Chip
The name of your graphic controller and its BIOS version.


Setting
Current refresh rate setting in registry for the selected resolution and color palette.


Resolution
Lists the resolutions that your monitor and display adapter support.  By moving the slider bar, you can see and change refresh rate for the selected resolution and color palette.


Color
Lists the color palettes that the selected resolution supports.  By clicking the list box, you can see and change refresh rate for the selected resolution and color palette.


Refresh
Lists the refresh rates that the selected resolution and color palette support.  You can change refresh rate by moving the slider bar and click Apply or OK button when ready.


Default
Setup refresh rate to the system boot up default.


Optimal
Setup refresh rate to the system optimal.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free 02
free


free 03
free


free 04
free


free 05
free


free 06
free


free 07
free


free 08
free


free 09
free


free 0a
free


free 0b
free


free 0c
free


free 0d
free


free 0e
free


free 0f
free


free 0g
free


free 0h
free


Chip
Il nome della scheda grafica e la relativa versione BIOS.


Setting
Frequenza di aggiornamento indicata attualmente nel registro per la risoluzione e la tavolozza dei colori selezionate.


Resolution
Elenca le risoluzioni consentite dal monitor e dalla scheda video in dotazione. Spostando la casella della barra, si può  visualizzare e modificare la frequenza di aggiornamento per .... [??? la risoluzione e la tavolozza dei colori selezionate ??? Missing line?].


Color
Elenca le tavolozze di colori utilizzabili con la risoluzione selezionata. Facendo clic sulla casella di riepilogo, si può visualizzare e modificare la frequenza di aggiornamento per la risoluzione e la tavolozza di colori selezionate.


Refresh
Elenca le frequenze di aggiornamento utilizzabili con la risoluzione e la tavolozza di colori selezionate. Per modificare la  frequenza di aggiornamento, spostare la casella di scorrimento, riposizionarla e premere Applica oppure OK.


Default
Ripristina la frequenza di aggiornamento predefinita utilizzata per l'avvio del sistema.


Optimal
Imposta la frequenza di aggiornamento migliore per il sistema.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free 12
free


free 13
free


free 14
free


free 15
free


free 16
free


free 17
free


free 18
free


free 19
free


free 1A
free


free 1B
free


free 1C
free


free 1D
free


free 1E
free


free 1F
free


free 20
free


free 21
free


Chip 2
Nom du contrôleur graphique et sa version BIOS.


Setting 2
Réglage actuel de la fréquence de rafraîchissement dans le registre pour la résolution et la palette de couleurs sélectionnées.


Resolution 2
Affiche la liste des résolutions prises en charge par le moniteur et l'adaptateur d'affichage. La coulisse permet d'afficher et de modifier la fréquence de rafraîchissement pour la résolution et la palette de couleurs sélectionnées.


Color 2
Affiche la liste des palettes de couleurs prises en charge par la résolution sélectionnée. Cliquer sur la zone de liste pour afficher et modifier la fréquence de rafraîchissement pour la résolution et la palette de couleurs sélectionnées.


Refresh 2
Affiche les fréquences de rafraîchissement prises en charge par la résolution et la palette de couleurs sélectionnées.  La fréquence de rafraîchissement peut être modifiée en déplaçant la coulisse et en cliquant ensuite sur le bouton Appliquer ou OK.


Default 2
Règle la fréquence de rafraîchissement sur la valeur par défaut d'initialisation du système.


Optimal 2
Règle la fréquence de rafraîchissement sur la valeur optimale du système.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free 22
free


free 23
free


free 24
free


free 25
free


free 26
free


free 27
free


free 28
free


free 29
free


free 2a
free


free 2b
free


free 2c
free


free 2d
free


free 2e
free


free 2f
free


free 2g
free


free 2h
free


Chip 3
Name des Graphik-Controllers und dessen BIOS-Version.


Setting 3
Aktuelle Einstellung der Bildwiederholfrequenz in der Registrierung für die gewählte Auflösung und Farbpalette.


Resolution 3
Listet die Auflösungen auf, die von Ihrem Monitor und Ihrer Graphikkarte unterstützt werden.  Durch Bewegen des Schiebers können Sie die Bildwiederholfrequenz für die gewählte Auflösung und Farbpalette anzeigen und ändern.


Color 3
Listet die Farbpaletten auf, die von der gewählten Auflösung unterstützt werden.  Durch Klicken auf das Listenfeld können Sie die Bildwiederholfrequenz für die gewählte Auflösung und Farbpalette anzeigen und ändern.


Refresh 3
Listet die Bildwiederholfrequenzen auf, die von der gewählten Auflösung und Farbpalette unterstützt werden. Sie können die Bildwiederholfrequenz ändern, indem Sie den Schieber bewegen und dann auf die Schaltfläche "Anwenden" bzw. "OK" klicken.


Default 3
Bildwiederholfrequenz auf Standard beim Systemstart einstellen.


Optimal 3
Optimale Einstellung für Bildwiederholfrequenz verwenden.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free 32
free


free 33
free


free 34
free


free 35
free


free 36
free


free 37
free


free 38
free


free 39
free


free 3a
free


free 3b
free


free 3c
free


free 3d
free


free 3e
free


free 3f
free


free 3g
free


free 3h
free


Chip 4
De naam van uw grafische controller en zijn BIOS-versie.


Setting 4
Huidige instelling voor vernieuwingsfrequentie in register voor de geselecteerde resolutie en kleurenpalet.


Resolution  4
Lijst van de resoluties die uw monitor en weergave-adapter ondersteunen. Wanneer u de schuifbalk verplaatst, kunt u de vernieuwingsfrequentie voor de geselecteerde resolutie en kleurenpalet zien en veranderen.


Color 4
Lijst van de kleurenpaletten die de geselecteerde resolutie ondersteunt. Wanneer u op de keuzelijst klikt, kunt u de vernieuwingsfrequentie voor de geselecteerde resolutie en kleurenpalet zien en veranderen.


Refresh 4
Lijst van de vernieuwingsfrequenties die de geselecteerde resolutie en kleurenpalet ondersteunen. U kunt de vernieuwingsfrequentie veranderen door de schuifbalk te verplaatsen en op Toepassen of OK te klikken wanneer u klaar bent.


Default  4
Vernieuwingsfrequentie instellen op de standaard bij het opstarten van het systeem.


Optimal 4
Vernieuwingsfrequentie instellen op optimale systeemwaarde.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free 42
free


free 43
free


free 44
free


free 45
free


free 46
free


free 47
free


free 48
free


free 49
free


free 4a
free


free 4b
free


free 4c
free


free 4d
free


free 4e
free


free 4f
free


free 4g
free


free 4h
free


Chip 5
Nombre de la controladora gráfica y su versión de BIOS.


Setting 5
Velocidad de refresco actual del registro de la resolución y paleta de colores seleccionadas.


Resolution 5
Enumera las resoluciones que admiten el monitor y el adaptador de pantalla. Si mueve la barra de desplazamiento podrá ver la velocidad de refresco de la resolución y paleta de colores seleccionadas.


Color 5
Enumera las paletas de colores que admite la resolución seleccionada. Haga clic en el cuadro de lista para ver y cambiar la velocidad de refresco de la resolución y paleta de colores seleccionadas.


Refresh  5
Enumera las velocidades de refresco que admite la resolución y paleta de colores seleccionadas.  Puede cambiar la velocidad de refresco si mueve la barra de desplazamiento y hace clic en "Aplicar" o "Aceptar" al terminar.


Default  5
Establecer la velocidad de refresco predeterminada inicial del equipo.


Optimal 5
Establecer la velocidad de refresco óptima del equipo.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free 52
free


free 53
free


free 54
free


free 55
free


free 56
free


free 57
free


free 58
free


free 59
free


free 5a
free


free 5b
free


free 5c
free


free 5d
free


free 5e
free


free 5f
free


free 5g
free


free 5h
free


Chip 6
Namnet på den grafiska styrenheten och dess BIOS-version.


Setting 6
Aktuell inställning för uppdateringsfrekvens i registret för den valda upplösningen och färgpaletten.


Resolution 6
Visar vilka upplösningar som bildskärmen och bildskärmsadaptern stöder.  Du kan visa och ändra uppdateringsfrekvensen för den valda upplösningen och färgpaletten genom att flytta reglaget.


Color 6
Visar vilka färgpaletter den valda upplösningen stöder. Du kan visa och ändra uppdateringsfrekvensen för den valda upplösningen och färgpaletten genom att klicka i listrutan.


Refresh 6
Visar vilka uppdateringsfrekvenser den valda upplösningen och färgpaletten stöder. Du kan ändra uppdateringsfrekvensen genom att flytta reglaget och klicka på knappen Verkställ eller OK när du är klar.


Default 6
Ställ in den uppdateringsfrekvens som är standard vid systemstart.


Optimal 6
Ställ in den optimala uppdateringsfrekvensen för systemet.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free 62
free


free 63
free


free 64
free


free 65
free


free 66
free


free 67
free


free 68
free


free 69
free


free 6a
free


free 6b
free


free 6c
free


free 6d
free


free 6e
free


free 6f
free


free 6g
free


free 6h
free


Chip 7
Navnet på din grafikkontrolenhed og dens BIOS-version.


Setting 7
Aktuelle registrerede indstilling for opdateringshastighed til den valgte opløsning og farvepalet.


Resolution 7
Viser de opløsninger, som din skærm og skærmadapter understøtter. Ved at flytte glideknappen kan du se og ændre opdateringshastigheden til den valgte opløsning og farvepalet.


Color 7
Viser de farvepaletter, som den valgte opløsning understøtter. Ved at klikke på listen kan du se og ændre opdateringshastigheden til den valgte opløsning og farvepalet.


Refresh 7
Viser de opdateringshastigheder, som den valgte opløsning og farvepalet understøtter. Du kan ændre opdateringshastigheden ved at flytte glideknappen og klikke på Anvend- eller OK- knappen, når du er klar.


Default 7
Indstil opdateringshastighed til systemets opstartsstandard.


Optimal 7
Indstil opdateringshastighed til systemets optimale.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free 72
free


free 73
free


free 74
free


free 75
free


free 76
free


free 77
free


free 78
free


free 79
free


free 7a
free


free 7b
free


free 7c
free


free 7d
free


free 7e
free


free 7f
free


free 7g
free


free 7h
free


Chip 8
Grafiikkaohjaimen nimi ja sen BIOS-versio.


Setting 8
Nykyinen päivitysvälin asetus rekisterissä valitulle tarkkuudelle ja värivalikoimalle.


Resolution 8
Näyttää tarkkuudet, joita näyttö ja näyttösovitin tukevat. Siirtämällä liukusäädinpalkkia voit nähdä ja muuttaa päivitysvälin asetuksen valitulle tarkkuudelle ja värivalikoimalle.


Color 8
Näyttää värivalikoimat, joita valittu tarkkuus tukee. Napsauttamalla luetteloruutua voit nähdä ja muuttaa päivitysvälin asetuksen valitulle tarkkuudelle ja värivalikoimalle.


Refresh 8
Näyttää päivitysvälit, joita valittu tarkkuus ja värivalikoima tukevat. Voit muuttaa päivitysväliä siirtämällä liukusäädinpalkkia ja napsauttamalla Käytä- tai OK- painiketta, kun olet valmis.


Default 8
Päivitysvälin asetus järjestelmän käynnistyksen oletusarvoksi.


Optimal 8
Päivitysvälin asetus järjestelmän optimaaliksi.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free 82
free


free 83
free


free 84
free


free 85
free


free 86
free


free 87
free


free 88
free


free 88
free


free 89
free


free 8a
free


free 8b
free


free 8c
free


free 8d
free


free 8e
free


free 8f
free


free 8g
free


Chip 9
El nombre del controlador gráfico y su versión de BIOS.


Setting 9
El valor actual de la frecuencia de actualización en el registro para la resolución y la paleta de colores seleccionadas.


Resolution 9
Enumera las resoluciones aceptadas por el monitor y el adaptador de pantalla. Al mover la barra deslizante, podrá ver y cambiar la frecuencia de actualización para la resolución y la paleta de colores seleccionadas.


Color 9
Enumera las paletas de colores aceptadas por la resolución seleccionada. Al hacer clic en el cuadro de lista, podrá ver y cambiar la frecuencia de actualización para la resolución y la paleta de colores seleccionadas.


Refresh 9
Enumera las frecuencias de actualización aceptadas por la resolución y la paleta de colores seleccionadas. Para cambiar la frecuencia de actualización, mueva la barra deslizante y haga clic en el botón Aplicar o Aceptar cuando esté listo.


Default 9
Configurar la frecuencia de actualización al valor predeterminado de arranque del sistema.


Optimal 9
Configurar la frecuencia de actualización al valor óptimo para el sistema.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free 92
free


free 93
free


free 94
free


free 95
free


free 96
free


free 97
free


free 98
free


free 99
free


free 9a
free


free 9b
free


free 9c
free


free 9d
free


free 9e
free


free 9f
free


free 9g
free


free 9h
free


Chip a
Navnet på og BIOS-versjonen til den grafiske kontrolleren.


Setting a
Gjeldende innstilling for oppdateringsfrekvensen i registeret for den valgte oppløsningen og fargepaletten.


Resolution a
Viser oppløsninger som skjermen og skjermkortet støtter. Ved å flytte på skyveren, kan du se og endre oppdateringsfrekvensen for den valgte oppløsningen og fargepaletten.


Color a
Viser fargepalettene som den valgte oppløsningen støtter. Ved å klikke i listeboksen, kan du se og endre oppdateringsfrekvensen for den valgte oppløsningen og fargepaletten.


Refresh a
Viser oppdateringsfrekvensene som den valgte oppløsningen og fargepaletten støtter. Du kan endre oppdaterings- frekvensen ved å flytte på skyvebryteren og klikke på Bruk- eller OK-knappen når du er klar.


Default a
Innstill standard oppdateringsfrekvens for systemoppstart.


Optimal a
Innstill optimal oppdateringsfrekvens for systemet.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free a2
free


free a3
free


free a4
free


free a5
free


free a6
free


free a7
free


free a8
free


free a9
free


free aa
free


free ab
free


free ac
free


free ad
free


free ae
free


free af
free


free ag
free


free ah
free


Chip b
O nome do seu controlador gráfico e da sua versão de BIOS.


Setting b
A taxa atual de atualização do registro para a resolução e paleta de cores selecionadas.


Resolution b
Lista as resoluções suportadas pelo monitor e pelo adaptador de vídeo.  Movendo a barra de ajuste, pode-se ver e alterar a taxa de atualização para a resolução e paleta de cores selecionadas.


Color b
Lista as paletas de cores suportadas pela resolução selecionada. Clicando na caixa da lista, pode-se ver e alterar a taxa de atualização da resolução e paleta de cores selecionadas.


Refresh b
Lista as taxas de atualização suportadas pela resolução e paleta de cores selecionadas. Pode-se alterar a taxa de atualização movendo a barra de ajuste e clicando no botão OK ou em Aplicar quando estiver pronto.


Default b
Define a taxa de atualização para padrão de inicialização do sistema.


Optimal b
Define a taxa de atualização para o índice ótimo do sistema.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free b2
free


free b3
free


free b4
free


free b5
free


free b6
free


free b7
free


free b8
free


free b9
free


free ba
free


free bb
free


free bc
free


free bd
free


free be
free


free bf
free


free bg
free


free bh
free


Chip c
O nome do seu controlador de gráficos e da respectiva versão BIOS.


Setting c
A configuração de taxa de restauração actual no registo para a resolução e paleta de cores seleccionadas.


Resolution c
Lista as resoluções que o seu monitor e adaptador de ecrã suportam. Ao mover a barra deslizante, poderá ver e mudar a taxa de restauração para a resolução e paleta de cores seleccionadas.


Color c
Lista as paletas de cores que a resolução seleccionada suporta. Ao premir a caixa de lista, poderá ver e mudar a taxa de restauração para a resolução e paleta de cores seleccionadas.


Refresh c
Lista as taxas de restauração que a resolução e a paleta de cores seleccionadas suportam. Poderá mudar a taxa de restauração ao mover a barra deslizante e ao premir o botão Aplicar ou OK quando estiver pronto.


Default c
A taxa de restauração da Configuração para o padrão de inicialização do sistema.


Optimal c
A taxa de restauração da Configuração para a optimização do sistema.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free c2
free


free c3
free


free c4
free


free c5
free


free c6
free


free c7
free


free c8
free


free c9
free


free ca
free


free cb
free


free cc
free


free cd
free


free ce
free


free cf
free


free cg
free


free ch
free


Chip d
The name of your graphic controller and its BIOS version.


Setting d
Current refresh rate setting in registry for the selected resolution and color palette.


Resolution d
Lists the resolutions that your monitor and display adapter support.  By moving the slider bar, you can see and change refresh rate for the selected resolution and color palette.


Color d
Lists the color palettes that the selected resolution supports.  By clicking the list box, you can see and change refresh rate for the selected resolution and color palette.


Refresh d
Lists the refresh rates that the selected resolution and color palette support.  You can change refresh rate by moving the slider bar and click Apply or OK button when ready.


Default d
Setup refresh rate to the system boot up default.


Optimal d
Setup refresh rate to the system optimal.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free d2
free


free d3
free


free d4
free


free d5
free


free d6
free


free d7
free


free d8
free


free d9
free


free da
free


free db
free


free dc
free


free dd
free


free de
free


free df
free


free dg
free


free dh
free


Chip e
‚²Žg—p‚ÌƒOƒ‰ƒtƒBƒbƒN ƒRƒ“ƒgƒ��[ƒ‰–¼‚Æ‚»‚Ì BIOS ƒo�[ƒWƒ‡ƒ“


Setting e
‘I‘ð‚³‚ê‚Ä‚¢‚é‰ð‘œ“x‚ÆƒJƒ‰�[ ƒpƒŒƒbƒg—p‚ÌƒŒƒWƒXƒgƒŠ‚É‚ ‚éŒ»�Ý‚ÌƒŠƒtƒŒƒbƒVƒ… ƒŒ�[ƒg�Ý’è


Resolution e
‚²Žg—p‚Ìƒ‚ƒjƒ^‚¨‚æ‚ÑƒfƒBƒXƒvƒŒƒC ƒAƒ_ƒvƒ^‚ªƒTƒ|�[ƒg‚·‚é‰ð‘œ“x‚ªŽ¦‚³‚ê‚Ü‚·�BƒXƒ‰ƒCƒ_ ƒo�[‚ð“®‚©‚·‚±‚Æ‚É‚æ‚è�A‘I‘ð‚³‚ê‚Ä‚¢‚é‰ð‘œ“x‚ÆƒJƒ‰�[ ƒpƒŒƒbƒg‚É‘Î‚µƒŠƒtƒŒƒbƒVƒ… ƒŒ�[ƒg‚ª•Ï‰»‚·‚é‚Ì‚ðŒ©‚é‚±‚Æ‚ª‚Å‚«‚Ü‚·�B


Color e
‘I‘ð‚³‚ê‚Ä‚¢‚é‰ð‘œ“x‚ªƒTƒ|�[ƒg‚·‚éƒJƒ‰�[ ƒpƒŒƒbƒg‚ªŽ¦‚³‚ê‚Ü‚·�BƒŠƒXƒgƒ{ƒbƒNƒX‚ðƒNƒŠƒbƒN‚·‚é‚±‚Æ‚É‚æ‚è�A‘I‘ð‚³‚ê‚Ä‚¢‚é‰ð‘œ“x‚ÆƒJƒ‰�[ ƒpƒŒƒbƒg‚É‘Î‚µƒŠƒtƒŒƒbƒVƒ… ƒŒ�[ƒg‚ª•Ï‰»‚·‚é‚Ì‚ðŒ©‚é‚±‚Æ‚ª‚Å‚«‚Ü‚·�B


Refresh e
‘I‘ð‚³‚ê‚Ä‚¢‚é‰ð‘œ“x‚ÆƒJƒ‰�[ ƒpƒŒƒbƒg‚ªƒTƒ|�[ƒg‚·‚éƒŠƒtƒŒƒbƒVƒ… ƒŒ�[ƒg‚ªŽ¦‚³‚ê‚Ü‚·�BƒXƒ‰ƒCƒ_ ƒo�[‚ð“®‚©‚µƒŠƒtƒŒƒbƒVƒ… ƒŒ�[ƒg‚ð•Ï�X�A‚»‚ê‚Å‚æ‚¯‚ê‚Î [“K—p] ‚Ü‚½‚Í [OK] ‚ðƒNƒŠƒbƒN‚µ‚Ü‚·�B


Default e
ƒŠƒtƒŒƒbƒVƒ… ƒŒ�[ƒg‚ðƒVƒXƒeƒ€‹N“®Žž‚ÌƒfƒtƒHƒ‹ƒg’l‚É�Ý’è‚µ‚Ü‚·�B


Optimal e
ƒŠƒtƒŒƒbƒVƒ… ƒŒ�[ƒg‚ðƒVƒXƒeƒ€‚Å‚Ì�Å“KƒŒƒxƒ‹‚É�Ý’è‚µ‚Ü‚·�B


Display Switch
‰æ–Ê‚Ì�o—Í‚ð�Aƒ‚ƒjƒ^�[�Aƒpƒlƒ‹�Aƒ‚ƒjƒ^�[�^ƒpƒlƒ‹�A‚s‚u‚Ì‚Ç‚ê‚©‚Ö�Ý’è‚Å‚«‚Ü‚·�B


QuickRef
ƒ^ƒXƒNƒo�[‚Ö QUICKREF ƒAƒCƒRƒ“‚ð“o˜^‚·‚é‚µ‚Ü‚·�B ‚»‚ÌƒAƒCƒRƒ“‚ðƒNƒŠƒbƒN‚·‚é‚±‚Æ‚É‚æ‚è�AƒŠƒtƒŒƒbƒVƒ…ƒŒ�[ƒg‚ð•Ï‚¦‚é‚±‚Æ‚ª‚Å‚«‚Ü‚·�B


free e2
free


free e3
free


free e4
free


free e5
free


free e6
free


free e7
free


free e8
free


free e9
free


free ea
free


free eb
free


free ec
free


free ed
free


free ee
free


free ef
free


free eg
free


free eh
free


Chip f
¹Ï§Î±±¨î¾¹¦WºÙ¤Î¨ä BIOS ª©¥»¡C


Setting f
¿ï©w¸ÑªR«×©M½Õ¦âªOµn¿ý¤¤ªº ·í«e­«·s¾ã²z³t²v³]©w­È¡C


Resolution f
¦C¥XÅã¥Ü¾¹©MÅã¥Ü°t±µ¾¹©Ò¤ä´©ªº ¸ÑªR«×¡C­Y²¾°Ê¼Ð¤Ø±ø¡A«h¥i ÀËµø©M§ïÅÜ¿ï©w¸ÑªR«×©M ½Õ¦âªOªº­«·s¾ã²z³t²v¡C


Color f
¦C¥X¿ï©w¸ÑªR«×©Ò¤ä´©ªº ½Õ¦âªO¡C­Y«ö¤@¤U¦Cªí¤è¶ô¡A«h¥i ÀËµø©M§ïÅÜ¿ï©w¸ÑªR«×©M½Õ¦âªOªº ­«·s¾ã²z³t²v¡C


Refresh f
¦C¥X¿ï©w¸ÑªR«×©M½Õ¦âªO©Ò¤ä´©ªº ­«·s¾ã²z³t²v¡C­Y²¾°Ê¼Ð¤Ø±ø¡A¨Ã¦b¾A·íªº®É­Ô «ö¤@¤U "À³¥Î" ©Î "½T©w" «ö¶s¡A«h¥i§ïÅÜ ­«·s¾ã²z³t²v¡C


Default f
±N­«·s¾ã²z³t²v³]©w¨ì¨t²Î±Ò°Ê¹w³]­È¡C


Optimal f
±N­«·s¾ã²z³t²v³]©w¨ì¨t²Î³Ì¨Î­È¡C


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free f2
free


free f3
free


free f4
free


free f5
free


free f6
free


free f7
free


free f8
free


free f9
free


free fa
free


free fb
free


free fc
free


free fd
free


free fe
free


free ff
free


free fg
free


free fh
free


Chip g
Í¼ÐÎ¿ØÖÆÆ÷Ãû³Æ¼°Æä BIOS °æ±¾¡£


Setting g
Ñ¡¶¨·Ö±æÂÊºÍµ÷É«°åÅäÖÃ±íÖÐµÄ µ±Ç°Ë¢ÐÂËÙÂÊÉè¶¨Öµ¡£


Resolution g
ÁÐ³öÏÔÊ¾Æ÷ºÍÏÔÊ¾ÊÊÅäÆ÷ËùÖ§³ÖµÄ ·Ö±æÂÊ¡£ÒÆ¶¯±ê³ßÌõ¼´¿É ¼ìÊÓºÍ¸Ä±äÑ¡¶¨·Ö±æÂÊºÍ µ÷É«°åµÄË¢ÐÂËÙÂÊ¡£


Color g
ÁÐ³öÑ¡¶¨·Ö±æÂÊÖ§³ÖµÄ µ÷É«°å¡£µ¥»÷ÁÐ±í¿ò£¬¼´¿É ¼ìÊÓºÍ¸Ä±äÑ¡¶¨·Ö±æÂÊºÍµ÷É«°åµÄ Ë¢ÐÂËÙÂÊ¡£


Refresh g
ÁÐ³öÑ¡¶¨·Ö±æÂÊºÍµ÷É«°åÖ§³ÖµÄ Ë¢ÐÂËÙÂÊ¡£ÒÆ¶¯±ê³ßÌõ£¬×¼±¸ºÃºó µ¥»÷ OK°´Å¥£¬¼´¿É¸Ä±ä Ë¢ÐÂËÙÂÊ¡£


Default g
½«Ë¢ÐÂËÙÂÊÉèÖÃÖÁÏµÍ³Æô¶¯È±Ê¡Öµ¡£


Optimal g
½«Ë¢ÐÂËÙÂÊÉèÖÃÖÁÏµÍ³×î¼ÑÖµ¡£


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free g2
free


free g3
free


free g4
free


free g5
free


free g6
free


free g7
free


free g8
free


free g9
free


free ga
free


free gb
free


free gc
free


free gd
free


free ge
free


free gf
free


free gg
free


free gh
free


Chip h
»ç¿ëÀÚÀÇ ±×·¡ÇÈ ÄÁÆ®·Ñ·¯ ÀÌ¸§°ú BIOS ¹öÀü.


Setting h
ÇØ»óµµ¿Í »ö»ó ÆÈ·¹Æ®¿¡ µî·ÏµÈ ÇöÀç Àç»ý·ü ¼³Á¤°ª.


Resolution h
»ç¿ëÀÚÀÇ ¸ð´ÏÅÍ¿Í µð½ºÇÃ·¹ÀÌ ¾î´ðÅÍ°¡ Áö¿øÇÏ´Â ÇØ»óµµ°¡ ³ª¿É´Ï´Ù.  ½½¶óÀÌ´õ ¸·´ë¸¦ ÀÌµ¿ÇÏ¿© ¼±ÅÃÇÑ ÇØ»óµµ¿Í »ö»ó ÆÈ·¹Æ®ÀÇ Àç»ý·üÀ» º¸°í º¯°æÇÒ ¼ö ÀÖ½À´Ï´Ù.


Color h
¼±ÅÃÇÑ ÇØ»óµµ°¡ Áö¿øÇÏ´Â »ö»ó ÆÈ·¹Æ®°¡ ³ª¿É´Ï´Ù.  ¸ñ·Ï »óÀÚ¸¦ ´­·¯¼­ ¼±ÅÃÇÑ ÇØ»óµµ¿Í »ö»ó ÆÈ·¹Æ®ÀÇ Àç»ý·üÀ» º¸°í º¯°æÇÒ ¼ö ÀÖ½À´Ï´Ù.


Refresh h
¼±ÅÃÇÑ ÇØ»óµµ¿Í »ö»ó ÆÈ·¹Æ®°¡ Áö¿øÇÏ´Â Àç»ý·üÀÌ ³ª¿É´Ï´Ù.  ½½¶óÀÌ´õ ÁÙÀ» ÀÌµ¿ÇÏ¿© Àç»ý·üÀ» º¯°æÇÒ ¼ö ÀÖ°í ÁØºñ°¡ µÇ¸é Àû¿ë ¶Ç´Â È®ÀÎ ´ÜÃß¸¦ ´©¸¨´Ï´Ù.


Default h
½Ã½ºÅÛ ½Ãµ¿ ±âº»°ª¿¡ Àç»ý·ü ¼³Á¤.


Optimal h
½Ã½ºÅÛ ÃÖÀûÈ­¿¡ Àç»ý·ü ¼³Á¤.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free h2
free


free h3
free


free h4
free


free h5
free


free h6
free


free h7
free


free h8
free


free h9
free


free ha
free


free hb
free


free hc
free


free hd
free


free he
free


free hf
free


free hg
free


free hh
free


Chip i
Grafikus szabályozód neve és BIOS verziója.


Setting i
A választott felbontás és a színskála felfrissítési gyakoriságának beállítása a regiszterben.


Resolution i
A felbontások, melyeket monitorod és kijelzõd adaptere támogat.  A csúszka elmozdításával láthatod és megváltoztathatod a felbontás és a színskála felfrissítésének gyakoriságát.


Color i
A színskálák, melyeket a választott felbontások támogatnak. Ha a lista dobozra kattintasz, láthatod és megváltoztathatod a választott felbontás és a színskála felfrissítésének gyakoriságát.


Refresh i
A felfrissítési gyakoriságok, melyeket a választott felbontás és a színskála támogat. A felfrissítés gyakoriságát úgy lehet megváltoztatni, hogy a csúszkát elmozdítod és, amikor készen vagy, az Alkalmazd vagy az OK gombra kattintasz.


Default i
Állítsd be a felfrissítés gyakoriságát a rendszer betöltési alapértelmezésére.


Optimal i
Állítsd be a felfrissítés gyakoriságát úgy, hogy a rendszer optimális legyen.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free i2
free


free i3
free


free i4
free


free i5
free


free i6
free


free i7
free


free i8
free


free i9
free


free ia
free


free ib
free


free ic
free


free id
free


free ie
free


free if
free


free ig
free


free ih
free


Chip j
Íàçâàíèå âàøåãî ãðàôè÷åñêîãî êîíòðîëëåðà è âåðñèÿ åãî áàçîâîé ñèñòåìû ââîäà è âûâîäà.


Setting j
Òåêóùåå çíà÷åíèå ÷àñòîòû ðåãåíåðàöèè â ðåãèñòðå äëÿ âûáðàííîãî ðàçðåøåíèÿ è öâåòîâîé ïàëèòðû.


Resolution j
Óêàçûâàåò ðàçðåøåíèÿ, êîòîðûå ïîääåðæèâàþòñÿ âàøèì ìîíèòîðîì è àäàïòåðîì äèñïëåÿ.  Ïåðåäâèãàÿ áåãóíîê äèñïëåÿ âû ìîæåòå ïðîñìîòðåòü è èçìåíèòü ÷àñòîòó ðåãåíåðàöèè äëÿ âûáðàííîãî ðàçðåøåíèÿ è öâåòîâîé ïàëèòðû.


Color j
Óêàçûâàåò öâåòîâûå ïàëèòðû, êîòîðûå ïîääåðæèâàåò âûáðàííîå ðàçðåøåíèå. Ùåëêíóâ íà ïîëå ñïèñêà, âû ìîæåòå ïðîñìîòðåòü è èçìåíèòü ÷àñòîòó ðåãåíåðàöèè äëÿ âûáðàííîãî ðàçðåøåíèÿ è öâåòîâîé ïàëèòðû.


Refresh j
Óêàçûâàåò ÷àñòîòû ðåãåíåðàöèè, êîòîðûå ïîääåðæèâàþòñÿ âûáðàííûìè ðàçðåøåíèåì è öâåòîâîé ïàëèòðîé. Âû ìîæåòå èçìåíèòü ÷àñòîòó ðåãåíåðàöèè äâèæåíèåì áåãóíêà ïîëîñû ïðîêðóòêè è íàæàòèåì êíîïêè Ïðèìåíèòü èëè ÎÊ ïîñëå òîãî, êàê âû âûáåðèòå æåëàåìóþ ÷àñòîòó.


Default j
Óñòàíîâèòü ÷àñòîòó ðåãåíåðàöèè íà ÷àñòîòó ïî óìîë÷àíèþ ïðè çàãðóçêå ñèñòåìû.


Optimal j
Óñòàíîâèòü ÷àñòîòó ðåãåíåðàöèè íà îïòèìàëüíóþ äëÿ ñèñòåìû.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free j2
free


free j3
free


free j4
free


free j5
free


free j6
free


free j7
free


free j8
free


free j9
free


free ja
free


free jb
free


free jc
free


free jd
free


free je
free


free jf
free


free jg
free


free jh
free


Chip k
Název vašeho grafického ovládaèe a jeho verze BIOS.


Setting k
Souèasný interval regenerace v registru pro zvolenou rozlišovací schopnost a barevnou paletu.


Resolution k
Uvádí rozlišovací schopnosti podporované vaším monitorem a adaptérem displeje.  Posunem jezdce mùžete znázoròovat a mìnit regeneraèní intervaly pro zvolenou rozlišovací schopnost a barevnou paletu.


Color k
Uvádí barevné palety, které jsou podporovány zvolenými rozlišovacími schopnostmi.  Kliknutím na rámeèek se seznamem mùžete znázornit a zmìnit interval regenerace pro zvolenou rozlišovací schopnost a barevnou paletu.


Refresh k
Uvádí intervaly regenerace podporované zvolenou rozlišovací schopností a barevnou paletou.  Interval regenerace mùžete zmìnit posunem jezdce a kliknutím na tlaèítko Apply nebo OK po dosažení žádaného nastavení.


Default k
Nastavit interval regenerace na standarní nastavení bootupu systému.


Optimal k
Nastavit interval regenerace na optimální nastavení systému.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free k2
free


free k3
free


free k4
free


free k5
free


free k6
free


free k7
free


free k8
free


free k9
free


free ka
free


free kb
free


free kc
free


free kd
free


free ke
free


free kf
free


free kg
free


free kh
free


Chip l
Nazwa Twojego kontrolera graficznego i jego wersji BIOS.


Setting l
Obecne ustawienie rejestru czêstotliwoœci regeneracji dla wybranej rozdzielczoœci i palety kolorów.


Resolution l
Wykaz rozdzielczoœci obs³ugiwanych przez Twój monitor i adapter ekranu. Przesuwajac suwak mo¿na sprawdziæ i zmieniæ czêstotliwoœæ regeneracji dla wybranej rozdzielczoœci i palety kolorów.


Color l
Wykaz palet kolorów obs³ugiwanych przez wybrane rozdzielczoœci. Klikniêcie na liœcie umo¿liwia sprawdzenie i zmianê czestotliwoœci regeneracji dla wybranej rozdzielczosci i palety kolorów.


Refresh l
Wykaz czêstotliwoœci regeneracji obs³ugiwanych przez wybran¹ rozdzielczoœæ i paletê kolorów. Mo¿na zmieniæ czestotliwoœæ regeneracji przesuwaj¹c suwak i klikaj¹c na przycisku Zastosuj lub OK.


Default l
Ustaw czêstotliwoœæ regeneracji zgodnie ze standardem ³adowania systemu.


Optimal l
Ustaw czêstotliwoœæ regeneracji dla optymalnego dzia³ania systemu.


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free l2
free


free l3
free


free l4
free


free l5
free


free l6
free


free l7
free


free l8
free


free l9
free


free la
free


free lb
free


free lc
free


free ld
free


free le
free


free lf
free


free lg
free


free lh
free


Chip m
ª×èÍµÑÇ¤Çº¤ØÁ¡ÃÒ¿Ô¤¢Í§·èÒ¹áÅÐÃØè¹¢Í§ BIOS


Setting m
¤èÒà«ç·µÔé§¢Í§ÍÑµÃÒ¡ÒÃ»ÃÑº»Ñ¨¨ØºÑ¹ã¹·ÐàºÕÂ¹ºÑ¹·Ö¡ÊÓËÃÑº¤ÇÒÁÅÐàÍÕÂ´áÅÐ¾ÒàÅç·ÊÕ·ÕèàÅ×Í¡


Resolution m
áÊ´§¤ÇÒÁÅÐàÍÕÂ´µèÒ§æ ·Õèà¢éÒ¡Ñ¹ä´é¡Ñº¨ÍáÊ´§¼ÅáÅÐµÑÇá»Å§¡ÒÃáÊ´§¼Å   ·èÒ¹ÊÒÁÒÃ¶àËç¹áÅÐà»ÅÕèÂ¹ÍÑµÃÒ¡ÒÃ»ÃÑº¨ÍÊÓËÃÑº¤ÇÒÁÅÐàÍÕÂ´áÅÐ¾ÒàÅç·ÊÕ·ÕèàÅ×Í¡ â´Â¡ÒÃàÅ×èÍ¹á¶ºµÑÇàÅ×èÍ¹


Color m
áÊ´§¾ÒàÅç·ÊÕµèÒ§æ ·Õèà¢éÒ¡Ñ¹ä´é¡Ñº¤ÇÒÁÅÐàÍÕÂ´·ÕèàÅ×Í¡ ·èÒ¹ÊÒÁÒÃ¶àËç¹áÅÐà»ÅÕèÂ¹ÍÑµÃÒ¡ÒÃ»ÃÑº¨ÍÊÓËÃÑº¤ÇÒÁÅÐàÍÕÂ´áÅÐ¾ÒàÅç·ÊÕ·ÕèàÅ×Í¡ â´Â¡ÒÃ¤ÅÔ¡·Õè¡ÃÍºÃÒÂ¡ÒÃ


Refresh m
áÊ´§ÍÑµÃÒ¡ÒÃ»ÃÑº¨ÍµèÒ§æ·Õèà¢éÒ¡Ñ¹ä´é¡Ñº¤ÇÒÁÅÐàÍÕÂ´áÅÐ ¾ÒàÅç·ÊÕ·ÕèàÅ×Í¡   ·èÒ¹ÊÒÁÒÃ¶à»ÅÕèÂ¹ÍÑµÃÒ¡ÒÃ »ÃÑº¨Íâ´Â¡ÒÃàÅ×èÍ¹á¶ºµÑÇàÅ×èÍ¹áÅÐ¤ÅÔ¡»ØèÁ Apply ËÃ×Í OK àÁ×èÍ¾ÃéÍÁáÅéÇ


Default m
µÑé§ÍÑµÃÒ¡ÒÃ»ÃÑº¨ÍãËéà»ç¹¤èÒ»ÃÔÂÒÂÊÓËÃÑº¡ÒÃàÃÔèÁ·Ó§Ò¹¢Í§ÃÐºº


Optimal m
µÑé§ÍÑµÃÒ¡ÒÃ»ÃÑº¨ÍãËéà»ç¹áºº·Õè´Õ·ÕèÊØ´ÊÓËÃÑºÃÐºº


Display Switch
Setup the display output to CRT, Panel, CRT/Panel, or TV.


QuickRef
Enables a QUICKREF icon on the taskbar next to the clock.  You can click this icon to change refresh rate.


free m2
free


free m3
free


free m4
free


free m5
free


free m6
free


free m7
free


free m8
free


free m9
free


free ma
free


free mb
free


free mc
free


free md
free


free me
free


free mf
free


free mg
free


free mh
free