントが証明書を受け取る新しいドメインの名前を入力します。


クライアントが証明書を受け取る新しいドメインへのログイン名を入力します。


[OK] をクリックして、ドメイン名とログイン名を変更します。


[キャンセル] をクリックして、ドメイン名とログイン名の変更をキャンセルします。


ここをクリックして、クライアントが証明書を受け取る新しいドメインの名前を入力します。


別のパスワードを使用して認証プロセスを開始するには、このフィールドにパスワードを入力します。


別のパスワードを確認して認証プロセスを開始するには、このフィールドにパスワードを再入力します。


このチェックボックスを使用すると、自動 Protected Access Credentials (PAC) が許可されます。


ドロップダウン リストから Protected Access Credentials (PAC) 機関を選択します。


他の Protected Access Credentials (PAC) プロファイルをインポートするには、[追加選択] ボタンをクリックします。


新しい EAP-FAST PAC を指定してインポートするには、[インポート] ボタンをクリックします。


EAP-FAST PAC を選択して [削除] ボタンをクリックすると、EAP-FAST プロファイルが削除されます。


PAC ストア リストに利用可能な EAP-FAST PAC が表示されます。このウィンドウを使用して、EAP-FAST PAC をインポートまたは削除します。


[パブリック] ラジオ ボタンをクリックすると、パブリック EAP-FAST PAC だけが表示されます。


[プライベート] ラジオ ボタンをクリックすると、プライベート EAP-FAST PAC だけが表示されます。


[OK] をクリックして、このウィンドウに対する変更を受け入れます。


[キャンセル] をクリックして、変更を受け入れずにこのウィンドウを閉じます。


ユーザー名とパスワードを自動的に要求する場合に選択します。


このチェックボックスを使用すると、システム プロファイルとしてプロファイルを設定します。すべてのユーザーがシステム プロファイルにアクセス可能です。システム プロファイルは、プロファイルを作成する際のテンプレートとしても使用されます。


認証用のユーザー名とパスワードを使用する


認証に使用する証明書を選択します。


認証用の証明書を使用します。


ワイヤレス カードが 4.9 GHz パブリック セーフティ バンドを使用できるようにします。


スキャン リストに追加可能な情報。


スキャンリストで表示する情報。


スキャンリストでこの情報を表示します。


スキャン リストからこの情報を削除します。


選択した列をスキャン リストで上位に配置します。


選択した列をスキャン リストで下位に配置します。


停止したセッションを自動的に再開します (接続が一時的に失われた場合のみ。停止するように設定されているセッションは再開対象外)。


Windows ログオン プロセスがグループ ポリシーを開始するまでの時間


停止したセッションを自動的に再開します

(接続が一時的に失われた場合のみ。停止するように設定されているセッションは再開対象外)。


このボックスがオンになっている場合、このプロファイルの設定はどれも変更することはできません。システム管理者に問い合わせてください。


ワイヤレス スループットの最大化を可能にするいくつかのテクニックを併用する、Atheros Super A/G 機能を使用します。


1 つ以上の Protected Access Credential (PAC) 機関を選択してください。


同じグループに所属する PAC を自動的に選択する場合は、これをオンにします。


自動化された Protected Access Credentials (PAC) を許可します。


PAC プロビジョニングのドロップダウン リストから 802.1X セキュリティ EAP タイプを選択してください。[設定] をクリックして、設定します。


自動 PAC プロビジョニング中に同じ EAP-FAST 認証を使用する場合は、これをオンにします。


ドメイン ログオンにマシン PAC を使用する場合は、これをオンにします。


ログオフ後にワイヤレス アダプタの関連付けを強制的に解消します。


停止したセッションを自動的に再開します (接続が一時的に失われた場合のみ。停止するように設定されているセッションは再開対象外)。


サーバーを認証する場合は、これをオンにします。


使用する認証機関を指定します。


ログインに一時ユーザー名とパスワードを使用します。Windows のユーザー名とパスワードの入力を求められます。


このコンピュータの Windows ユーザー名を認証ユーザー名として使用します。


システムがユーザー名とパスワードの入力を自動的に求めるようにします。


ログインして、認証プロセスを手動で開始します。


保存して使用する認証ユーザー名、パスワード、およびドメインを指定します。


動的セキュリティのユーザー名を入力します。


動的セキュリティのパスワードを入力します。


パスワードを再入力します。


ドメイン名を入力します。


Windows ログインのドメインとユーザー名を RADIUS サーバーに渡します。これは、デフォルト設定です。


サーバーを認証する場合は、これをオンにします。


サーバーを認証する場合は、これをオンにします。


選択された EAP-FAST 認証方式を構成する場合は、このボタンをクリックします。


選択された PAC プロビジョニング認証方式を構成する場合は、このボタンをクリックします。


PAC を管理して編成する場合は、このボタンをクリックします。


サーバーまたはドメイン、およびログイン名前を指定する場合は、このボタンをクリックします。


ユーザー名とパスワードの設定を保存した後にダイアログ ボックスを閉じる場合は、このボタンをクリックします。


ユーザー名とパスワードの設定を保存せずにダイアログ ボックスを閉じる場合は、このボタンをクリックします。


EAP-FAST の設定を保存した後にダイアログ ボックスを閉じる場合は、このボタンをクリックします。


EAP-FAST の設定を保存せずにダイアログ ボックスを閉じる場合は、このボタンをクリックします。


Protected Access Credentials 情報を入力します。


ユーザー名とパスワード情報を入力します。


新しいグループを作成する場合は、このボタンをクリックします。


このウィンドウを閉じる場合は、このボタンをクリックします。


以下のポップアップ メニューまたはコマンド ボタンを使用して PAC を管理して編成します。


PAC ファイルの名前とパスを入力します。


目的の PAC ファイルのディレクトリを参照するには、このボタンをクリックします。選択したファイルをインポートするには、[インポート] ボタンをクリックします。


PAC をプライベート ストアにインポートするには、このオプションを選択します。


PAC をグローバル ストアにインポートするには、このオプションを選択します。選択した PAC をインポートするには、このボタンをクリックします。このダイアログ ボックスを閉じる場合は、このボタンをクリックします。PAC 機関の名前を表示するPAC 機関の ID を表示するPAC の名前を表示するPAC の種類を表示する


トンネル PAC、マシン PAC、またはユーザー PACです。PAC 有効期日を表示するこのダイアログ ボックスを閉じるには、このボタンをクリックします。PAC ストアの種類を表示する


フレッシュ PAC、プライベート PAC、またはパブリック PAC です。ユーザーがログオンした後は、つねにユーザーの証明書を使用して再認証します。


カードがサポートするワイヤレス バンドを表示します。


選択された構成プロファイル情報を変更します。選択された構成プロファイルを削除する場合は、これをクリックします。


ドメイン コントローラの検索の制限時間を対応するコンボボックスに入力します (秒)。


ドメイン コントローラの検索時に認証プロセスがタイムアウトになるまでの秒数を入力します (300 秒まで)。


ワイヤレス カードが 5 GHz、300 Mbps のワイヤレス モードを使用できるようにします。


ワイヤレス カードが 2 GHz、300 Mbps のワイヤレス モードを使用できるようにします。


LAN が接続されている場合、自動的にワイヤレス LAN を無効にします。または、LAN が接続されていない場合、ワイヤレス LAN を有効にします。


このボックスがオンになっている場合、送信パワー レベルを変更することはできません。システム管理者に問い合わせてください。


これらのラジオ ボタンを使用して、ワイヤレス ネットワークを制御するユーティリティを選択します。


これを選択すると、Windows によってワイヤレス ネットワークが制御されます。


これを選択すると、ACU によってワイヤレス ネットワークが制御されます。


これを選択すると、任意のサード パーティのツールによってワイヤレス ネットワークが制御されます。


ローミング攻撃度に適したローミング レベルを選択します。