Âêëàäêà "MHS - Îáùèå"

Ñâåäåíèÿ îá àäðåñàòàõ MHS.

Êðàòêîå èìÿ

Èìÿ, âûäåëåííîå â àäðåñíîé êíèãå.

Àäðåñ MHS

Àäðåñ MHS, ñîîòâåòñòâóþùèé äàííîìó èìåíè.

Êîìó/Êîïèÿ/ÑÊ

Äîáàâëåíèå èìåíè â ñîîòâåòñòâóþùåå àäðåñíîå ïîëå ñîîáùåíèÿ (ïðè ñîñòàâëåíèè ñîîáùåíèÿ).

<< (Ïðåäûäóùèé)

Âûâîä ïðåäûäóùåãî àäðåñà.

>> (Ñëåäóþùèé)

Âûâîä ñëåäóþùåãî àäðåñà.