Viser de tilgængelige opfriskningshastigheder. Klik på en af de viste værdier for at ændre opfriskningshastigheden. Du kan kun vælge i CRT-tilstand.


Viser den aktuelt valgte enhed til visning af video. Klik på en af værdierne for at angive den aktuelle visningsenhed.

CRT betyder, at videoen kun vises på CRT-skærmen.

LCD betyder, at videoen kun vises på den flade skærm.

BOTH betyder, at videoen vises på både CRT-skærmen og den flade skærm.


Viser oplysninger om de aktuelt indlæste driverfiler.


Viser oplysninger om opløsning, farvedybde og tilstandsnummer for den aktuelle skærmtilstand.


Viser oplysninger om den aktuelt valgte skærm.


Hvis dette afkrydsningsfelt er markeret, benyttes Windows-standardværdien for opfriskningshastighed. Dette anbefales, da Windows automatisk vælger den bedste opfriskningshastighed, når du skifter til en anden tilstand, baseret på den aktuelle controller til de interne og eksterne skærme.

Hvis feltet ikke er markeret, er opfriskningshastigheden fast, og skærmen fungerer muligvis ikke korrekt, når du skifter til en anden tilstand.