Visualizza le velocità di scansione disponibili. Fare clic su una delle voci elencate per modificare la velocità di scansione correntemente impostata. Questa selezione è possibile solo in modo CRT mode.


Indica l’unità video correntemente selezionata. Fare clic su una delle voci per impostare l’unità video corrente.

CRT indica che verrà utilizzato solo il video CRT.

LCD indica che verrà utilizzato solo il video a schermo piatto.

ENTRAMBI indica che verranno utilizzati i video CRT e a schermo piatto contemporaneamente.


Visualizza informazioni relative ai file del programma di controllo correntemente caricato.


Visualizza informazioni sulla risoluzione e sul numero di colori del modo video corrente.


Visualizza informazioni sul video correntemente selezionato.


Se questa opzione viene selezionata, viene utilizzata la velocità di scansione predefinita per il Windows. Si raccomanda di utilizzare questa opzione in quanto, quando si imposta un diverso modo video, il Windows seleziona automaticamente la velocità di scansione ottimale a seconda del tipo di video e del relativo programma di controllo.

Se non si seleziona questa opzione, la velocità di scansione risulta fissa e, quando si imposta un diverso modo video, è possibile che il video non funzioni correttamente.