Адрес Internet или URL (Uniform Resource Locator) вашего узла Web. Адрес URL представляет собой адрес, который вводится для просмотра страниц вашего узла Web из Internet или из внутренней сети.


Путь к основной странице, используемой по умолчанию. Для просмотра текущей основной страницы нажмите соответствующую кнопку.


Для просмотра документа HTML со сведениями об управлении сервером Web нажмите кнопку "Сведения".


Для управления сервером Web нажмите кнопку "Управление".


Проверка, запущен ли личный сервер Web. Если он запущен, страницы Web могут просматриваться другими пользователями.


Если сервер Web не запущен, нажмите данную кнопку для его запуска. Нажатие кнопки позволит другим пользователям в сети просматривать страницы Web.


Кнопка остановки сервера Web. Нажатие кнопки сделает узел Web недоступным для других пользователей в сети.


Имеется справка по каждому элементу данной группы. Нажмите кнопку [image] в верхней части диалогового окна, а затем выберите нужный элемент.


Проверка, становится ли узел Web доступным для просмотра другим пользователям в сети при запуске данного компьютера.


Отображение значка личного сервера Web в области состояния панели задач.

Совет

Если данный параметр установлен, имеется возможность просматривать свойства личного сервера Web, дважды щелкая значок личного сервера Web на панели задач.


Типы служб, доступные как часть личного сервера Web.


Выберите имя службы из списка, а затем нажмите данную кнопку для запуска службы.


Остановка выбранной службы.


Изменение параметров выбранной службы.


Задание автоматического запуска службы FTP при перезапуске компьютера.


Адрес Internet узла FTP и каталог данного компьютера, который является основным корневым каталогом вашего узла FTP. Адрес Internet является адресом, который вводится пользователями для доступа к файлам вашего узла FTP. Чтобы изменить основной корневой каталог FTP, щелкните соответствующую кнопку.


Изменение основного корневого каталога узла FTP.


Включение или выключение автоматического запуска службы FTP при перезапуске компьютера.


Адрес Internet или URL (Uniform Resource Locator) для вашего узла Web и каталог компьютера, соответствующий основному корневому каталогу вашего узла Web. Адрес Internet является тем адресом, который вводится для просмотра ваших страниц Web. Чтобы изменить основной корневой каталог, нажмите кнопку его изменения.


Изменение основного корневого каталога узла Web.


Путь к основной странице узла Web, используемой по умолчанию. Эта страница отображается при попытке просмотра вашего узла Web по адресу Internet без указания страницы.

Чтобы изменить путь с основной странице, используемой по умолчанию, нажмите кнопку изменения этой страницы.


Изменение пути к основной странице, используемой по умолчанию.