Copyright: Copyright � 2003, Atheros Communications, Inc. All Rights Reserved
Citation: Copyright � 2003, Atheros Communications, Inc. All Rights Reserved


显示当前无线连接的频率和最大速度。


显示当前选定的配置文件名。


显示工作站是否与无线网络相连接。


显示当前驱动程序连接的传输速率。


显示当前驱动程序连接的接收速率。


显示网络的运行模式，即基础结构模式或 Ad Hoc 模式。


显示驱动程序所采用的安全模式（关、WEP、AES 或 CKIP）。


显示 TCP/IP 协议使用的此无线网卡的 Internet 协议 (IP) 地址。


显示所配置的配置文件的列表。要更改为其他配置文件，请单击“配置文件”列表中的名称，然后单击“激活”。


显示所选配置文件的详细信息。


显示所选配置文件的第一个网络名称 (SSID1)。


显示所选配置文件的第二个网络名称 (SSID2)。


显示所选配置文件的第三个网络名称 (SSID3)。


显示所选配置文件的网络连接类型。


显示所选配置文件的无线网卡地址。


显示所选配置文件中所设置的安全模式。


显示所选配置文件的默认密钥。


显示所选配置文件的当前节能模式。


单击此按钮将创建新的配置文件并添加其常规、安全及高级信息。


单击此按钮可修改当前选定的配置文件的信息。


单击此按钮可删除当前选定的配置文件。


单击此按钮可将更改应用于当前选定的配置文件。


显示无线网卡的名称。这是操作系统指派给无线网卡的名称。


显示无线网卡的 MAC 地址。


显示无线网卡的驱动程序名称和路径。


显示无线网卡驱动程序版本。


显示无线网卡驱动程序创建日期。


显示所选无线 LAN 的网络名称 (SSID)。


显示无线网卡所连接的 AP 的 MAC 地址 (BSSID)。


显示无线网卡的运行状态。


显示工作站的运行频道和频率。


显示可用的 AP 和 Ad Hoc 网络，指定网络名称、安全、信号强度、无线模式、频道号及频率。如果已创建相应的配置文件，则双击可用的网络可连接此网络；否则就为此网络名称创建配置文件。


提供对所传输的多播、广播及单播帧数的度量，以及对传输总字节数的度量。


显示所传输的多播帧数。多播帧将发送给多个接收者。


显示所传输的广播帧数。广播帧将发送给网络上的所有主机。


显示所传输的单播帧数。单播帧将发送给一个接收者。


显示所有帧的传输总字节数。


提供对所接收的多播、广播及单播帧数的度量，以及对接收总字节数的度量。


显示所接收的多播帧数。多播帧将发送给多个接收者。


显示所接收的广播帧数。广播帧将发送给网络上的所有主机。


显示所接收的单播帧数。单播帧将发送给一个接收者。


显示所有帧的接收总字节数。


显示无线网卡的运行时间。


单击此按钮可将所有统计数据归零。


单击此按钮可查看高级统计数据。


单击此按钮可查看驱动程序信息。


单击此按钮可启用或禁用无线收发功能。


单击此按钮可在 PC 任务栏中显示或隐藏任务栏图标。任务栏图标将根据信号强度进行颜色编码，并显示相应的运行频率。


单击此按钮可访问 Site Survey 应用程序。

初始化后，此应用程序将以图形方式显示所连 AP 的信号强度和质量。更改无线网卡位置时，利用这些度量数据可以确定是否需要在网络中增加 AP 数。


指定此配置文件的名称。


指定此配置文件的网络名称 (SSID)。将所有 SSID 都留空则表示允许连接任何 AP。


指定此配置文件的第一个 SSID。将所有 SSID 都留空则表示允许连接任何 AP。


指定此配置文件的第二个 SSID。将所有 SSID 都留空则表示允许连接任何 AP。


指定此配置文件的第三个 SSID。将所有 SSID 都留空则表示允许连接任何 AP。


指定此配置文件的网络类型。


指定此配置文件的节能模式。


单击单选按钮可选定加密类型。


单击此单选按钮将关闭加密功能。


要启用动态安全功能，请单击“动态安全”单选按钮，从下拉菜单中选择所需的安全功能，然后单击“配置”以输入用户定义的信息。


单击此单选按钮可指定预共享密钥。


显示密钥输入方法。


显示密钥输入时使用十六进制字符（0-9，A-F）。


显示密钥输入时使用 ASCII 文本字符（除空格外的所有键盘字符）。


单击 Per-User Key 单选按钮可将其设置为默认的加密密钥。


单击“第一个”单选按钮可将其设置为默认的加密密钥。


单击“第二个”单选按钮可将其设置为默认的加密密钥。


单击“第三个”单选按钮可将其设置为默认的加密密钥。


单击“第四个”单选按钮可将其设置为默认的加密密钥。


在此输入字段中输入每用户加密密钥值。


在此输入字段中输入第一个加密密钥值。


在此输入字段中输入第二个加密密钥值。


在此输入字段中输入第三个加密密钥值。


在此输入字段中输入第四个加密密钥值。


从下拉菜单中选择每用户加密密钥的长度。


从下拉菜单中选择第一个加密密钥的长度。


从下拉菜单中选择第二个加密密钥的长度。


从下拉菜单中选择第三个加密密钥的长度。


从下拉菜单中选择第四个加密密钥的长度。


使用此复选框可以启用“轻型可扩展验证协议”(LEAP)。


单击此处可指定 LEAP/EAP-FAST 用户名和密码。名称最多可包含 64 个字符。


指定 LEAP/EAP-FAST 密码。密码最多可包含 64 个字符。


使用此复选框可以输入无线 MAC 地址。该地址将取代无线网卡的全局 MAC 地址。


输入十六进制的无线网卡地址。


允许选择无线网卡用于定位 AP 或 Ad Hoc 网络的扫描方法。


单击此单选按钮将指定被动扫描方式。被动扫描表示无线网卡处于仅监听模式下。


单击此单选按钮将指定自动扫描方式。驱动程序使用国家/地区代码来确定所用的扫描类型：主动扫描或被动扫描。


使用下拉菜单指定传输功率。实际传输功率可能会受到负责管制的域或硬件条件的限制。


选择无线网卡的无线模式。


选择在找不到使用当前名称的 Ad Hoc 网络时，此 Ad Hoc 网络启动时所采用的无线模式。


选中此复选框将允许无线网卡使用 5 GHz、54 Mbps 的无线模式。


选中此复选框将允许无线网卡使用 5 GHz 的无线模式。


选中此复选框将允许无线网卡使用 2.4 GHz、11 Mbps 的无线模式。


选中此复选框将指定启动 Ad Hoc 网络时采用 5 GHz、54 Mbps 的无线模式。


选中此复选框将指定启动 Ad Hoc 网络时采用 5 GHz 的无线模式。


选中此复选框将指定启动 Ad Hoc 网络时采用 2.4 GHz、11 Mbps 的无线模式。


显示传输功率（单位：毫瓦）。


显示工作站所连接（或正尝试连接）的网络的名称 (SSID)。


显示是否启用本配置文件以加入服务质量 (QoS) 网络。


以 dBm 为单位显示当前连接的噪音等级。


显示此配置文件的节能模式状态。


显示当前连接的频率。


单击此按钮将关闭“高级链路状态”对话框。


提供传输统计数据。


显示无线网卡所传输的信标数。


显示无线网卡正确传输的帧数。


显示由于工作站未成功接收帧而导致的重试帧数。


显示由于接收工作站始终未成功接收帧而导致被丢弃的帧数。


显示无线网卡所传输的 RTS 帧数。


提供接收统计数据。


显示无线网卡所接收的信标数。


显示无线网卡正确接收的帧数。


显示无线网卡接收错误的帧数。


显示无线网卡未能成功解密的接收帧数。


指定由于接收到重复帧而遭无线网卡拒绝的帧数。


指定无线网卡所接收的 CTS 帧数。


显示无线网卡所接收的 AP 验证失败次数。


显示无线网卡所接收的 AP 关联拒绝次数。


单击此按钮将关闭“高级统计”对话框。


单击此按钮可将所有统计数据归零。


选择使用此无线网卡所在的国家/地区。


单击此单选按钮将允许全球漫游功能被动地扫描所有在各自负责管制的域中指示为可用的频道。


单击此按钮将启用对国家/地区代码的更改。


单击此按钮将终止并关闭国家/地区代码选择器。


以百分比或 dB 为单位显示信号强度。


单击此按钮将以百分比方式显示信号强度。


单击此按钮将以 dB 为单位显示信号强度。


根据刷新间隔（相对）或总用时（累计）显示统计数据。


单击此按钮将根据刷新间隔收集统计数据。


单击此按钮可累计统计数据。


显示收集相对统计数据的间隔（秒）。


单击此按钮将启用对“显示设置”对话框的更改。


单击此按钮将终止并关闭“显示设置”对话框。


使用“常规”选项卡可以对配置文件的网络名称和配置名称进行配置。


单击工具按钮可启用/禁用无线收发功能，打开国家/地区代码选择器，以及/或者启用/禁用任务栏图标。


使用“配置文件管理”选项卡可以添加新配置、修改配置、删除配置或切换到其他的配置文件。


“诊断”选项卡显示驱动程序的统计数据。


为 802.11b 和 802.11g 网络选择“仅长”或“长和短”报文前导码模式。“仅长”用于实现与旧式无线网卡的向后兼容。


使用此页可以添加静态安全加密密钥。


单击“刷新”按钮可重新扫描和刷新可用 AP 和 Ad Hoc 网络的列表。


使用“高级”选项卡可设置配置文件的高级配置。


单击“定义预共享密钥”按钮可打开对话框并输入预共享密钥。


使用“安全”选项卡可设置加密类型并配置动态安全功能。


将报文前导码模式设置为“长和短”，它允许无线网卡选择所用的报文前导码模式。


将报文前导码模式设置为“仅长”。此模式用于实现与旧式无线网卡的向后兼容。


选择单选按钮以选定默认密钥，然后填写密钥字段并从下拉菜单中选择长度。


显示有关驱动程序的当前信息。


使用 WLAN 状态选项卡可以查看当前连接的信息及可用 AP 及 Ad Hoc 网络的列表。通过此列表可以切换到新的连接。


显示无线网卡的高级传输和接收统计数据。


显示有关链路的高级信息。


单击“高级”按钮可查看有关链路的高级信息。


使用国家/地区代码选择器可更改无线网卡所设置的国家/地区。


“当前状态”选项卡显示有关链路的信息。


“关于”框显示此应用程序的生成日期及版本号。


“设置”框允许更改累计或间隔模式下的显示和信息收集间隔。间隔模式在每次测定间隔开始时都会将统计数据归零。信息收集间隔以秒为单位显示。输入新的值或利用右侧的上/下箭头可更改间隔值。缩短间隔会占用更多的 CPU 时间。相对信号强度将以分贝 (dB) 或百分比为单位进行显示。


单击“激活”按钮可切换到被突出显示的 AP 或 Ad Hoc 网络。也可双击 SSID。如果此 SSID 没有配置文件，系统就会打开一个新的配置文件并填写所选的 SSID。完成配置文件的设置并按“确定”将激活此配置文件。


按“激活”按钮将切换到所选的配置文件。也可双击配置文件名。


显示当前选定的频道。


选中此复选框将允许无线网卡使用 2.4 GHz、54 Mbps 的无线模式。


选中此复选框将指定启动 Ad Hoc 网络时采用 2.4 GHz、54 Mbps 的无线模式。


使用此下拉菜单可以选择启动 Ad Hoc 网络时的频道。


输入 LEAP/EAP-FAST 密码。


确认输入的 LEAP/EAP-FAST 密码。


单击此处将启用 LEAP/EAP-FAST 条目。


单击此处将清除并关闭“定义用户信息”对话框。


单击此处将显示可用 AP 和 Ad Hoc 网络的列表。


输入 LEAP/EAP-FAST 用户名。


单击此处可启用对“配置文件管理”对话框所做的更改。


单击此处可取消更改并关闭“配置文件管理”对话框。


单击此处可禁用“零配置”。


单击此处将启用“零配置”。


单击此复选框将不再显示此对话框。


安装过程中选择了 ACU。同时还启用了“零配置”。请选择是否使用 ACU 或“零配置”。


单击此处将清除并关闭“定义用户信息”对话框。


指定此配置文件的网络名称 (SSID)。


使用下列单选按钮可指定安全选项。


使用“配置”按钮可为指定的安全选项输入用户信息。


启用 WPA 复选框并单击“配置”按钮可输入“无线保护访问”信息。


从下拉菜单中指定所需的动态安全功能。


单击“确定”将启用 WPA 密码短语。


单击此处可取消更改并关闭对话框。


输入 WPA 安全功能的密码。最小密码长度为 8 个字符。


使用此对话框可以输入有关动态安全模式的信息。


在所提供的数据输入字段中输入动态安全功能的用户名和密码。


在所提供的数据输入字段中输入动态安全功能的用户名。


使用此数据输入字段可以输入动态安全功能的用户名。


在所提供的数据输入字段中输入动态安全功能的密码。


使用此数据输入字段可以输入动态安全功能的密码。


在所提供的数据输入字段中再次输入动态安全功能的密码。


使用此数据输入字段可以再次输入动态安全功能的密码。


从下拉菜单中选择所需的证书。


在该区域中指定所要使用的证书机构。


单击此单选按钮将使用任意证书机构。


单击此单选按钮将从下拉菜单中指定所要使用的证书机构。


使用此下拉菜单可以指定所要使用的证书机构。


输入 RADIUS 服务器的服务器名/域名。


输入 RADIUS 服务器的登录名。


单击此处将应用对“定义证书”对话框所做的更改。


单击此处将取消更改并关闭“定义证书”对话框。


在该区域中指定所要使用的证书机构。


单击此单选按钮将使用任意证书机构。


单击此单选按钮将从下拉菜单中指定所要使用的证书机构。


使用此下拉菜单可以指定所要使用的证书机构。


输入安全服务器的服务器名/域名。


输入安全服务器的登录名。


单击此处可在“定义用户信息”对话框中输入安全服务器的信息。


单击此处将应用对“定义证书”对话框所做的更改。


单击此处将取消更改并关闭“定义证书”对话框。


使用此对话框可以输入 WPA 密码短语。


使用此对话框可以输入有关 TLS 动态安全功能的信息。


单击“导入”将导入配置文件。请浏览到配置文件所在的目录，突出显示配置文件，然后单击“打开”以导入配置文件。


单击“导出”将导出配置文件。请浏览到用于保存配置文件的目录，然后单击“保存”以导出配置文件。


单击“排序”将设置“配置文件管理”窗口中配置文件的显示顺序。在“自动配置文件选择管理”窗口中，相应地单击“上移”或“下移”，然后单击“确定”。


选中“配置文件管理”选项卡上的“自动选择配置文件”，从而启用自动配置文件选择功能后，客户端适配器就会扫描查找可用的网络。优先级最高且与找到的某个网络具有相同 SSID 的配置文件就成为连接此网络时所用的配置文件。如果连接失败，客户端适配器会尝试使用优先级最高且匹配 SSID 的下一配置文件，以此类推。


作为一个可选的实用程序，故障排除实用程序可以在适配器处于接入点（基础结构）模式的情况下识别和解决无线适配器的配置和关联问题。此实用程序仅在 Mini PCI 解决方案中可用。


指示基于服务器的验证方法。


指示基于服务器的验证方法。


指示用于数据加密的安全模式。


指示验证类型。“自动”- 适配器会尝试使用共享方式进行验证，但如果失败，则切换到开放式验证。“开放”- 允许适配器尝试进行验证而无需顾及其 WEP 设置。只有适配器与接入点上的 WEP 密钥相匹配时，它才与接入点建立关联关系。“共享”- 仅允许适配器与具有相同 WEP 密钥的接入点关联。


指示是否启用 MIC。MIC 可以有效防护对加密数据包所进行的 bit-flip 攻击。


显示所关联的接入点的名称。


显示所关联的接入点的 IP 地址。


显示所关联的接入点的 MAC 地址。


以 dBm 或百分比为单位显示当前信号强度。


以 dBm 或百分比为单位显示当前噪音等级（信号质量）。


显示客户端适配器得到正常供电的时间（以“时:分:秒”计）。如果适配器运行时间超过 24 小时，显示的方式将变为“天:时:分:秒”。


显示 802.11b 报文前导码格式。请在“高级”选项卡上配置报文前导码格式。


以 Mbps 为单位显示当前接收速率。


以 Mbps 为单位显示当前传输速率。


显示当前连接的频道。


显示工作站所用的频率。


显示不要求确认的传输帧数。


显示收到确认的传输帧数。


显示所接收的循环冗余检查错误数。


显示所接收的不匹配的接入点数。


显示所接收的不匹配的数据速率数。


显示所传输的 RTS 帧数。


显示所传输的 CTS 帧数。


显示所传输的非 CTS 帧数。


显示所传输的重试 RTS 帧数。


显示所传输的重试数据帧数。


显示所接收的验证超时次数。


显示所接收的关联超时次数。


显示所接收的标准 MIC 验证次数。


显示所接收的标准 MIC 错误数。


显示所接收的 CKIP MIC 验证次数。


显示所接收的 CKIP MIC 错误数。


显示所接收的 CTS 帧数。


显示客户端计算机的名称。


显示无线适配器的序列号。


显示信号的强度。


本字段显示可供自动配置文件选择管理使用的配置文件。


单击“添加”将在自动配置文件选择中增加一个配置文件。在“配置文件管理”选项卡上，单击“配置文件排序”按钮。此时显示“自动配置文件选择管理”窗口，上面的“可用配置文件”框中将列出所有创建的配置文件。突出显示要添加到自动配置文件选择中的配置文件，然后单击“添加”。这些配置文件将显示在“自动选择的配置文件”框中。


此字段显示自动选择的配置文件。


突出显示可用的配置文件或自动选择的配置文件，然后单击“上移”，从而将所选配置文件在列表中的位置上移。


突出显示可用的配置文件或自动选择的配置文件，然后单击“下移”，从而将所选配置文件在列表中的位置下移。


突出显示可用的配置文件或自动选择的配置文件，然后单击“删除”，从而将所选的配置文件从列表中删除。


单击“确定”将接受“自动配置文件选择管理”窗口所做的更改。


单击“取消”将取消“自动配置文件选择管理”窗口所做的更改。


选择 802.11a 的传输功率（单位：毫瓦）。实际传输功率可能会受到负责管制的域或硬件条件的限制。


选择无线适配器在验证接入点时所用的模式：“自动”- 适配器会尝试使用共享方式进行验证，但如果失败，则切换到开放式验证。“开放”- 允许适配器尝试进行验证而无需顾及其 WEP 设置。只有适配器与接入点上的 WEP 密钥相匹配时，它才与接入点建立关联关系。“共享”- 仅允许适配器与具有相同 WEP 密钥的接入点关联


对于基础结构（接入点）网络而言，单击“首选 AP”按钮可最多指定四个客户端适配器应尝试关联的接入点。


标识客户端计算机。


如果无线适配器所关联的接入点将 WEP 设置为“可选”且客户端已启用 WEP 功能，请务必选中“安全”选项卡上的“允许关联混合单元”，以允许进行关联。


如果选中下列单选按钮，即选择了“使用临时用户名和密码”：

选中“使用 Windows 用户名”将把 Windows 用户名用作验证用户名。也可以选中“手动提示输入用户名和密码”以进行手动登录并启动验证过程。


选择“使用 Windows 用户名”，从而将 Windows 用户名用作验证用户名。


选择“手动提示输入用户名和密码”将进行手动登录并启动验证过程。


选择指定要保存和使用的验证用户名、密码和域。


选择指定要保存和使用的验证用户名。


选择指定要保存和使用的验证密码。


确认要保存和使用的验证密码。


选择要保存和使用的特定域名。


选中设置“用户名包含 Windows 登录域”将把 Windows 登录域和用户名传给 RADIUS 服务器。（默认设置）


如果需要，请选中“除非用户登录，否则无网络连接”，从而在注销后强制无线适配器取消关联关系。


输入验证的超时时间（介于 30 秒和 500 秒之间），从而指定在宣布验证失败并发出错误消息之前验证应等待的时间。默认值为 90 秒。


单击“确定”将保存在设置窗口中所做的更改。


单击“取消”将取消在设置窗口中所做的更改。


从下拉列表中选择相应的网络证书机构。


选中“使用 Windows 用户名”将把 Windows 用户名用作 EAP-GTC 用户名。


在“用户名”字段中输入 PEAP 用户名，从而使用独立的用户名并开始 EAP-GTC 验证过程。


选择令牌密码。注意：验证过程中，令牌使用硬件令牌设备或 Secure Computing SofToken 程序（版本 1.3 或更高版本）来获取和输入一次性密码。


选择静态密码。


单击“设置”可指定特定的服务器或域及登录名。将服务器名称字段留空 - 客户端将接受获得“网络证书机构”下拉列表中所列机构证书的任何服务器的证书（建议）。也可以输入向客户端颁发证书的服务器的域名。


编辑静态密码。


单击“确定”将保存在 EAP-GTC 配置窗口中所做的更改。


单击“取消”将取消在 EAP-GTC 配置窗口中所做的更改。


对于基础结构（接入点）网络，请输入被设置为客户端在尝试关联时作为第一个首选接入点的接入点按钮的 MAC 地址。


对于基础结构（接入点）网络，请输入被设置为客户端在尝试关联时作为第二个首选接入点的接入点按钮的 MAC 地址。


对于基础结构（接入点）网络，请输入被设置为客户端在尝试关联时作为第三个首选接入点的接入点按钮的 MAC 地址。


对于基础结构（接入点）网络，请输入被设置为客户端在尝试关联时作为第四个首选接入点的接入点按钮的 MAC 地址。


单击“确定”将保存在“首选接入点”窗口中所做的更改。


单击“取消”将取消在“首选接入点”窗口中所做的更改。


选中“使用 Windows 用户名”将把 Windows 用户名用作安全用户名。


使用此单选按钮可以将预共享密钥的长度设置为 64 位。对于 64 位密钥，十六进制时请输入 10 位数，ASCII 字符时则输入 5 位数。此长度必须与接入点上的密钥长度匹配。


使用此单选按钮可以将预共享密钥的长度设置为 64 位。对于 64 位密钥，十六进制时请输入 10 位数，ASCII 字符时则输入 5 位数。此长度必须与接入点上的密钥长度匹配。


使用此单选按钮可以将预共享密钥的长度设置为 64 位。对于 64 位密钥，十六进制时请输入 10 位数，ASCII 字符时则输入 5 位数。此长度必须与接入点上的密钥长度匹配。


使用此单选按钮可以将预共享密钥的长度设置为 64 位。对于 64 位密钥，十六进制时请输入 10 位数，ASCII 字符时则输入 5 位数。此长度必须与接入点上的密钥长度匹配。


使用此单选按钮可以将预共享密钥的长度设置为 128 位。对于 128 位密钥，十六进制时请输入 26 位数，ASCII 字符时则输入 13 位数。此长度必须与接入点上的密钥长度匹配。


使用此单选按钮可以将预共享密钥的长度设置为 128 位。对于 128 位密钥，十六进制时请输入 26 位数，ASCII 字符时则输入 13 位数。此长度必须与接入点上的密钥长度匹配。


使用此单选按钮可以将预共享密钥的长度设置为 128 位。对于 128 位密钥，十六进制时请输入 26 位数，ASCII 字符时则输入 13 位数。此长度必须与接入点上的密钥长度匹配。


使用此单选按钮可以将预共享密钥的长度设置为 128 位。对于 128 位密钥，十六进制时请输入 26 位数，ASCII 字符时则输入 13 位数。此长度必须与接入点上的密钥长度匹配。


使用此单选按钮可以将预共享密钥的长度设置为 152 位。对于 152 位密钥，十六进制时请输入 32 位数，ASCII 字符时则输入 16 位数。此长度必须与接入点上的密钥长度匹配。


使用此单选按钮可以将预共享密钥的长度设置为 152 位。对于 152 位密钥，十六进制时请输入 32 位数，ASCII 字符时则输入 16 位数。此长度必须与接入点上的密钥长度匹配。


使用此单选按钮可以将预共享密钥的长度设置为 152 位。对于 152 位密钥，十六进制时请输入 32 位数，ASCII 字符时则输入 16 位数。此长度必须与接入点上的密钥长度匹配。


使用此单选按钮可以将预共享密钥的长度设置为 152 位。对于 152 位密钥，十六进制时请输入 32 位数，ASCII 字符时则输入 16 位数。此长度必须与接入点上的密钥长度匹配。


指定要保存和使用的 LEAP/EAP-FAST 用户名。


指定要保存和使用的 LEAP/EAP-FAST 密码。


使用 LEAP/EAP-FAST 用户名和密码设置窗口可对 LEAP 登录进行设置。


单击“确定”将保存在 LEAP/EAP-FAST 设置窗口中所做的更改。


单击“取消”将取消在 LEAP/EAP-FAST 设置窗口中所做的更改。


将无线适配器在验证接入点时所用的模式设置为“自动”。“自动”- 适配器会尝试使用共享方式进行验证，但如果失败，则切换到开放式验证。


将无线适配器在验证接入点时所用的模式设置为“开放”。“开放”- 允许适配器尝试进行验证而无需顾及其 WEP 设置。只有适配器与接入点上的 WEP 密钥相匹配时，它才与接入点建立关联关系。


将无线适配器在验证接入点时所用的模式设置为“共享”。“共享”- 仅允许适配器与具有相同 WEP 密钥的接入点关联。


选择 80211b/g 的传输功率（单位：毫瓦）。实际传输功率可能会受到负责管制的域或硬件条件的限制。


选择 802.11a 的传输功率（单位：毫瓦）。实际传输功率可能会受到负责管制的域或硬件条件的限制。


选择 80211b/g 或 802.11a 的传输功率（单位：毫瓦）。实际传输功率可能会受到负责管制的域或硬件条件的限制。


显示 802.11a 的可用功率。


显示信号的强度。


“配置文件管理”列表框将显示已创建的配置文件。当前的配置文件由一个图标指示。


启用 Wi-Fi 保护访问 (WPA) 安全功能。选择此安全单选按钮，然后从下拉菜单中选择 EAP 类型。单击“配置”进行设置。


启用 Wi-Fi 保护访问 (WPA) 密码短语安全功能。选择此安全单选按钮，然后单击“配置”进行设置。


启用 802.1x 安全功能。选择此安全单选按钮，然后从下拉菜单中选择 EAP 类型。单击“配置”进行设置。


启用同时在接入点和工作站上定义的预共享密钥。选择此安全单选按钮，然后单击“配置”进行设置。


无安全功能（不推荐）。


选择所要使用的安全类型对应的单选按钮，然后单击“配置”以设置安全类型。


从下拉列表中选择 Wi-Fi 保护访问 (WPA) 安全功能的 EAP 类型。单击“配置”进行设置。


从下拉列表中选择 802.1X 安全功能的 EAP 类型。单击“配置”进行设置。


将服务器名称字段留空 - 客户端将接受获得“网络证书机构”下拉列表中所列机构证书的任何服务器的证书（建议）。也可以输入向客户端颁发证书的服务器的域名。


必要时可以更改登录名。


“适配器信息”按钮中包含了有关网络接口卡（无线网络适配器）及网络驱动程序接口规格 (NDIS) 驱动程序的一般信息。


显示 802.11b/g 可用功率。


显示当前所在的国家/地区。


选中此复选框将允许无线网卡使用 Super AG 模式。


选中此复选框将允许无线网卡使用 eXtended Range (XR) 模式。


选中此复选框将允许无线网卡使用 QoS (WMM) 模式。


选中此复选框会将计算机名用作安全用户名。


选中此复选框会将 Windows 用户名用作安全用户名。


选中此复选框可以指定用户信息。


在此字段中输入用户名，以使用独立的用户名并开始验证过程。


在此字段中输入密码，以使用独立的密码并开始验证过程。


在此字段中再次输入密码，以确认此独立密码并开始验证过程。


单击以输入新域名：客户端将接受来自此域的证书。


输入新域名：客户端将接受来自此域的证书。


输入新域的登录名：客户端将接受来自此域的证书。


单击“确定”将更改域名及登录名。


单击“取消”将取消域名及登录名的更改。


单击以输入新域名：客户端将接受来自此域的证书。


在此字段中输入密码，以使用独立的密码并开始验证过程。


在此字段中再次输入密码，以确认此独立密码并开始验证过程。


选中此复选框将允许自动提供保护访问凭证。


从下拉列表中选择保护访问凭证机构。


单击“选择其他”按钮可导入其他保护访问凭证配置文件。


单击“导入”按钮可浏览并导入新的 EAP-FAST PAC。


突出显示 EAP-FAST PAC 并单击“删除”按钮可删除 EAP-FAST 配置文件。


PAC 库列表显示可用的 EAP-FAST PAC。使用本窗口可以导入或删除 EAP-FAST PAC。


单击“公用”单选按钮将仅显示公用 EAP-FAST PAC。


单击“私用”单选按钮将仅显示私用 EAP-FAST PAC。


单击“确定”将接受本窗口中所做的所有更改。


单击“取消”将关闭本窗口但不接受任何更改。


选择让系统自动提示输入用户名和密码。


选中此复选框会将配置文件设置为系统配置文件。所有用户都可以访问系统配置文件。系统配置文件还可用作模板来创建其他配置文件。


使用用户名和密码进行验证。


选择用于验证的证书。


使用证书进行验证。


允许无线网卡使用 4.9 GHz 的公用安全频带。


可以添加到扫描列表中的信息。


扫描列表中显示的信息。


在扫描列表中查看此信息。


从扫描列表中删除此信息。


上移扫描列表中选定的列。


下移扫描列表中选定的列。


中断后自动恢复会话 [仅适用于暂时失去连接的情况，而非交叉中断/恢复]。


在 Windows 登录进程启动组策略前经过的时间。


中断后自动恢复会话 [仅适用于暂时失去连接的情况，而非交叉中断/恢复]。


如果选中此框，则无法更改此配置文件中的任何设置。请与系统管理员联系。


使用 Atheros Super A/G 功能。该功能融合了多项技术，可确保最大的无线吞吐量。


??堦槩埥懡槩曐???檦? (PAC) 婘?丅


?拞崯瀥彨帺???懏槹摨堦?揑 PAC丅


堯?帺?曐???檦? (PAC)丅


从 PAC 提供的下拉列表中选择 802.1X 安全功能的 EAP 类型。 ??�攝抲�?峴?抲丅


?拞崯瀥彨嵼帺? PAC 提供婜?巊梡憡摨揑 EAP-FAST ??丅


?拞崯瀥彨巊梡?嶼婘 PAC ?峴堟搊?丅


强制澷??攝婍在注销后庢徚???宯丅


拞抐岪帺?夬蝋夛? [??梡槹??幐嫀?愙揑忣檝丆帶旕岎嵆拞抐/夬蝋]丅


?拞崯瀥彨??暈?婍丅


巜掕梫巊梡揑??婘?丅


巊梡??梡?柤榓枾?搊?丅宯?壜擻夛採帵??擖 Windows 梡?柤榓枾?丅


巊梡?嵼崯?嶼婘忋揑 Windows 梡?柤嶌???梡?柤丅


?宯?帺?採帵?擖梡?柤榓枾?丅


搊?涹庤??????掱丅


巜掕梫曐懚榓巊梡揑??梡?柤丄枾?榓堟丅


?擖??埨慡岟擻揑梡?柤丅


输入动态安全功能的密码。


廳怴?擖枾?丅


?擖堟柤


彨 Windows 搊?堟榓梡?柤??摓 RADIUS 暈?婍丅 乮?惀嘁??抲丅乯


选中此框将验证服务器。


选中此框将验证服务器。


??崯埪?壜攝抲?掕 EAP-FAST ??曽朄丅


单击此按钮可配置选定 PAC 提供验证方法。


单击此按钮可管理和组织 PAC。


单击此按钮可指定服务器或域以及登录名。


单击此按钮将保存用户名和密码设置，然后关闭对话框。


单击此按钮将关闭对话框而不保存用户名和密码设置。


单击此按钮将保存 EAP-FAST 设置，然后关闭对话框。


单击此按钮将关闭对话框而不保存 EAP-FAST 设置。


输入保护访问凭证怣懅。


输入用户名和密码信息。


单击此按钮将创建新组。


单击此按钮将关闭窗口。


捠??弌幃嵷?埥壓柺揑柦椷埪?娗棟榓?? PAC丅


输入带路径的 PAC 暥審名。


??崯埪?壜??帄強廀 PAC 暥審揑栚?丅 单击“导入”将导入选定文件。


??崯??壜彨 PAC ?擖摓巹梡懚??丅


选择崯选项壜彨 PAC 导擖摓慡嬊懚储库丅单击崯埪钮彨开巒导擖选掕 PAC丅单击崯埪钮彨关闭对话瀥丅显帵 PAC 婘?柤徧


显帵 PAC 婘? ID


显帵 PAC 柤徧


显帵 PAC 类宆


类宆壜埲惀捠摴 PAC丄计嶼婘 PAC 埥梡户 PAC


显帵 PAC 滲巭擔婜


单击崯埪钮彨关闭对话瀥丅显帵 PAC 懚储库类宆丅


懚储库类宆壜埲惀 Fresh PAC丄巹梡 PAC 埥岞梡 PAC


梡户搊录岪丆巒终巊梡梡户证书廳怴验证丅


显帵悚?巟帩揑澷线攇抜丅


廋夵选掕揑攝抲暥審怣懅丅埪壓彨删彍选掕攝抲暥審丅


尷惂梡槹查漄堟峊惂婍揑时间丆涹嵼憡应揑组崌瀥拞输擖崯时尷 (埲昩为单埵)丅


输擖昩悢 (嵟崅 300)丆擛壥经过崯时间擵岪樄嵼尝试查漄堟峊惂婍丆验证过掱彨挻时丅


堯许澷线悚?巊梡 5 GHz 榓 300 Mbps 澷线柾幃丅


堯许澷线悚?巊梡 2 GHz 榓 300 Mbps 澷线柾幃丅


连接 LAN 后，自动禁用无线 LAN，或者断开连接 LAN 后启用无线 LAN。


如果选中了此框，就不能更改传输功率。 请与系统管理员联系。


使用这些单选按钮，以便选择控制无线网络的实用程序。


选择该实用程序让 Windows 来控制无线网络。


选择该实用程序让 ACU 来控制无线网络。


选择该实用程序让任意第三方工具来控制无线网络。


选择适合漫游强度的漫游级别。