Visar tillgänglig uppdateringshastighet. Klicka på ett av alternativen när du ska ändra aktuell uppdateringshastighet. Det här valet kan endast användas i CRT-läge.


Visar aktuell bildskärm. Klicka på en av dem för att ange aktuell bildskärm.

CRT betyder att bilden endast visas på CRT-bildskärm.

LCD betyder att bilden endast visas på LCD-panel.

BOTH betyder att bilden visas både på CRT-bildskärm och LCD-panel samtidigt.


Visar information om de senast laddade bildskärmsfilerna.


Visar information om upplösning, färgdjup och lägesnummer för aktuellt bildskärmsläge.


Visar information om senast vald bildskärm.


Om den här kryssrutan är markerad används standarduppdateringshastigheten. Det här alternativet rekommenderas eftersom Windows automatiskt väljer optimal uppdateringshastighet när du ändrar till ett läge som baseras på aktuell bildskärm och bildskärmscontroller.

Om kryssrutan inte är markerad är uppdateringshastigheten fast och om du ändrar till ett annat läge fungerar inte bildskärmen som den ska.