Copyright: YAMAHA Corporation


OPL3-SAx settings (contents 1)
OPL3-SAx settings

In this dialog box you can make settings for the OPL3-SAx series Soft Synthesizer and tone environment.

 Mic volume setting

 ZV port

 Soft Synthesizer environment settings

 Tone environment settings


OPL3-SAx settings (contents 2)
OPL3-SAx settings

In this dialog box you can make settings for the OPL3-SAx series Soft Synthesizer and tone environment.

 Mic volume setting

 Soft Synthesizer environment settings

 Tone environment settings


OPL3-SAx settings (contents 3)
OPL3-SAx settings

In this dialog box you can make settings for the OPL3-SAx series Soft Synthesizer and tone environment.

 Mic volume setting

 ZV port

 Soft Synthesizer environment settings


OPL3-SAx settings (contents 4)
OPL3-SAx settings

In this dialog box you can make settings for the OPL3-SAx series Soft Synthesizer and tone environment.

 Mic volume setting

 Soft Synthesizer environment settings


OPL3-SAx settings (contents 5)
OPL3-SAx settings

In this dialog box you can make settings for the OPL3-SAx series Soft Synthesizer and tone environment.

 Mic volume setting

 ZV port

 Tone environment settings


OPL3-SAx settings (contents 6)
OPL3-SAx settings

In this dialog box you can make settings for the OPL3-SAx series Soft Synthesizer and tone environment.

 Mic volume setting

 Tone environment settings


Soft Synthesizer environment settings

Specify environment settings for the Soft Synthesizer.

 Tone

 Reverb

 MPU401 output


Tone

Specify the sound quality of the Soft Synthesizer. Make your selection as appropriate for your PC setup or your preference.

 Normal

 Good

 Better

 Best


Tone : Normal

Set the Soft Synthesizer sound quality.

Sampling frequency : 11025Hz

Polyphony : 16notes


Tone : Good

Set the Soft Synthesizer sound quality.

Sampling frequency : 11025Hz

Polyphony : 32notes


Tone : Better

Set the Soft Synthesizer sound quality.

Sampling frequency : 22050Hz

Polyphony : 16notes


Tone : Best

Set the Soft Synthesizer sound quality.

Sampling frequency : 22050Hz

Polyphony : 32notes


Reverb

If you select ON, reverb (reverberation) will apply to the entire performance.


MPU401 output

Select the output used for MPU401 port access in the DOS box of a Windows 95/3.1 environment.

 External sound source

 Soft GM


External sound source

An external tone generator will be used for MPU401 output (playback).


Soft GM

The Soft Synthesizer will be used for MPU401 output (playback).


Tone environment settings
Ymersion environment

Make settings for the Ymersion environment.

 Tone control

 3D enhanced

 Default


Tone control

Raise or lower the high and low sliders to control the tone of the output sound.


3D enhanced

 Raise or lower the Ymersion slider to adjust the 3D enhancement of the output sound.

 Hi-fi

 Desktop

 Notebook PC 1

 Notebook PC 2


Default

By pressing the default button you can restore the tone settings to their standard values.


Ymersion

This is proprietary Yamaha "wide stereo technology" that accentuates the spread of a conventional stereo source to create a 3-dimensional sound field using only two speakers.


3D sound

In general, 3D sound using two speakers can be broadly divided into "positioning" and "wide stereo."

"Positioning" is a technology which allows the listener's equipment to place/move the sound to the desired location in realtime. "Wide stereo" is a technology which accentuates the horizontal spread of a conventional stereo signal.


Mic volume setting

Set the Mic volume.

 MIC +20dB

 MIC L/R Mute


ZV port

This enables audio signals for the ZV port. In this case, the output of the FM synthesizer or the output of an external synthesizer being played by MPU401 output will be disabled.


MIC +20dB

The volume of the mic input will be boosted by 20 dB. Use this if the level of the external mic signal is low.


MIC L/R Mute

Turn off only one side of the mic output.


The volume of the mic input will be

boosted by 20 dB. Use this if the level

of the external mic signal is low.


Specify environment settings for

the Soft Synthesizer.


Specify the sound quality of the Soft

Synthesizer. Make your selection as

appropriate for your PC setup or your

preference.


Sampling frequency : 11025Hz

Polyphony : 16notes


Sampling frequency : 11025Hz

Polyphony : 32notes


Sampling frequency : 22050Hz

Polyphony : 16notes


Sampling frequency : 22050Hz

Polyphony : 32notes


If you select ON, reverb (reverberation)

will apply to the entire performance.


Turn reverb OFF.


Turn reverb ON.


Make settings for the Ymersion environment.


Raise or lower the high and low

sliders to control the tone of the

output sound.


Control the high range.


Control the low range.


Raise or lower the Ymersion slider

to control 3D enhancement for the

output sound.


This is proprietary Yamaha "wide

stereo technology" that accentuates

the spread of a conventional stereo

source to create a 3-dimensional sound

field using only two speakers.


A mode suitable for a system with

16 - 38 cm diameter speakers.


A mode suitable for a system with

5 - 12 cm diameter speakers.


A mode suitable for a system with

approximately 3 cm diameter speakers.


A mode suitable for a system with

approximately 1.5 cm diameter speakers.


You can press the default button

to restore the tone settings to

their standard values.


Close this dialog box and save

the changes.


Close this dialog box without saving

changes other than Tone and 3D.


Display the software version.


Display help.


Select the output for MPU401 port

access in the DOS box of a Windows

95/3.1 environment.


An external tone generator will

be used for MPU401 output (playback).


The Soft Synthesizer will be used

for MPU401 output (playback).


ZV port
This enables audio signals for the

ZV port. In this case, the output of

the FM synthesizer or the output of

an external synthesizer being played

by MPU401 output will be disabled.


No Help
There is no help topic for this item.


Turn off only one side of the mic output.


Set the Mic volume.


Generated by HelpWriter.Document end...


You can select whether to enable/disable the Soft Synthesizer.


Generated by HelpWriter.Document end...