Contents
Cogent EM960 PCI Ethernet Adapter

Connection Type:

AUTOSENSE

THICK/THIN

UTP

UTP/Full Duplex

UTP/Link Disabled

For Help on Help, Press F1


AUTOSENSE

Indicates that the EM960 PCI adapter will automatically detect the cable type if there is a cable connection. AUTOSENSE does not detect Full Duplex Ethernet(FDE). This is the default network interface parameter.


THICK/THIN

Overrides the physical media link configuration and sets the cable type to THICK(AUI) or THIN(BNC) depending on the connection's cable type.


UTP

Overrides the physical media link configuration and sets the adapter's cable type to twisted pair.


UTP/Full Duplex

Enables Full Duplex Ethernet on twisted pair cabling.


UTP/Link Disabled

Specifies twisted pair cabling with Link Integrity disabled for older hubs.