Cabletron E22XX Network Adapter

This dialog box is used to select the resources to be used by the Cabletron E22XX adapter.  If the adapter resources you select conflict with the systems, the network adapter may fail to start.  Please select any of the following, to learn more about each resource:

I/O Port1

I/O Port2

DMA Channel

Alt Network Address


I/O Port1

Select the beginning of the first I/O port range to be used by the network adapter, the I/O port range cannot be used by another device in your system.  The I/O ports used by the network adapter will start at the I/O port you select and the next 32 I/O ports.


I/O Port2

Select the beginning of the second I/O port range to be used by the network adapter, the I/O port range cannot be used by another device in your system.  The I/O ports used by the network adapter will start at the I/O port you select and the next 32 I/O ports.


DMA Channel

Select the DMA Channel to be used by the network adapter.


Alt Network Address

If you dont wish to use the burned-in network address (default), enter the new address here.  The network address is hexadecimal and entered in the following format: xx-xx-xx-xx-xx-xx