Viser tilgjengelige oppfriskningshastigheter. Klikk en av oppføringene i listen for å endre gjeldende oppfriskningshastighet. Valget er bare tilgjengelig i CRT-modus.


Angir skjermenheten som er valgt. Klikk en av dem for å angi gjeldende skjermenhet.

CRT betyr at skjermbildet blir vist bare i CRT-modus.

LCD betyr at skjermbildet blir vist bare på den flate skjermen.

BOTH betyr at skjermbildet blir vist både i CRT-modus og på den flate skjermen samtidig.


Viser informasjon om driverfilene som er lastet.


Viser informasjon om oppløsning, fargedybde og modusnummer for gjeldende skjermmodus.


Viser informasjon om skjermen som er valgt.


Hvis det er merket av for dette alternativet, brukes standard oppfriskningshastighet i Windows. Dette er anbefalt fordi Windows automatisk velger optimal oppfriskningshastighet når du bytter til en annen modus basert på gjeldende skjerm og skjermkort.

Hvis det ikke er merket av for dette alternativet, er oppfriskningshastigheten konstant, og når du endrer til en annen modus, fungerer kanskje ikke skjermen som den skal.