Copyright: Audio Control Panel, Version 1.05. Copyright Aureal Semiconductor 1997.


Digital Out Tab

Output Rate

This window allows you to select the sample rate of the S/PDIF output port. When you select a new sample rate, the S/PDIF port uses the new rate immediately.