Copyright: Comprehensive Index
Citation: Comprehensive Index


Microsoft SNA Server Master Table of Contents
Microsoft SNA Server

Master Table of Contents

	SNA Server Enhancements Guide
	SNA Server Installation Guide
	SNA Server Administration Guide
	Managing Microsoft SNA Server
	SNA Server Planning Guide
	SNA Server TN3270 Service
	3270/5250 Applet User's Guide
	SNA Server Reference
	SNA Server Glossary
	APPC Programmer's Guide
	CPI-C Programmer's Guide
	LUA Programmer's Guide
	SNA Device Interface Specification
	3270 Emulator Interface Specification
	Comprehensive Index


Comprehensive Index - Numbers
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

6.2 LUs  See LU type 6.2

802.2 connections

See also Connections

3270 emulation

5250 emulation

a brief overview

capacity

link service

creating new

described, speeds

downstream system

NCP and SNA Server parameters

overview

settings

troubleshooting

types, speeds

VTAM

3174 controllers

3270 Applets

environment variables

keyboard mapping

MS-DOS

configuration utility

file transfer

saving configurations

starting, session display, quitting

Operator Information Area indicators

Windows, Windows NT

configurations

connecting to host application

displayed information, copying

file transfer2

macros

overview

printing screen

session settings

starting

3270 emulation

Applets for  See 3270 Applets

example configurations

host definition samples

LUs  See 3270 LUs

overview

SNA Server installation overview

with hot backup across connections

connections

host settings

illustration

LU configuration

LU pools

users, groups

with hot backup across servers

connections

host settings

illustration

LU configuration

LU pools

users, groups

3270 emulators

building

interface specification  Refer to the SNA Server 3270 Emulator Interface Specification.

3270 keyboard, mapping to Enhanced 101 keyboard

3270 LU Pools form

3270 LUs

See also Groups; Pools; Users

assigning to users or groups

being used by active user, viewing

changing order in lists seen by users or groups

configuring

a brief overview

accessing existing

assigning new

for hot backup

introduced

NCP and SNA Server parameter

properties

steps

VTAM and SNA Server parameter

copying between users and groups

copying properties between

deleting

moving to different connection

overview

pool defined

properties

range of

RUI_INIT and

user access

3270 LUs form

3270 RTM Settings form

3720 front-end processors

3725 front-end processors

3745 front-end processors

5250 Applet

configurations

connecting to AS/400 application

displayed information, copying

keyboard mapping

macros

overview

pop-up messages in

printing screen

session settings

starting

status line indicators

5250 emulation

Applet for  See 5250 Applet

client software combinations

CA/400

emulators based on APPC or EHNAPPC

NetSoft Router

overview

PC Support

configuring for

elements to configure

LU names, assigning

steps

example configurations

LUs

See also APPC LUs

local, for hot backup

local, with multiple local LUs

overview

remote

SNA Server installation overview

user and computer names, viewing

multiple local LUs

single local LU

with hot backup across servers

AS/400 and SNA Server settings

connections

local LUs

overview, illustration

remote LUs

server settings

user and computer names, viewing

users, groups

5250 emulators, APPC support

5250 keyboard, mapping to Enhanced 101 keyboard


Comprehensive Index - A
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Accept Reverse Charge setting, X.25 link service

Accept-Conversation (cmaccp)

Access rights, user

Accessibility for people with disabilities

Activation of connection

Active [Out of Date] status for server

Adapters

See also Connections; Link services

802.2

capacity

Ethernet

installation

link service for

properties

SDLC

TN3270 Service requirements

token ring

X.25

Add LU Range dialog box

Adding LUs  See LUs

Adding users, groups

5250 emulation

generally

with hot backup

with multiple local LUs

3270 emulation

generally

with hot backup

Addresses, remote network

802.2 connections

downstream systems

X.25 connections

Admin (SNA Server)

a brief overview

display

contents

introduced

modifying

initiating actions with

introduced

keys

mouse

Toolbar buttons

installing link services

introduced

menu commands

network protocol selection

offline version

performance evaluation using status information

security and

selecting

server broadcast options

Setup program

TN3270 Service and

Toolbar

upgrading, using after

window

Admin (TN3270 Service)

accessing from Setup

dialog box options

installed by Setup

session status area

vs. Setup program

Administering SNA Server

See also specific subject; Admin (SNA Server)

3270 emulation

diagnostic tools

gathering information

communication adapters, lines

configuration parameters

remote system types

system usage

host parameters

introduced

parameters required

tasks

Administrative options

Advanced peer-to-peer networking

Advanced Program to Program Communication  See APPC

Alerts

application

connections used for

link

format, subvectors

overview

SDLC failure

token ring failure

NetView

ALLOCATE

Allocate (cmallc)

Allowed code page defined

ANSI character set

API/link-service trace files

APING

APINGD

APIs  See specific API

APPC

See also 5250 emulation; APPC verbs

a brief overview

configuration, SNA Server features

CSV extensions

CSV return codes

CSVs

defined

emulators

environment variables

introduced

LUs  See APPC LUs

Registry variables

return codes

transaction programs

communication between

design, coding

invokable

invoking

overview

samples

SNA Server configuration

troubleshooting

used for 5250

Windows enhancements

Windows extensions

Windows prototype

APPC LUs

automatic partnering

configuring

deactivating LU-LU session

default for user

dependent

implicit incoming mode

implicit incoming remote

independent

invokable and invoking TPs  See APPC

local

accessing existing

assigning default to users and groups

assigning to server

copying properties

for hot backup

form

pairing with remote

properties

with multiple local LUs

mode for

overview

remote

accessing existing

assigning default to users and groups

assigning to connection

copying properties

for hot backup

form

moving to different connection

pairing with local

properties

session security

with multiple local LUs

single-system APPC

viewing status

APPC Mode Properties dialog box

APPC verbs

blocking and

categorized

CNOS

DISPLAY

functions in progress at once, number of

GET_TP_PROPERTIES

GET_TYPE

[MC_]ALLOCATE

[MC_]CONFIRM

[MC_]CONFIRMED

[MC_]DEALLOCATE

[MC_]FLUSH

[MC_]GET_ATTRIBUTES

[MC_]PREPARE_TO_RECEIVE

[MC_]RECEIVE_AND_POST

[MC_]RECEIVE_AND_WAIT

[MC_]RECEIVE_IMMEDIATE

[MC_]REQUEST_TO_SEND

[MC_]SEND_CONVERSATION

[MC_]SEND_DATA

[MC_]SEND_ERROR

[MC_]TEST_RTS

RECEIVE_ALLOCATE

summarized

TP_ENDED

TP_STARTED

using in C programs

AppleTalk

client-server communication

overview

Setup options

on clients

on servers

Application alerts

Application TPs  See Transaction programs

Applications using APPC

See also APPC; APPC verbs

communication between

CSV extensions

CSV return codes

CSVs

design, coding

introduced

invokable TPs

configuring

samples

return codes

SNA Server configuration

troubleshooting

Windows enhancements

Windows extensions

Windows prototype

Applications using CPI-C

See also Transaction programs

calls

See also specific call

for administering side information

for confirming receipt of data

for ending conversations

for getting information

for receiving data

for reporting errors

for sending data

for starting conversations

in C programs

reference introduction

communication between

communication with LU 6.2 applications

data types

introduction

OS/2 considerations

output parameters

overview

return codes

side information

strings

symbolic constants

Windows considerations

Windows CPI-C

asynchronous support

enhancements for

overview

Windows NT considerations

Applications using LUA

See also LUA; LUA verbs

compiling, linking

concepts

introduced

LUs

platforms for, considerations

portability

return codes

primary

secondary

samples

SNA considerations

VCBs

command-specific structure

common structure

defined

format

introduced

segment

APPN

Architecture, SNA

hierarchical

peer-oriented

Architecture, SNA Server

AREXEC

AREXECD

AS/400

5250 emulation, configuring for

See also 5250 emulation

elements to configure

LU names, assigning

steps

a brief overview

accessing from Windows, Windows NT  See 5250 Applet

client software combinations

CA/400

emulators based on APPC or EHNAPPC

NetSoft Router

overview

PC Support

communication with SNA servers

configuring for

connection types (list)

identifiers

remote network address setting

security and

settings

overview

with hot backup

with multiple LUs

user names, viewing  See LU names based on user names

ASCII character set

Assign Downstream LU/Pool Sessions dialog box

Assigning LUs

3270 emulation

5250 emulation (APPC)

default

local

remote

a brief overview

downstream

to pools

to users

with snacfg command

Associating downstream LUs with downstream connections

Asynchronous call completion

Asynchronous communication

canceling

completion notification

defined

message posting

Windows CPI-C support of

Asynchronous support

Asynchronous verbs

completion  See Asynchronous call completion

defined

Asynchronously receiving data

Automatic Activation Limit for mode

Automatic load balancing  See Hot backup of 3270 sessions; Hot backup of 5250 sessions; Load balancing

Automatic partnering for APPC LUs defined

Automatic tracing for DEFINE_TRACE


Planning Guide

Connections for 3270 with Hot Backup Across Connections


Planning Guide

Connection for 5250 (Multiple LU Example)


Managing Microsoft SNA Server

Basic 802.2 Settings


Administration Guide

SNA Server Adapter and Connection Capacities


Installation Guide

Configuring a DLC 802.2 Link Service

Reference

DLC (802.2) Link Service: Location and Name of Variable


Administration Guide

Initial Connection Configuration


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Planning Guide

Downstream Connections: Token Ring


Administration Guide

Configuring Host Connections


Installation Guide

0verview of SNA Server


Administration Guide

Initial Connection Configuration

Basic 802.2 Configuration

Advanced 802.2 Configuration

802.2 Settings Form

Managing Microsoft SNA Server

Basic 802.2 Settings

Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Administration Guide

Configuring Host Connections


Planning Guide

Settings to Check on 802.2 Connections


Reference

Variable for Windows-Based Clients Running the 3270 Applet


3270/5250 Applet User's Guide

Keyboard Mapping Tables


3270/5250 Applet User's Guide

Configuring the MS-DOS – Based Applet

How to Get Around in the Configuration Utility

The Environment Section

The Session Section

The Startup Section


3270/5250 Applet User's Guide

Transferring Files

The File Transfer Menu

During the Transfer


3270/5250 Applet User's Guide

Saving the Configuration


3270/5250 Applet User's Guide

Using the 3270 Applet for MS-DOS


3270/5250 Applet User's Guide

Operator Information Area (OIA) Indicators For 3270


3270/5250 Applet User's Guide

Saving a Configuration


3270/5250 Applet User's Guide

Connecting to the Host Application


3270/5250 Applet User's Guide

Copying and Pasting Displayed Information


3270/5250 Applet User's Guide

Defining File Transfer Settings (3270 Emulation Only)

Specifying the File (3270 Emulation Only)

Sending and Receiving a File (3270 Emulation Only)


3270/5250 Applet User's Guide

Using Macros


3270/5250 Applet User's Guide

Using the Applets for Windows and Windows NT


3270/5250 Applet User's Guide

Printing the Screen


3270/5250 Applet User's Guide

Defining Session Settings


3270/5250 Applet User's Guide

Starting the Applet


Planning Guide

Examples of Configurations for 3270


Reference

Sample Host Definitions

VTAM Sample Definitions for 3270

Token Ring Definition

SDLC Definition (for Switched and Leased Lines)

X.25 Definition


Installation Guide

Overview


Planning Guide

3270 Users Connecting to a Mainframe


Planning Guide

Connections for 3270 with Hot Backup Across Connections


Planning Guide

Host Settings Corresponding to Example


Planning Guide

Configuring for 3270 with Hot Backup Across Connections


Planning Guide

LUs for 3270 with Hot Backup Across Connections


Planning Guide

LU Pools for 3270 with Hot Backup Across Connections


Planning Guide

Users and Groups for 3270 with Hot Backup Across Connections


Planning Guide

Connections for 3270 with Hot Backup Across Servers


Planning Guide

Host Settings Corresponding to Example


Planning Guide

Configuring for 3270 with Hot Backup Across Servers


Planning Guide

LUs for 3270 with Hot Backup Across Servers


Planning Guide

LU Pools for 3270 with Hot Backup Across Servers


Planning Guide

Users and Groups for 3270 with Hot Backup Across Servers


LUA Programmer's Guide

LUA Code Samples in the SDK

Specifying a Filename for Table G for Code Conversion

Code Samples Using the RUI APIs

Code Samples Using the SLI APIs


3270/5250 Applet User's Guide

Keyboard Mapping Tables


Administration Guide

3270 LU Pools Form


Administration Guide

Giving Users Access to 3270 LUs

Assigning 3270 LUs to Users


Administration Guide

Viewing the Status of Servers, Connections, and LUs


Administration Guide

Giving Users Access to 3270 LUs


Managing Microsoft SNA Server

Configuring LUs


Administration Guide

Configuring Individual 3270 LUs


Administration Guide

Configuring Individual 3270 LUs


Planning Guide

LUs for 3270 with Hot Backup Across Servers

Host Settings Corresponding to Example


Administration Guide

Configuring for 3270


Administration Guide

Configuring 3270 LUs


Administration Guide

Configuring Properties for a 3270 LU


Administration Guide

Steps for Configuring for 3270


Administration Guide

Configuring 3270 LUs


Administration Guide

Copying Properties and LUs Between Users and/or Groups


Administration Guide

Copying Properties Between LUs


Administration Guide

Deleting LUs


Administration Guide

Moving an LU to a Different Connection


Planning Guide

3270 Users Connecting to a Mainframe


Administration Guide

Configuring for 3270


Administration Guide

Configuring Properties for a 3270 LU Range


Administration Guide

Configuring a Range of 3270 LUs

Configuring Numbering for a 3270 LU Range

Modifying the Extension Numbering Format

Configuring Properties for a 3270 LU Range


LUA Programmer's Guide

RUI_INIT


Administration Guide

Giving Users Access to 3270 LUs


Administration Guide

3270 LUs Form (for Ranges of LUs)


Administration Guide

3270 RTM Settings Form


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Settings to Check on 802.2 Connections


3270/5250 Applet User's Guide

Saving a Configuration


3270/5250 Applet User's Guide

Connecting to the Host Application


3270/5250 Applet User's Guide

Copying and Pasting Displayed Information


3270/5250 Applet User's Guide

Keyboard Mapping Tables


3270/5250 Applet User's Guide

Using Macros


3270/5250 Applet User's Guide

Using the Applets for Windows and Windows NT


3270/5250 Applet User's Guide

Displaying of Pop-Up Messages in the 5250 Applet


3270/5250 Applet User's Guide

Printing the Screen


3270/5250 Applet User's Guide

Session Settings for the 5250 Applet


3270/5250 Applet User's Guide

Starting the Applet


3270/5250 Applet User's Guide

5250 Applet Status Line


Planning Guide

AS/400 Clients Using CA/400


Planning Guide

5250 Clients Using Direct Windows APPC or EHNAPPC


Planning Guide

AS/400 Clients Using the NetSoft Router


Planning Guide

Software and Configurations on AS/400 Clients


Planning Guide

AS/400 Clients Using PC Support


Administration Guide

Configuring for 5250 Emulation in the AS/400 Environment


Administration Guide

Strategies for Assigning LU Names and Aliases


Administration Guide

Configuration Steps for the AS/400 Environment

Strategies for Assigning LU Names and Aliases


Planning Guide

Examples of Configurations for 5250


Planning Guide

Local LUs for 5250 with Hot Backup Across Servers


Planning Guide

Local LUs for 5250 (Multiple LU Example)


Planning Guide

5250 Users Connecting to an AS/400


Planning Guide

Remote LUs for 5250 with Hot Backup Across Servers

Remote LU for 5250 (Multiple Local LU Example)


Planning Guide

5250 Users Connecting to an AS/400


Planning Guide

Configuring for 5250 with LU Names Based on User Names

Users and Groups for 5250 (Multiple LU Example)

Server Settings for 5250 (Multiple LU Example)

Connection for 5250 (Multiple LU Example)

AS/400 and SNA Server Settings (for Server and Connection)

Remote LU for 5250 (Multiple Local LU Example)

Local LUs for 5250 (Multiple LU Example)


Planning Guide

Viewing User and Computer Names of 5250 Users


Planning Guide

AS/400 and SNA Server Settings (for Servers and Connections)


Planning Guide

Connections for 5250 with Hot Backup Across Servers


Planning Guide

Local LUs for 5250 with Hot Backup Across Servers


Planning Guide

Configuring for 5250 with Hot Backup Across Servers


Planning Guide

Remote LUs for 5250 with Hot Backup Across Servers


Planning Guide

Server Settings for 5250 with Hot Backup Across Servers


Planning Guide

Viewing User and Computer Names of 5250 Users


Planning Guide

Users and Groups for 5250 with Hot Backup Across Servers


APPC Programmer's Guide

SNA Server Enhancements to the Windows Environment

GetAppcConfig( )


3270/5250 Applet User's Guide

Keyboard Mapping Tables


Installation Guide

Configuring an X.25 Link Service


CPI-C Programmer's Guide

Accept_Conversation (cmaccp)


Planning Guide

User Rights to Access a Server from the Network


Installation Guide

Accessibility for People with Disabilities

Microsoft Services for People Who Are Deaf or Hard-of-Hearing

Access Pack for Microsoft Windows NT

Keyboard Layouts for Single-Handed Users

Microsoft Documentation on Audiocassettes, Floppy Disks, and CD-ROMs

Products for People Who Are Blind or Have Low Vision

Customizing Windows NT

Getting More Information


Administration Guide

Initial Connection Configuration


Administration Guide

Viewing the Status of Servers, Connections, and LUs


Planning Guide

Settings to Check on 802.2 Connections


Administration Guide

SNA Server Adapter and Connection Capacities


Planning Guide

Settings to Check on 802.2 Connections


Installation Guide

Adapter Support

Configuring a Link Service

Avoiding Interrupt or Address Conflicts Between Adapters


Administration Guide

Getting Started


Administration Guide

Specifying Adapter Properties in an Offline Configuration


Planning Guide

Settings to Check on SDLC Connections


TN3270 Service

System Requirements


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Settings to Check on X.25 Connections


Administration Guide

Configuring Numbering for a 3270 LU Range

Modifying the Extension Numbering Format

Configuring Numbering for an LUA LU Range

Modifying the Extension Numbering Format

Configuring Numbering for a Downstream LU Range

Modifying the Extension Numbering Format

Adding a Comment for a Downstream LU Range


Administration Guide

Assigning Default APPC LUs to Users or Groups


Planning Guide

Users and Groups for 5250 with Hot Backup Across Servers


Planning Guide

Users and Groups for 5250 (Multiple LU Example)

Server Settings for 5250 (Multiple LU Example)


Administration Guide

Adding, Viewing, or Modifying Users or Groups


Planning Guide

Users and Groups for 3270 with Hot Backup Across Servers

Users and Groups for 3270 with Hot Backup Across Connections

LU Pools for 3270 with Hot Backup Across Connections


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Downstream Connections: Token Ring


Planning Guide

Settings to Check on X.25 Connections


Administration Guide

Getting Started

Installation Guide

Using SNA Server Setup

Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

The SNA Server Admin Display


Administration Guide

The SNA Server Admin Display


Administration Guide

Modifying the SNA Server Admin Display

Options Menu

View Menu

Modifying the Display for the Users and Groups Window

Modifying the Display for the LU Pools Window


Administration Guide

Initiating Actions


Administration Guide

Initiating Actions with Keys or Toolbar Buttons


Administration Guide

Carrying Out Actions by Dragging with the Mouse


Administration Guide

Initiating Actions with Keys or Toolbar Buttons


Administration Guide

Getting Started


Administration Guide

Getting Started


Administration Guide

Initiating Actions with Menu Commands


Planning Guide

Network Protocol Choices for SNA Servers


Administration Guide

Starting the Offline Version of SNA Server Admin

Using the Offline Version of SNA Server Admin


Planning Guide

Status Information in SNA Server Admin


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Selecting Items


Planning Guide

Communication Between SNA Servers


Administration Guide

Getting Started


TN3270 Service

Pre-Installation Considerations

Server and Connection User  Fields


Administration Guide

The SNA Server Admin Display


Administration Guide

Using SNA Server Admin After Upgrading


Administration Guide

Working with Windows and Icons


TN3270 Service

Exiting Setup


TN3270 Service

Viewing TN3270 Service Session Status


TN3270 Service

Components Installed by Setup


TN3270 Service

Administering TN3270 Service

Viewing TN3270 Service Session Status


TN3270 Service

Setup Versus TN3270 Service Admin


Administration Guide

Steps for Configuring for 3270

Assigning 3270 LUs to Users


Administration Guide

Using Diagnostic Tools


Administration Guide

Communications Adapters and Lines


Administration Guide

Local and Remote Configuration Parameters


Administration Guide

Remote System Types


Administration Guide

Uses for SNA Server


Administration Guide

Working with Host Connections and 3270

Configuring Host Connections


Administration Guide

Getting Started

Basic Elements of SNA Server Configurations

Basic Tasks

Gathering Information

Communications Adapters and Lines

Remote System Types

Uses for SNA Server

Local and Remote Configuration Parameters

Commonly Required LU Parameters

Setting Up Security with SNA Server

Managing SNA Server

Using Diagnostic Tools


Administration Guide

Local and Remote Configuration Parameters

Commonly Required LU Parameters


Administration Guide

Basic Tasks


TN3270 Service

Specifying Administrative Options


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA


Reference

Alerts Used by Applications, NVAlert, and NVRunCmd

Format for Alerts Used by Applications, NVAlert, and NVRunCmd


Reference

Connections Used for NetView and RTM


Reference

Link Alert Format and Common Subvectors


Reference

Link Alerts for SDLC and Token Ring


Reference

SDLC Failure Alerts

SDLC Alert Local Logging


Reference

Token Ring Failure Alerts


Administration Guide

SNA Server NetView Extensions

APPC Programmer's Guide

Creating Specific NetView User Alerts

Managing Microsoft SNA Server

Diagnostic Information Tools

Reference

Alerts Used by Applications, NVAlert, and NVRunCmd

Format for Alerts Used by Applications, NVAlert, and NVRunCmd


APPC Programmer's Guide

APPC Verbs

[MC_]ALLOCATE


CPI-C Programmer's Guide

Allocate (cmallc)


APPC Programmer's Guide

GET_CP_CONVERT_TABLE


3270/5250 Applet User's Guide

Character Tables


APPC Programmer's Guide

COPY_TRACE_TO_FILE


CPI-C Programmer's Guide

APING and APINGD


CPI-C Programmer's Guide

APING and APINGD

Multithreaded APINGD


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA


APPC Programmer's Guide

SNA Server Features That Simplify APPC Configuration


APPC Programmer's Guide

CSV Extensions for the Windows Environment

WinCSVCleanup( )

WinAsyncCSV( )

WinCSVStartup( )


APPC Programmer's Guide

Common CSV Return Codes

Primary Return Codes

Secondary Return Codes


APPC Programmer's Guide

Common Service Verbs

Windows CSV Overview

SNA Server Asynchronous Support

Before Using Windows CSV

Creating Specific NetView User Alerts

Using CSVs in C Programs

Sample Programs

Verb Control Block

Bit Ordering

WINCSV Definition

WINCSV.H File

Issuing a CSV

Common Service Verbs

CONVERT

COPY_TRACE_TO_FILE

DEFINE_TRACE

GET_CP_CONVERT_TABLE

LOG_MESSAGE

TRANSFER_MS_DATA


Administration Guide

How LUs Work Together for APPC

APPC Programmer's Guide

APPC Definition


Planning Guide

5250 Clients Using Direct Windows APPC or EHNAPPC


Reference

APPC API


APPC Programmer's Guide

Introduction to APPC

APPC Verbs

APPC Verb Summary

Windows APPC Overview

Windows APPC Asynchronous Support

Before Using Windows APPC

Using APPC Verbs in C Programs

Verb Control Block

APPC Definition

Issuing an APPC Verb

Windows NT Considerations

Windows Considerations

Translating Service TP Names to ASCII for WIN.INI

MS-DOS Considerations

OS/2 Considerations


Reference

APPC API: Location and Name of Variable


APPC Programmer's Guide

Primary Return Codes

Secondary Return Codes


APPC Programmer's Guide

Communication Between TPs

Fundamental Terms for TPs and LUs

Sample TPs Illustrating Fundamental Concepts

Configuring and Controlling TPs

Steps for Creating TPs and the Configuration to Support Them


APPC Programmer's Guide

Designing and Coding TPs

Conversation States

Confirmation Processing

Receiving Data Asynchronously

Conversation Security

Basic and Mapped Conversations Compared

Using Invoking and Invokable TPs

Invoking TPs

Invokable TPs

How an Invokable TP is Matched to an Invoking TP's Request


Administration Guide

Invoking and Invokable TPs

APPC Programmer's Guide

Fundamental Terms for TPs and LUs

Invokable TPs

How an Invokable TP is Matched to an Invoking TP's Request

Configuring Invokable TPs

Clients Running Windows NT

Clients Running Windows Version 3.x

Clients Running OS/2

Clients Running MS-DOS

Invoking TPs and the SNA Server Configuration

Troubleshooting for Invokable TPs


Administration Guide

Invoking and Invokable TPs

APPC Programmer's Guide

Fundamental Terms for TPs and LUs

Using Invoking and Invokable TPs

Invoking TPs

Invokable TPs


Administration Guide

Transaction Programs

Invoking and Invokable TPs

Planning Guide

Communication Between SNA Servers


APPC Programmer's Guide

Sample APPC TPs in the SDK

Building the TPs

TPSETUP

TPSTART

APPC Send and Receive TPs

Multithreaded Send and Receive TPs


APPC Programmer's Guide

Invoking TPs and the SNA Server Configuration

Invokable TPs and the SNA Server Configuration

Possible Arrangements of TPs Within an SNA Network

Troubleshooting for Invokable TPs


APPC Programmer's Guide

Troubleshooting for Invokable TPs


Planning Guide

Configuring for 5250 with Hot Backup Across Servers


APPC Programmer's Guide

SNA Server Enhancements to the Windows Environment

GetAppcConfig( )

GetAppcReturnCode( )

GetCsvReturnCode( )


APPC Programmer's Guide

APPC Extensions for the Windows Environment

WinAsyncAPPC( )

WinAsyncAPPCEx( )

WinAPPCCancelAsyncRequest( )

WinAPPCCancelBlockingCall( )

WinAPPCCleanup( )

WinAPPCIsBlocking( )

WinAPPCStartup( )

WinAPPCSetBlockingHook( )

WinAPPCUnhookBlockingHook( )


APPC Programmer's Guide

WinAPPCStartup( )


Administration Guide

SNA Server Features That Simplify APPC Configuration


Administration Guide

Configuring LUs for APPC

Managing Microsoft SNA Server

Configuring for APPC (LU6.2)


Administration Guide

Resetting LUs


Administration Guide

Assigning Default APPC LUs to Users or Groups


Administration Guide

How LUs Work Together for APPC


Administration Guide

SNA Server Features That Simplify APPC Configuration

Configuring Remote APPC LU Properties


Administration Guide

SNA Server Features That Simplify APPC Configuration

Configuring Local APPC LU Properties


Administration Guide

How LUs Work Together for APPC


Administration Guide

Viewing or Modifying a Local or Remote APPC LU


Administration Guide

Assigning Default APPC LUs to Users or Groups


Administration Guide

Assigning a Local APPC LU to a Server


Administration Guide

Copying Properties Between LUs


Planning Guide

Local LUs for 5250 with Hot Backup Across Servers

Connections for 5250 with Hot Backup Across Servers

AS/400 and SNA Server Settings (for Servers and Connections)


Administration Guide

Local APPC LUs Form


Administration Guide

Pairing Local and Remote LUs


Administration Guide

Configuring Local APPC LU Properties


Planning Guide

Local LUs for 5250 (Multiple LU Example)


Administration Guide

Configuring Modes for LU-LU Pairs


Planning Guide

5250 Users Connecting to an AS/400


Administration Guide

Viewing or Modifying a Local or Remote APPC LU


Administration Guide

Assigning Default APPC LUs to Users or Groups


Administration Guide

Assigning a Remote APPC LU to a Connection


Administration Guide

Copying Properties Between LUs


Planning Guide

Remote LUs for 5250 with Hot Backup Across Servers


Administration Guide

Remote APPC LUs Form


Administration Guide

Moving an LU to a Different Connection or Server


Administration Guide

Pairing Local and Remote LUs


Administration Guide

Configuring Remote APPC LU Properties


Administration Guide

Configuring Session Security for Remote LUs


Planning Guide

Remote LU for 5250 (Multiple Local LU Example)


Administration Guide

Single-System APPC


Administration Guide

Viewing the Status of Servers, Connections, and LUs


Administration Guide

Configuring Modes for LU-LU Pairs


APPC Programmer's Guide

WinAsyncAPPCEx( )


APPC Programmer's Guide

APPC Verbs


APPC Programmer's Guide

CNOS (Change Number of Sessions)


APPC Programmer's Guide

DISPLAY


APPC Programmer's Guide

WinAsyncAPPCEx( )


APPC Programmer's Guide

GET_TP_PROPERTIES


APPC Programmer's Guide

GET_TYPE


APPC Programmer's Guide

APPC Verbs

[MC_]ALLOCATE

[MC_]CONFIRM

Multithreaded Send and Receive TPs


APPC Programmer's Guide

APPC Verbs

[MC_]CONFIRM


APPC Programmer's Guide

APPC Verbs

[MC_]CONFIRMED


APPC Programmer's Guide

APPC Verbs

[MC_]DEALLOCATE


APPC Programmer's Guide

APPC Verbs

[MC_]FLUSH


APPC Programmer's Guide

APPC Verbs

[MC_]GET_ATTRIBUTES


APPC Programmer's Guide

APPC Verbs

[MC_]PREPARE_TO_RECEIVE


APPC Programmer's Guide

APPC Verbs

[MC_]RECEIVE_AND_POST

WinAsyncAPPCEx( )


APPC Programmer's Guide

APPC Verbs

[MC_]RECEIVE_AND_WAIT

WinAsyncAPPCEx( )


APPC Programmer's Guide

APPC Verbs

[MC_]RECEIVE_IMMEDIATE


APPC Programmer's Guide

APPC Verbs

[MC_]REQUEST_TO_SEND


APPC Programmer's Guide

APPC Verbs

[MC_]SEND_CONVERSATION


APPC Programmer's Guide

APPC Verbs

[MC_]SEND_DATA


APPC Programmer's Guide

APPC Verbs

[MC_]SEND_ERROR


APPC Programmer's Guide

APPC Verbs

[MC_]TEST_RTS


APPC Programmer's Guide

RECEIVE_ALLOCATE


APPC Programmer's Guide

APPC Verb Summary


APPC Programmer's Guide

TP_ENDED


APPC Programmer's Guide

TP_STARTED


APPC Programmer's Guide

Using APPC Verbs in C Programs


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using AppleTalk


Planning Guide

Communication Between Clients and SNA Servers

Overview of Network Protocols for Clients


Planning Guide

Important Setup Options on a Client


Planning Guide

Important Setup Options on an SNA Server


Reference

Alerts Used by Applications, NVAlert, and NVRunCmd


APPC Programmer's Guide

Communication Between TPs

Fundamental Terms for TPs and LUs

Sample TPs Illustrating Fundamental Concepts

Configuring and Controlling TPs

Steps for Creating TPs and the Configuration to Support Them


APPC Programmer's Guide

CSV Extensions for the Windows Environment

WinCSVCleanup( )

WinAsyncCSV( )

WinCSVStartup( )


APPC Programmer's Guide

Primary Return Codes

Secondary Return Codes


APPC Programmer's Guide

Common Service Verbs


APPC Programmer's Guide

Designing and Coding TPs


APPC Programmer's Guide

Introduction to APPC

APPC Verbs

APPC Verb Summary

Windows APPC Overview

Windows APPC Asynchronous Support

Before Using Windows APPC

Using APPC Verbs in C Programs

Verb Control Block

APPC Definition

Issuing an APPC Verb

Windows NT Considerations

Windows Considerations

Translating Service TP Names to ASCII for WIN.INI

MS-DOS Considerations

OS/2 Considerations


APPC Programmer's Guide

Configuring Invokable TPs

Clients Running Windows NT

Clients Running Windows Version 3.x

Clients Running OS/2

Clients Running MS-DOS

Invoking TPs and the SNA Server Configuration


APPC Programmer's Guide

Sample APPC TPs in the SDK

Building the TPs

TPSETUP

TPSTART

APPC Send and Receive TPs

Multithreaded Send and Receive TPs


APPC Programmer's Guide

Primary Return Codes

Secondary Return Codes


APPC Programmer's Guide

Invoking TPs and the SNA Server Configuration


APPC Programmer's Guide

Troubleshooting for Invokable TPs


APPC Programmer's Guide

SNA Server Enhancements to the Windows Environment

GetAppcConfig( )

GetAppcReturnCode( )

GetCsvReturnCode( )


APPC Programmer's Guide

APPC Extensions for the Windows Environment

WinAsyncAPPC( )

WinAsyncAPPCEx( )

WinAPPCCancelAsyncRequest( )

WinAPPCCancelBlockingCall( )

WinAPPCCleanup( )

WinAPPCIsBlocking( )

WinAPPCStartup( )

WinAPPCSetBlockingHook( )

WinAPPCUnhookBlockingHook( )


APPC Programmer's Guide

WinAPPCStartup( )


CPI-C Programmer's Guide

Administering Side Information


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


CPI-C Programmer's Guide

Ending a Conversation


CPI-C Programmer's Guide

Getting Information


CPI-C Programmer's Guide

Receiving Data


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


CPI-C Programmer's Guide

Sending Data


CPI-C Programmer's Guide

Starting a Conversation


CPI-C Programmer's Guide

CPIC Calls in C Programs


CPI-C Programmer's Guide

CPI-C Calls


CPI-C Programmer's Guide

Communication Between TPs


CPI-C Programmer's Guide

CPIC and LU 6.2


CPI-C Programmer's Guide

Data Types


CPI-C Programmer's Guide

Introduction to CPIC


CPI-C Programmer's Guide

OS/2 Considerations


CPI-C Programmer's Guide

Validity of Output Parameters


CPI-C Programmer's Guide

Writing CPI-C Applications


CPI-C Programmer's Guide

Accept_Conversation (cmaccp)


CPI-C Programmer's Guide

Administering Side Information

Side Information


CPI-C Programmer's Guide

Strings


CPI-C Programmer's Guide

Symbolic Constants


CPI-C Programmer's Guide

Windows Considerations


CPI-C Programmer's Guide

Windows CPI-C Asynchronous Support


CPI-C Programmer's Guide

Before Using Windows CPIC


CPI-C Programmer's Guide

Windows CPIC Overview


CPI-C Programmer's Guide

Windows NT Considerations


LUA Programmer's Guide

Compiling and Linking an LUA Application


LUA Programmer's Guide

Concepts

Windows LUA Overview

Windows LUA Asynchronous Support

Before Using Windows LUA

LUs and Sessions

Configuring for LUA

LUA Verbs

Verb Summary

A Sample LUA Communication Sequence

RUI and SLI Sessions


LUA Programmer's Guide

Concepts


LUA Programmer's Guide

Resetting LUA LUs


LUA Programmer's Guide

Writing Portable Applications

Windows NT System Considerations

Windows Environment Considerations

MS-DOS System Considerations

OS/2 Considerations

SNA Considerations


LUA Programmer's Guide

Writing Portable Applications


LUA Programmer's Guide

Primary Return Codes


LUA Programmer's Guide

Secondary Return Codes


LUA Programmer's Guide

LUA Code Samples in the SDK

Specifying a Filename for Table G for Code Conversion

Code Samples Using the RUI APIs

Code Samples Using the SLI APIs


LUA Programmer's Guide

SNA Considerations

SNA Server Enhancements to the Windows Environment


LUA Programmer's Guide

SLI_OPEN VCB Structure

SLI_BID and RUI_BID VCB Structure

SLI_SEND VCB Structure


LUA Programmer's Guide

Common Structure of LUA VCBs


LUA Programmer's Guide

RUI/SLI Definition


LUA Programmer's Guide

The LUA VCB Format

Common Data Structure

Specific Data Structure


LUA Programmer's Guide

Verb Control Block


LUA Programmer's Guide

OS/2 Considerations


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA


Managing Microsoft SNA Server

SNA Model #1: Hierarchical SNA


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA


Administration Guide

SNA Architecture


CPI-C Programmer's Guide

AREXEC and AREXECD


CPI-C Programmer's Guide

AREXEC and AREXECD


Administration Guide

Configuring for 5250 Emulation in the AS/400 Environment


Administration Guide

Strategies for Assigning LU Names and Aliases


Administration Guide

Configuration Steps for the AS/400 Environment

Strategies for Assigning LU Names and Aliases


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA

Microsoft SNA Server Functions


Planning Guide

AS/400 Clients Using CA/400


Planning Guide

5250 Clients Using Direct Windows APPC or EHNAPPC


Planning Guide

AS/400 Clients Using the NetSoft Router


Planning Guide

Software and Configurations on AS/400 Clients


Planning Guide

AS/400 Clients Using PC Support


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Administration Guide

Table of Parameters for AS/400 Communication


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Planning Guide

Settings to Check on All Connections


Planning Guide

Settings to Check on 802.2 Connections


Administration Guide

Security with Windows NT, SNA Server, and Other SNA Systems


Planning Guide

Overview of Connections


Planning Guide

AS/400 and SNA Server Settings (for Servers and Connections)


Planning Guide

AS/400 and SNA Server Settings (for Server and Connection)


3270/5250 Applet User's Guide

Character Tables


Administration Guide

Associating Downstream LUs with a Downstream Connection


Administration Guide

Giving Users Access to 3270 LUs

Planning Guide

LUs for 3270 with Hot Backup Across Servers

LUs for 3270 with Hot Backup Across Connections

LU Pools for 3270 with Hot Backup Across Connections


Administration Guide

Assigning Default APPC LUs to Users or Groups


Planning Guide

Local LUs for 5250 with Hot Backup Across Servers

Local LUs for 5250 (Multiple LU Example)


Planning Guide

Remote LUs for 5250 with Hot Backup Across Servers

Remote LU for 5250 (Multiple Local LU Example)


Managing Microsoft SNA Server

Configuring for APPC (LU6.2)


Planning Guide

Creating Downstream LUs on the Host Connection


Administration Guide

Specifying the LUs in an LU Pool


Administration Guide

Giving Users Access to 3270 LUs


Planning Guide

Local LUs for 5250 (Multiple LU Example)


Administration Guide

Associating Downstream LUs with a Downstream Connection

Moving an LU to a Different Host Connection

Managing Microsoft SNA Server

Associating Downstream LUs with a Downstream Connection

Planning Guide

Associating Downstream LUs with Downstream Connections


APPC Programmer's Guide

Windows APPC Asynchronous Support

SNA Server Asynchronous Support

CPI-C Programmer's Guide

Windows CPI-C Asynchronous Support

Before Using Windows CPIC

Windows NT Considerations

Windows Considerations

LUA Programmer's Guide

Windows LUA Asynchronous Support


APPC Programmer's Guide

WinAsyncAPPC( )


APPC Programmer's Guide

WinAsyncAPPC( )


APPC Programmer's Guide

APPC Extensions for the Windows Environment


APPC Programmer's Guide

WinAsyncAPPC( )


CPI-C Programmer's Guide

Windows CPI-C Asynchronous Support

Before Using Windows CPIC


APPC Programmer's Guide

Windows APPC Asynchronous Support


APPC Programmer's Guide

Fundamental Terms for TPs and LUs


APPC Programmer's Guide

Receiving Data Asynchronously


Administration Guide

Configuring Modes for LU-LU Pairs


Administration Guide

SNA Server Features That Simplify APPC Configuration


APPC Programmer's Guide

OS/2 Considerations


Comprehensive Index - B
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Backup configuration files

Backup domain controllers

Backup, hot  See Hot backup of 3270 sessions; Hot backup of 5250 sessions

Backup servers

Banyan VINES

client logon process

client-server communication

overview

server broadcasts

Setup options

on clients

on servers

StreetTalk names

Base LU Name

downstream LUs

LUA LUs

3270 LUs

Basic conversations, APPC

ALLOCATE used with

characteristics

end of data

introduced

verbs used in, listed

Basic conversations, CPI-C

characteristics

compared to mapped

defined

introduced

logical records

Batch files, using to log on

Baud rate setting

SDLC link service

X.25 link service

BIND checking

BISYNC

Bit 0

Bit ordering

Blind users, accessibility information

Blocking

defined

do not use

Blocking calls, canceling

Branch server configuration

Broadcasts, server

configuring

introduced

network protocols for

introduction

number of

selecting, setup

BTUs, maximum length

802.2 connections

3270 example configuration

5250 example configuration

Channel connections

downstream systems

SDLC connections

X.25 connections

Buffers, memory

Byte ordering


Administration Guide

Starting the Offline Version of SNA Server Admin

TN3270 Service

Backing Up a TN3270 Configuration


Planning Guide

Deciding About Domain Controllers (Logon Servers)


Administration Guide

Configuration Files on Primary and Backup SNA Servers

Installation Guide

SNA Server Components

Installation Guide

Selecting the Server Role

Planning Guide

Deciding About Primary, Backup, and Member SNA Servers


Planning Guide

Client Logons and the Storing of Passwords


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using Banyan VINES IP


Planning Guide

Communication Between Clients and SNA Servers

Overview of Network Protocols for Clients


Planning Guide

Communication Between SNA Servers

Network Protocol Choices for SNA Servers


Planning Guide

Important Setup Options on a Client


Planning Guide

Important Setup Options on an SNA Server


Planning Guide

Network Protocol Choices for SNA Servers

Clients Using Banyan VINES IP


Administration Guide

Configuring Numbering for a Downstream LU Range


Administration Guide

Configuring Numbering for an LUA LU Range


Administration Guide

Configuring Numbering for a 3270 LU Range


APPC Programmer's Guide

APPC Verbs

[MC_]ALLOCATE


APPC Programmer's Guide

Basic and Mapped Conversations Compared


APPC Programmer's Guide

[MC_]RECEIVE_AND_POST


APPC Programmer's Guide

Fundamental Terms for TPs and LUs


APPC Programmer's Guide

APPC Verbs


CPI-C Programmer's Guide

Basic and Mapped Conversations Compared


CPI-C Programmer's Guide

Basic and Mapped Conversations Compared


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


CPI-C Programmer's Guide

Basic and Mapped Conversations Compared


Planning Guide

Client Logons and the Storing of Passwords


Installation Guide

Configuring an SDLC Link Service


Installation Guide

Configuring an X.25 Link Service


LUA Programmer's Guide

SNA Considerations


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


APPC Programmer's Guide

Bit Ordering


APPC Programmer's Guide

Bit Ordering


Installation Guide

Products for People Who Are Blind or Have Low Vision


APPC Programmer's Guide

Windows APPC Asynchronous Support

SNA Server Asynchronous Support

CPI-C Programmer's Guide

Windows CPI-C Asynchronous Support

LUA Programmer's Guide

Windows LUA Asynchronous Support


APPC Programmer's Guide

Windows Considerations


APPC Programmer's Guide

WinAPPCCancelBlockingCall( )


Planning Guide

Centralized and Branch Configurations


Administration Guide

Configuring Servers


Administration Guide

Configuring Servers


Planning Guide

Communication Between SNA Servers


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Host Settings Corresponding to Example


Planning Guide

Connections for 5250 with Hot Backup Across Servers

Connection for 5250 (Multiple LU Example)


Planning Guide

Settings to Check on Channel, DFT, and Twinax Connections


Planning Guide

Overview of Downstream Connections and LUs

Downstream Connections: Token Ring


Planning Guide

Settings to Check on SDLC Connections


Planning Guide

Settings to Check on X.25 Connections


Planning Guide

Memory Problems on Client Systems


APPC Programmer's Guide

Windows NT Considerations

CPI-C Programmer's Guide

Windows NT Considerations

LUA Programmer's Guide

Windows NT System Considerations


Comprehensive Index - C
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

C-based applications using APPC

See also APPC; APPC verbs

communication between

CSV extensions

CSV return codes

CSVs

design, coding

introduced

invokable TPs

configuring

samples

return codes

SNA Server configuration

troubleshooting

Windows enhancements

Windows extensions

Windows prototype

C-based applications using CPI-C

See also Transaction programs

calls

See also specific call

for administering side information

for confirming receipt of data

for ending conversations

for getting information

for receiving data

for reporting errors

for sending data

for starting conversations

in C programs

reference introduction

communication between

communication with LU 6.2 applications

data types

introduction

OS/2 considerations

output parameters

overview

return codes

side information

strings

symbolic constants

Windows considerations

Windows CPI-C

asynchronous support

enhancements for

overview

Windows NT considerations

C-based applications using LUA

See also LUA; LUA verbs

compiling, linking

concepts

introduced

LUs

platforms for, considerations

portability

return codes

primary

secondary

samples

SNA considerations

VCBs

command-specific structure

common structure

defined

format

introduced

segment

CA/400

Calling Microsoft

Calls  See specific API; specific call

Cancel-Conversation (cmcanc)

Capacity

adapter

connection

Cards  See Adapters; Link services

CCITT

CD-ROM

See also Installing SNA Server

contents of

creating floppy disks from

supplemental programs on

Centralized server configuration

Channel Address

Channel connections

See also Connections

advanced settings

basic settings

described, speed

initial settings

settings

viewing settings

Channel Settings form

Character sets

ANSI

ASCII

IBM Extended

types A, AE

Characteristics, conversation

Check codes

CICS

accessing from Windows, Windows NT  See 3270 Applets

definition samples

LU 6.2 and

Client Access/400

Client logons, password storage

Client messages

Client requests

network protocols

overview

Clients

See also Local clients; Remote clients; TN clients

components

defined

installing

a brief overview

from floppy disk

Intel-based

MS-DOS-based

network installation

OS/2-based

Windows-based

Windows NT-based

with TCP/IP

Intel-based

LAN Manager

Macintosh

modifying options selected during Setup

MS-DOS-based  See MS-DOS-based clients

OS/2-based  See OS/2-based clients

removing

Windows-based  See Windows-based clients

Windows for Workgroups-based  See Windows for Workgroups-based clients

Windows NT-based  See Windows NT-based clients

Client-server communication

downstream connections  See Downstream connections

network protocols  See Network protocols

overview

Windows for Workgroups settings

domain, password

overview

SYSTEM.INI

Cluster controllers

cmaccp  See Accept-Conversation

cmallc  See Allocate

cmcanc  See Cancel-Conversation

cmcfm  See Confirm

cmcfmd  See Confirmed

cmdeal  See Deallocate

cmecs  See Extract_Conversation_State

cmecsu  See Extract_Conversation_Security_User_ID

cmect  See Extract_Conversation_Type

cmemn  See Extract_Mode_Name

cmepln  See Extract_Partner_LU_Name

cmesl  See Extract_Sync_Level

cmetpn  See Extract_TP_Name

cmflus  See Flush

cminit  See Initialize_Conversation

cmptr  See Prepare_To_Receive

cmrcv  See Receive

cmrts  See Request_To_Send

cmscr  See Set_Return_Control

cmscsp  See Set_Conversation_Security_Password

cmscst  See Set_Conversation_Security_Type

cmscsu  See Set_Conversation_Security_User_ID

cmsct  See Set_Conversation_Type

cmsdt  See Set_Deallocate_Type

cmsed  See Set_Error_Direction

cmsend  See Send_Data

cmserr  See Send_Error

cmsf  See Set_Fill

cmsld  See Set_Log_Data

cmsltp  See Specify_Local_TP_Name

cmsmn  See Set_Mode_Name

cmspln  See Set_Partner_LU_Name

cmspm  See Set_Processing_Mode

cmsptr  See Set_Prepare_To_Receive_Type

cmsrt  See Set_Receive_Type

cmssl  See Set_Sync_Level

cmsst  See Set_Send_Type

cmstpn  See Set_TP_Name

cmtrts  See Test_Request_To_Send_Received

cmwait  See Wait_For_Conversation

CNOS

Code conversion

Code pages

Code samples  See Examples

Codes

error  See Error messages

program check

sense

COM port setting

SDLC link service

X.25 link service

Comm Server

compatibility with SNA Server

upgrading from

Command buttons summarized

Command requests

sense codes

SNA Server support for

Command strings

Command-line interface  See snacfg

Commands, snacfg  See snacfg

Common Programming Interface for Communications  See CPI-C

Common service verbs  See CSVs

Communication

between clients and SNA servers  See Client-server communication

between SNA servers

between SNA servers and hosts

Communication adapters  See Adapters

Communication lines

Communication sequence, example

Communications programming interface  See CPI-C

Communications throughput

See also Performance evaluation

maximizing

Completion types  See Asynchronous call completion; Synchronous verbs

Components

clients

SNA Server

TN3270 Service

CompuServe support services

Computer names

COMTBLG

Concentration, downstream system

Concentrator gateway

CONFIG.SYS, example

Configuration files

copying

installation

reopening

restoring

saving

security controls

SNA server

specifying on command line

Configuration, host

Configuration Utility, 3270 Applet for MS-DOS

Configurations

See also specific connection type; Connections

3270  See 3270 emulation

5250  See 5250 emulation

a brief overview

APPC

centralized vs. branch

CPI-C

design  See Installation planning

downstream systems  See Downstream connections; Downstream systems

host parameters

parameters required

Configurations, 3270 and 5250 Applets

creating

opening

saving

Configurations, TN3270 Service

backing up

overview

reopening

restoring

saving

Configuring

3270 Applet for MS-DOS

connections  See specific connection type; Connections

invokable TPs  See Invokable TPs

LUs  See LUs

modes

servers  See SNA servers

SNA Server  See Configurations

CONFIRM

Confirm (cmcfm)

CONFIRM conversation states

Confirmation processing

Confirmation requests  See Confirmation processing

CONFIRMED

Confirmed (cmcfmd)

CONNECTED state

Connection Activation Limits (Retry Timers)

Connection Name

Connection Properties dialog box

Connection status

diagnostic information

performance evaluation

Connections

See also specific connection type

a brief overview

capacity

communication adapters  See Adapters

copying properties

data links

defined

display in SNA Server Admin, modifying

downstream  See Downstream connections

failures  See Error messages; Errors; Events

for 3270 emulation

See also 3270 emulation

across connections

across servers

overview

for 5250 emulation

See also 5250 emulation

overview

with hot backup across servers

with multiple LUs

identifier settings

Insert Connection dialog box

link role of

moving to different server

multidrop, configuring

NetView data

overview

parameters required

sponsor  See Sponsor connections

starting

status

stopping

supported types (list)

TN3270 Service

troubleshooting

802.2

overview

SDLC

X.25

types

VTAM definition samples

XIDs

Constant RTS

Contact Retry Limit for SDLC connections

Contact Timeout for SDLC connections

Contention-loser LU defined

Contention-winner LU defined

Control Panel, protocol selection from

Control point names

Controllers, 3174

Controllers, cluster

Controllers, domain

Conventional Logical Unit Application programming interface  See LUA

Conventional memory shortage on clients

Conversation security

Conversation states

changes in, causes of

changing

example

to RECEIVE

to SEND

checks

initial

overview

summarized

Conversation verbs, APPC

See also specific verb

list

Conversations

See also Basic conversations; Conversation states; Mapped conversations; Transaction programs

calls for

characteristics

defined

LU-LU session required

maximum supported on thread

security

simultaneous

synchronization levels

types

Conversion tables

CONVERT

Convert verbs

COPY_TRACE_TO_FILE

Counters, performance

Courtesy acknowledgments

CPI-C

calls

See also specific call

for administering side information

for confirming receipt of data

for ending conversations

for getting information

for receiving data

for reporting errors

for sending data

for starting conversations

in C programs

reference introduction

communication with LU 6.2 applications

configuration

conversations  See Conversations

data types

defined

environment variables

initial conversation characteristics

introduction

output parameters

Registry variables

return codes

side information

strings

symbolic constants

symbolic destination name, configuring

transaction programs

See also Transaction programs

overview

Windows CPI-C

asynchronous support

enhancements for

overview

writing applications for

See also Transaction programs

OS/2 considerations

Windows considerations

Windows NT considerations

CPI-C Properties form

CPICRECV

CPICSEND

CPNAME identifier

Creating

configurations  See Configurations

domains

LU pools for hot backup

across connections

across servers

LUs  See LUs

transaction programs  See Transaction programs

users, groups

3270 emulation generally

3270 emulation with hot backup

5250 emulation

Critical errors

Critical section

CSVs

CONVERT

COPY_TRACE_TO_FILE

DEFINE_TRACE

defined

described

environment variables

GET_CP_CONVERT_TABLE

issuing, example

LOG_MESSAGE

parameter guidelines

Registry variables

restrictions when SnaBase not loaded

services provided to applications

TRANSFER_MS_DATA

using in C programs

Customer support services


APPC Programmer's Guide

Transaction Programs

Communication Between TPs

Fundamental Terms for TPs and LUs

Sample TPs Illustrating Fundamental Concepts

Configuring and Controlling TPs

Steps for Creating TPs and the Configuration to Support Them


APPC Programmer's Guide

CSV Extensions for the Windows Environment

WinCSVCleanup( )

WinAsyncCSV( )

WinCSVStartup( )


APPC Programmer's Guide

Common CSV Return Codes

Primary Return Codes

Secondary Return Codes


APPC Programmer's Guide

Common Service Verbs

Windows CSV Overview

SNA Server Asynchronous Support

Before Using Windows CSV


APPC Programmer's Guide

Designing and Coding TPs

Conversation States

Confirmation Processing

Receiving Data Asynchronously

Conversation Security

Basic and Mapped Conversations Compared

Using Invoking and Invokable TPs

Invoking TPs

Invokable TPs

How an Invokable TP is Matched to an Invoking TP's Request


APPC Programmer's Guide

Introduction to APPC

APPC Verbs

APPC Verb Summary

Windows APPC Overview

Windows APPC Asynchronous Support

Before Using Windows APPC

Using APPC Verbs in C Programs

Verb Control Block

APPC Definition

Issuing an APPC Verb

Windows NT Considerations

Windows Considerations

Translating Service TP Names to ASCII for WIN.INI

MS-DOS Considerations

OS/2 Considerations


APPC Programmer's Guide

Configuring Invokable TPs

Clients Running Windows NT

Clients Running Windows Version 3.x

Clients Running OS/2

Clients Running MS-DOS


APPC Programmer's Guide

Sample APPC TPs in the SDK

Building the TPs

TPSETUP

TPSTART

APPC Send and Receive TPs

Multithreaded Send and Receive TPs


APPC Programmer's Guide

Common APPC Return Codes

Primary Return Codes

Secondary Return Codes


APPC Programmer's Guide

Configuring an SNA Server to Support TPs

Invoking TPs and the SNA Server Configuration

Invokable TPs and the SNA Server Configuration

Possible Arrangements of TPs Within an SNA Network


APPC Programmer's Guide

Troubleshooting for Invokable TPs


APPC Programmer's Guide

SNA Server Enhancements to the Windows Environment

GetAppcConfig( )

GetAppcReturnCode( )

GetCsvReturnCode( )


APPC Programmer's Guide

APPC Extensions for the Windows Environment

WinAsyncAPPC( )

WinAsyncAPPCEx( )

WinAPPCCancelAsyncRequest( )

WinAPPCCancelBlockingCall( )

WinAPPCCleanup( )

WinAPPCIsBlocking( )

WinAPPCStartup( )

WinAPPCSetBlockingHook( )

WinAPPCUnhookBlockingHook( )


APPC Programmer's Guide

WinAPPCStartup( )


CPI-C Programmer's Guide

Administering Side Information


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


CPI-C Programmer's Guide

Ending a Conversation


CPI-C Programmer's Guide

Getting Information


CPI-C Programmer's Guide

Receiving Data


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


CPI-C Programmer's Guide

Sending Data


CPI-C Programmer's Guide

Starting a Conversation


CPI-C Programmer's Guide

CPIC Calls in C Programs


CPI-C Programmer's Guide

CPI-C Calls


CPI-C Programmer's Guide

Communication Between TPs

Fundamental Terms for TPs and LUs


CPI-C Programmer's Guide

CPIC and LU 6.2


CPI-C Programmer's Guide

Data Types


CPI-C Programmer's Guide

Introduction to CPIC


CPI-C Programmer's Guide

OS/2 Considerations


CPI-C Programmer's Guide

Validity of Output Parameters


CPI-C Programmer's Guide

Writing CPI-C Applications


CPI-C Programmer's Guide

Validity of Output Parameters


CPI-C Programmer's Guide

Administering Side Information

Side Information


CPI-C Programmer's Guide

Strings


CPI-C Programmer's Guide

Symbolic Constants


CPI-C Programmer's Guide

Windows Considerations


CPI-C Programmer's Guide

Windows CPI-C Asynchronous Support


CPI-C Programmer's Guide

Before Using Windows CPIC


CPI-C Programmer's Guide

Windows CPIC Overview


CPI-C Programmer's Guide

Windows NT Considerations


LUA Programmer's Guide

Compiling and Linking an LUA Application


LUA Programmer's Guide

Concepts

Windows LUA Overview

Windows LUA Asynchronous Support

Before Using Windows LUA

LUs and Sessions

Configuring for LUA

LUA Verbs

Verb Summary

A Sample LUA Communication Sequence

RUI and SLI Sessions


LUA Programmer's Guide

Concepts


LUA Programmer's Guide

Resetting LUA LUs


LUA Programmer's Guide

Windows NT System Considerations

Windows Environment Considerations

MS-DOS System Considerations

OS/2 Considerations

SNA Considerations


LUA Programmer's Guide

Writing Portable Applications


LUA Programmer's Guide

Primary Return Codes


LUA Programmer's Guide

Secondary Return Codes


LUA Programmer's Guide

LUA Code Samples in the SDK

Specifying a Filename for Table G for Code Conversion

Code Samples Using the RUI APIs

Code Samples Using the SLI APIs


LUA Programmer's Guide

SNA Considerations

SNA Server Enhancements to the Windows Environment

GetLuaReturnCode( )


LUA Programmer's Guide

Command-Specific Structure of LUA VCBs

SLI_OPEN VCB Structure

SLI_BID and RUI_BID VCB Structure

SLI_SEND VCB Structure


LUA Programmer's Guide

Verb Control Block

Common Structure of LUA VCBs

Values for lua_message_type


LUA Programmer's Guide

RUI/SLI Definition


LUA Programmer's Guide

The LUA VCB Format

Common Data Structure

Specific Data Structure


LUA Programmer's Guide

Verb Control Block


LUA Programmer's Guide

OS/2 Considerations


Planning Guide

Software and Configurations on AS/400 Clients

AS/400 Clients Using CA/400


Installation Guide

Product Support Within the United States and Canada


CPI-C Programmer's Guide

Cancel_Conversation (cmcanc)


Administration Guide

SNA Server Adapter and Connection Capacities


Administration Guide

SNA Server Adapter and Connection Capacities


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Installation Guide

Contents of the CD


Installation Guide

Client Installation from Floppy Disks

Installing Clients

Installing a Windows NT-Based Client


APPC Programmer's Guide

Sample APPC TPs in the SDK


Planning Guide

Centralized and Branch Configurations


Administration Guide

Basic Channel Configuration


Administration Guide

Advanced Channel Configuration


Administration Guide

Basic Channel Configuration


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Administration Guide

Initial Connection Configuration


Planning Guide

Settings to Check on Channel, DFT, and Twinax Connections


Administration Guide

Basic Channel Configuration


Administration Guide

Channel Settings Form


3270/5250 Applet User's Guide

Character Tables


3270/5250 Applet User's Guide

Character Tables


3270/5250 Applet User's Guide

Character Tables


APPC Programmer's Guide

CONVERT

GET_CP_CONVERT_TABLE


APPC Programmer's Guide

Basic and Mapped Conversations Compared

CPI-C Programmer's Guide

Starting a Conversation

Initial Conversation Characteristics


Reference

Program Check Codes


Reference

CICS and VTAM Sample Definitions for LU 6.2

CICS Tables

VTAM Definitions


Administration Guide

Sample CICS Configuration Screens for Use with LU 6.2


Planning Guide

Software and Configurations on AS/400 Clients

AS/400 Clients Using CA/400


Planning Guide

Client Logons and the Storing of Passwords


TN3270 Service

Client Messages


Planning Guide

Network Protocol Choices for SNA Servers

Important SNA Server Setup Options

SYSTEM.INI Setting for Clients Running Windows for Workgroups

Details About How Clients Use Protocols

Clients Using Microsoft Networking (Named Pipes)

Clients Using NetWare (IPX/SPX)

Clients Using Banyan VINES IP

Clients Using TCP/IP


Planning Guide

Communication Between Clients and SNA Servers

Network Protocol Choices for SNA Servers


Managing Microsoft SNA Server

SNA Server Components


Installation Guide

SNA Server Components


Managing Microsoft SNA Server

Installing the Client

Client Option Modification

Removing Clients

Finding Additional Information


Installation Guide

Creating a Share for Installing Clients Across the Network


Installation Guide

Client Installation from Floppy Disks


Installation Guide

Installing an MS-DOS – Based Client


Installation Guide

Creating a Share for Installing Clients Across the Network

Information Needed for Client Setup

Client Installation and the Network

Making Client Installation Available Over the Network

Client Installation from Floppy Disks


Installation Guide

Installing an OS/2 Client


Installation Guide

Installing a Client Running Windows Version 3.x


Installation Guide

Installing a Windows NT-Based Client


Planning Guide

Communication Between SNA Servers


Installation Guide

Client Installation from Floppy Disks


Installation Guide

Maximum Network Connections on Clients Using LAN Manager


Installation Guide

Preparing an SNA Server to Support Macintosh Clients


Installation Guide

Modifying Clients


Installation Guide

Installing a Client Running Windows Version 3.x

Removing SNA Server Clients


Planning Guide

Communication Between Clients and SNA Servers


Planning Guide

Domain and Password Settings for Clients Running Windows for Workgroups


Planning Guide

Adjusting Clients Running Windows for Workgroups


Planning Guide

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Managing Microsoft SNA Server

SNA Model #1: Hierarchical SNA


APPC Programmer's Guide

APPC Verbs

CNOS (Change Number of Sessions)


LUA Programmer's Guide

Specifying a Filename for Table G for Code Conversion


APPC Programmer's Guide

OS/2 Considerations

GET_CP_CONVERT_TABLE


Reference

Program Check Codes


Reference

SNA Sense Codes

Program Check Codes


Installation Guide

Configuring an SDLC Link Service


Installation Guide

Configuring an X.25 Link Service


Administration Guide

Comm Server 1.x and SNA Server Compatibility

Planning Guide

Network Protocol Choices for SNA Servers

Finding Additional Information About Client-Server Protocols


Installation Guide

Upgrading to SNA Server Version 2.1

Upgrading from Comm Server 1.x

Advantages of Upgrading Comm Server 1.x Clients

Steps for Upgrading from Comm Server 1.x

Copying Files for the Comm Server 1.x 3270 Emulator

Upgrading from SNA Server Version 2.0


Installation Guide

Using Dialog Boxes


Reference

SNA Sense Codes

Request Reject (Category X'08')

Sense Codes


Reference

Command Request Support


Administration Guide

Command String Examples

Installation Guide

Command String Examples


Planning Guide

Communication Between SNA Servers


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Administration Guide

Communications Adapters and Lines


LUA Programmer's Guide

A Sample LUA Communication Sequence


Planning Guide

Options for Maximizing Communications Throughput


Managing Microsoft SNA Server

SNA Server Components


Installation Guide

SNA Server Components


TN3270 Service

Components Installed by Setup


Installation Guide

Product Support Within the United States and Canada


Planning Guide

Viewing User and Computer Names of 5250 Users

Configuring for 5250 with LU Names Based on User Names


APPC Programmer's Guide

CONVERT

GET_CP_CONVERT_TABLE


Administration Guide

Configuring Downstream Connections and LUs


Planning Guide

Overview of Downstream Connections and LUs


Installation Guide

Installing an MS-DOS – Based Client


Administration Guide

Managing SNA Server

Configuration Files on Primary and Backup SNA Servers


Installation Guide

Installing SNA Servers

Starting the SNA Server Setup Program

Selecting the Server Role


Administration Guide

Saving and Reopening the Configuration


Administration Guide

Backing Up and Restoring the Configuration


Administration Guide

Saving and Reopening the Configuration


Administration Guide

Security with Windows NT, SNA Server, and Other SNA Systems

Increasing the Security of SNA Servers in a Domain

Resources to Consider When Establishing Security


Administration Guide

Configuration Files on Primary and Backup SNA Servers


Administration Guide

Specifying the Configuration File


Administration Guide

Configuring Host Connections

Configuring 3270 LUs

Assigning 3270 LUs to Users

Sample VTAM Parameters for a Token Ring Connection

Managing Microsoft SNA Server

Preparing the IBM SNA Host for Installation

TN3270 Service

SNA Server and Host Configuration


3270/5250 Applet User's Guide

Configuring the MS-DOS – Based Applet

How to Get Around in the Configuration Utility

The Environment Section

The Session Section

The Startup Section


Managing Microsoft SNA Server

Overview

What You Will Learn

Planning

Preparing the IBM SNA Host for Installation

Completing the Forms

Finding Additional Information


APPC Programmer's Guide

Clients Running OS/2

Clients Running MS-DOS

Invoking TPs and the SNA Server Configuration

Invokable TPs and the SNA Server Configuration

Possible Arrangements of TPs Within an SNA Network

Troubleshooting for Invokable TPs

SNA Server Features That Simplify APPC Configuration


Planning Guide

Centralized and Branch Configurations


CPI-C Programmer's Guide

Configuration


Administration Guide

Configuring Host Connections


Administration Guide

Local and Remote Configuration Parameters

Commonly Required LU Parameters


3270/5250 Applet User's Guide

Saving a Configuration

Configuring the MS-DOS – Based Applet

How to Get Around in the Configuration Utility

The Environment Section

The Session Section

The Startup Section

Saving the Configuration

Using the 3270 Applet for MS-DOS


3270/5250 Applet User's Guide

Saving a Configuration


3270/5250 Applet User's Guide

Saving a Configuration

Saving the Configuration


TN3270 Service

Reopening a TN3270 Configuration


TN3270 Service

Configuring TN3270 Service


TN3270 Service

Reopening a TN3270 Configuration


TN3270 Service

Restoring a TN3270 Configuration


TN3270 Service

Reopening a TN3270 Configuration


3270/5250 Applet User's Guide

Configuring the MS-DOS – Based Applet

How to Get Around in the Configuration Utility

The Environment Section

The Session Section

The Startup Section

Saving the Configuration

Using the 3270 Applet for MS-DOS


Managing Microsoft SNA Server

Configuring Modes


APPC Programmer's Guide

APPC Verb Summary

[MC_]CONFIRM


CPI-C Programmer's Guide

Confirm (cmcfm)


CPI-C Programmer's Guide

Conversation States


APPC Programmer's Guide

Confirmation Processing

CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors

Confirmation Processing


APPC Programmer's Guide

APPC Verb Summary

[MC_]CONFIRMED


CPI-C Programmer's Guide

Confirmed (cmcfmd)


TN3270 Service

Viewing TN3270 Service Session Status


Administration Guide

Basic 802.2 Configuration

Basic SDLC Configuration

Basic X.25 Configuration

Basic Channel Configuration


Administration Guide

Initial Connection Configuration


Administration Guide

Configuring a Downstream Connection


Administration Guide

Using Diagnostic Tools


Administration Guide

Viewing the Status of Servers, Connections, and LUs


Planning Guide

Status Information in SNA Server Admin


Managing Microsoft SNA Server

Configuring Connections


Administration Guide

SNA Server Adapter and Connection Capacities


Administration Guide

Copying Properties Between Connections


Managing Microsoft SNA Server

Connecting to the Network


Administration Guide

Getting Started

Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Administration Guide

Moving an LU to a Different Host Connection


Planning Guide

Connections for 3270 with Hot Backup Across Connections


Planning Guide

Connections for 3270 with Hot Backup Across Servers


Planning Guide

3270 Users Connecting to a Mainframe


Planning Guide

5250 Users Connecting to an AS/400


Planning Guide

Connections for 5250 with Hot Backup Across Servers


Planning Guide

Server Settings for 5250 (Multiple LU Example)


Planning Guide

Settings to Check on All Connections


Administration Guide

Configuring a Downstream Connection


Administration Guide

Determining a Connection’s Link Role


Administration Guide

Moving a Connection to a Different Server


Administration Guide

Advanced SDLC Configuration


Administration Guide

Configuring for NetView


Installation Guide

Overview of SNA Server

Setup Versus SNA Server Admin

Planning Guide

Establishing a Connection Successfully

Overview of Connections


Administration Guide

Local and Remote Configuration Parameters


Administration Guide

Starting and Stopping Servers and Connections


Administration Guide

Using Diagnostic Tools

Using Diagnostic Tools

Viewing the Status of Servers, Connections, and LUs


Administration Guide

Starting and Stopping Servers and Connections


Administration Guide

Configuring Connections

Planning Guide

Communication Between SNA Servers and Host Computers: Connections


TN3270 Service

Continuing TN3270 Service

Server and Connection User  Fields

Session Initiation


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Establishing a Connection Successfully


Planning Guide

Settings to Check on SDLC Connections


Planning Guide

Settings to Check on X.25 Connections


Administration Guide

Configuring Connections

Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Reference

Sample Host Definitions

VTAM Sample Definitions for 3270

Token Ring Definition

SDLC Definition (for Switched and Leased Lines)

X.25 Definition

CICS and VTAM Sample Definitions for LU 6.2


Administration Guide

Local and Remote Configuration Parameters

Configuring Servers

Planning Guide

Settings to Check on All Connections


Installation Guide

Configuring an SDLC Link Service


Administration Guide

Advanced SDLC Configuration


Administration Guide

Advanced SDLC Configuration


APPC Programmer's Guide

Invoking TPs

CPI-C Programmer's Guide

Invoking TPs


APPC Programmer's Guide

Invoking TPs

CPI-C Programmer's Guide

Invoking TPs


Planning Guide

Network Protocol Choices for SNA Servers


Administration Guide

Configuring Servers

Basic 802.2 Configuration

Basic SDLC Configuration

Basic X.25 Configuration

Planning Guide

Settings to Check on All Connections

Settings to Check on All Connections


Planning Guide

Settings to Check on 802.2 Connections


Managing Microsoft SNA Server

SNA Model #1: Hierarchical SNA


Planning Guide

Deciding About Domain Controllers (Logon Servers)


Planning Guide

Memory Problems on Client Systems


Administration Guide

Configuring Properties for CPI-C

APPC Programmer's Guide

Conversation Security

CPI-C Programmer's Guide

Side Information

Conversation Security


APPC Programmer's Guide

Conversation States

CPI-C Programmer's Guide

Conversation States


APPC Programmer's Guide

Conversation States

CPI-C Programmer's Guide

Conversation States


APPC Programmer's Guide

Conversation States

CPI-C Programmer's Guide

Conversation States


APPC Programmer's Guide

Conversation States

CPI-C Programmer's Guide

Conversation States


APPC Programmer's Guide

Conversation States

CPI-C Programmer's Guide

Conversation States


APPC Programmer's Guide

Conversation States

CPI-C Programmer's Guide

Conversation States


CPI-C Programmer's Guide

Conversation States


APPC Programmer's Guide

Conversation States


APPC Programmer's Guide

APPC Verbs


APPC Programmer's Guide

APPC Verbs

CPI-C Programmer's Guide

Starting a Conversation

Ending a Conversation


APPC Programmer's Guide

Basic and Mapped Conversations Compared

CPI-C Programmer's Guide

Starting a Conversation

Initial Conversation Characteristics


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


APPC Programmer's Guide

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs

Invoking TPs


APPC Programmer's Guide

Multithreaded Send and Receive TPs


Administration Guide

Configuring Properties for CPI-C

APPC Programmer's Guide

Conversation Security

CPI-C Programmer's Guide

Side Information

Conversation Security


APPC Programmer's Guide

Windows Considerations

MS-DOS Considerations

OS/2 Considerations

Multithreaded Send and Receive TPs

CPI-C Programmer's Guide

Windows NT Considerations

Windows Considerations

OS/2 Considerations


CPI-C Programmer's Guide

Confirmation Processing


APPC Programmer's Guide

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


APPC Programmer's Guide

MS-DOS Considerations

OS/2 Considerations

CONVERT

GET_CP_CONVERT_TABLE


APPC Programmer's Guide

MS-DOS Considerations

CONVERT


APPC Programmer's Guide

MS-DOS Considerations

OS/2 Considerations

CONVERT

GET_CP_CONVERT_TABLE


APPC Programmer's Guide

MS-DOS Considerations

COPY_TRACE_TO_FILE


Administration Guide

Performance Monitor Options for SNA Server

Planning Guide

Performance Monitor

TN3270 Service

Performance Counters


LUA Programmer's Guide

SNA Considerations


CPI-C Programmer's Guide

Administering Side Information


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


CPI-C Programmer's Guide

Ending a Conversation


CPI-C Programmer's Guide

Getting Information


CPI-C Programmer's Guide

Receiving Data


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


CPI-C Programmer's Guide

Sending Data


CPI-C Programmer's Guide

Starting a Conversation


CPI-C Programmer's Guide

CPIC Calls in C Programs


CPI-C Programmer's Guide

CPI-C Calls


CPI-C Programmer's Guide

CPIC and LU 6.2


CPI-C Programmer's Guide

Configuration


CPI-C Programmer's Guide

Data Types


Administration Guide

Configuring Properties for CPI-C

Planning Guide

Communication Between SNA Servers


Reference

CPI-C API


CPI-C Programmer's Guide

Initial Conversation Characteristics


CPI-C Programmer's Guide

Introduction to CPIC


CPI-C Programmer's Guide

Validity of Output Parameters


Reference

CPI-C API: Location and Names of Variables


CPI-C Programmer's Guide

Allocate (cmallc)


CPI-C Programmer's Guide

Administering Side Information

Side Information


CPI-C Programmer's Guide

Strings


CPI-C Programmer's Guide

Symbolic Constants


Administration Guide

Configuring Properties for CPI-C


CPI-C Programmer's Guide

Writing CPI-C Applications


CPI-C Programmer's Guide

Windows CPI-C Asynchronous Support


CPI-C Programmer's Guide

Before Using Windows CPIC


CPI-C Programmer's Guide

Windows CPIC Overview


CPI-C Programmer's Guide

OS/2 Considerations


CPI-C Programmer's Guide

Windows Considerations


CPI-C Programmer's Guide

Windows NT Considerations


Administration Guide

CPI-C Properties Form


CPI-C Programmer's Guide

CPI-C Send and Receive TPs


CPI-C Programmer's Guide

CPI-C Send and Receive TPs


Planning Guide

Settings to Check on All Connections


Planning Guide

Deciding About Domains and Server Roles


Planning Guide

Host Settings Corresponding to Example


Planning Guide

LU Pools for 3270 with Hot Backup Across Servers


Administration Guide

Adding, Viewing, or Modifying Users or Groups


Planning Guide

Users and Groups for 3270 with Hot Backup Across Servers

Users and Groups for 3270 with Hot Backup Across Connections


Administration Guide

Assigning Default APPC LUs to Users or Groups

Planning Guide

Users and Groups for 5250 with Hot Backup Across Servers

Users and Groups for 5250 (Multiple LU Example)


Administration Guide

Avoiding Critical Errors in Commands

APPC Programmer's Guide

Basic and Mapped Conversations Compared


APPC Programmer's Guide

OS/2 Considerations

CPI-C Programmer's Guide

OS/2 Considerations

LUA Programmer's Guide

OS/2 Considerations


APPC Programmer's Guide

MS-DOS Considerations

CONVERT


APPC Programmer's Guide

MS-DOS Considerations

COPY_TRACE_TO_FILE


APPC Programmer's Guide

MS-DOS Considerations

OS/2 Considerations

DEFINE_TRACE


APPC Programmer's Guide

Common Service Verbs


APPC Programmer's Guide

Common Service Verbs

SNA Server Asynchronous Support


Reference

CSV API


APPC Programmer's Guide

OS/2 Considerations

GET_CP_CONVERT_TABLE


APPC Programmer's Guide

Issuing a CSV


APPC Programmer's Guide

MS-DOS Considerations

LOG_MESSAGE


APPC Programmer's Guide

WINCSV.H File


Reference

CPI-C API: Location and Names of Variables


APPC Programmer's Guide

MS-DOS Considerations


APPC Programmer's Guide

Common Service Verbs


APPC Programmer's Guide

MS-DOS Considerations

OS/2 Considerations

Before Using Windows CSV

TRANSFER_MS_DATA


APPC Programmer's Guide

Using CSVs in C Programs


Installation Guide

Product Support Within the United States and Canada


Comprehensive Index - D
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Data flow control requests

Data link control  See DLC; SDLC connections

Data links

Data, purging to end of chain

Data rate setting

Data record defined

Data segments

Data structure parameter

common

specific

Data transfer, CPI-C calls for

Deadlock defined

Deaf users, accessibility information

DEALLOCATE

Deallocate (cmdeal)

Default APPC LUs

Default L3 packet size setting, X.25 link service

Default L3 window size setting, X.25 link service

DEFINE_DUMP

DEFINE_TRACE

Definitions (glossary)

Definitions, host (samples)

Delete_CPIC_Side_Information (xcmdsi)

Deleting

LUs

SNA resources

TN3270 Service

Demand, evaluating

overview

with Admin tool

with Performance Monitor

Dependent APPC

defined

LUs  See APPC LUs

Deregistering applications

Designing transaction programs  See Transaction programs

DFT connections

See also Connections

a brief overview

adapters

capacity

configuring

described, speed

link service. configuring

overview

settings

DFT LUs

configuring

numbers needed

Diagnostic tools

a brief overview

connection status

event log

Event Viewer

files created by

introduced

LU status

NetView

Performance Monitor

RTM

server status

SNA Server Admin  See SNA Server Admin

SNA Server Trace

status information

trace files

types of

Diagnostics  See Diagnostic tools; Performance evaluation; Troubleshooting connections

Dial Data for SDLC connections

Dialing

by modem

manually

Dialog boxes

command buttons summarized

defined

Direct hosting

Directory Replicator service

Directory tree

Disabilities, users with, accessibility information

Disconnecting users from TN3270 Service

DISPLAY

Display, 3270 and 5250 Applets

Display, SNA Server Admin

LU Pools window

moving split line

Options menu

Servers and Connections window

Users and Groups window

View menu

Display Model for 3270 LUs

Distributed function terminal  See DFT connections

DL-Base specification

Refer to the SNA Server 3270 Emulator Interface

DLC

DMOD, security and

Domain controllers

Domain logon

Domain name

resolution

setting during Setup

client

server

Windows for Workgroups settings

Domains

centralized SNA servers

changing

planning

noncentralized SNA servers

using multiple

Download service (product support)

Downstream connections

See also Connections

associating downstream LUs with

configuring

defined

example configuration

host (upstream) connection

illustrations

LUs  See Downstream LUs

overview

properties, configuration

Downstream LUs

See also Pools

assigned to only one host connection

associating with downstream connections

configuring

a brief overview

accessing existing

assigning new

example

guidelines

introduced

properties for

deleting

example configuration

illustrations

numbering of

overview

properties

range

Downstream PUs  See Downstream systems

Downstream systems

concentration (DSPU)

configuration

connection to host

defined

multiple

Dragging with mouse

DSPU  See Downstream connections; Downstream LUs; Downstream systems

Duplex setting, SDLC


Reference

Command Request Support


Managing Microsoft SNA Server

Connecting to the Network


LUA Programmer's Guide

SNA Considerations


Administration Guide

Advanced SDLC Configuration

Installation Guide

Configuring an X.25 Link Service


APPC Programmer's Guide

Basic and Mapped Conversations Compared

CPI-C Programmer's Guide

Basic and Mapped Conversations Compared


APPC Programmer's Guide

OS/2 Considerations

LUA Programmer's Guide

OS/2 Considerations


LUA Programmer's Guide

Common Data Structure


LUA Programmer's Guide

Specific Data Structure


CPI-C Programmer's Guide

Sending Data


APPC Programmer's Guide

OS/2 Considerations


Installation Guide

Microsoft Services for People Who Are Deaf or Hard-of-Hearing


APPC Programmer's Guide

APPC Verbs

[MC_]DEALLOCATE


CPI-C Programmer's Guide

Confirmation Processing

Deallocate (cmdeal)


Administration Guide

Adding, Viewing, or Modifying Users or Groups

Assigning Default APPC LUs to Users or Groups


Installation Guide

Configuring an X.25 Link Service


Installation Guide

Configuring an X.25 Link Service


APPC Programmer's Guide

OS/2 Considerations


APPC Programmer's Guide

MS-DOS Considerations

OS/2 Considerations

DEFINE_TRACE


Microsoft SNA Server Glossary

Microsoft SNA Server Glossary


Reference

Sample Host Definitions


CPI-C Programmer's Guide

Delete_CPIC_Side_Information (xcmdsi)


Administration Guide

Specifying the LUs in an LU Pool

TN3270 Service

Deleting an LU


Administration Guide

Deleting SNA Resources


TN3270 Service

Removing TN3270 Service


Planning Guide

Evaluating Demand and Performance on an SNA Server


Planning Guide

Status Information in SNA Server Admin


Planning Guide

Performance Monitor


Administration Guide

How LUs Work Together for APPC


APPC Programmer's Guide

Windows NT Considerations

Windows Considerations

LUA Programmer's Guide

Windows NT System Considerations

Windows Environment Considerations


Managing Microsoft SNA Server

Connecting to the Network


Administration Guide

Determining the LUs Assigned to a DFT Adapter


Administration Guide

SNA Server Adapter and Connection Capacities


Administration Guide

Configuring Connections


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Installation Guide

Configuring an X.25 Link Service


Installation Guide

Overview of SNA Server


Planning Guide

Settings to Check on Channel, DFT, and Twinax Connections


Administration Guide

Configuring a Range of 3270 LUs

Configuring a Range of LUA LUs


Administration Guide

Configuring Properties for a 3270 LU

Configuring Properties for an LUA LU


Managing Microsoft SNA Server

Overview


Administration Guide

Using Diagnostic Tools

Viewing the Status of Servers, Connections, and LUs


Administration Guide

Using Diagnostic Tools

Using Event Logs


Administration Guide

Using Event Logs

Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

Collecting Traces and Other Detailed System Information


Administration Guide

Using Diagnostic Tools


Administration Guide

Using Diagnostic Tools

Viewing the Status of Servers, Connections, and LUs


Administration Guide

Using Diagnostic Tools

Configuring for NetView

Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

Performance Monitor Options for SNA Server

Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

Using Diagnostic Tools

Configuring RTM Settings

Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

Viewing the Status of Servers, Connections, and LUs


Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

Viewing the Status of Servers, Connections, and LUs


Administration Guide

Using Diagnostic Tools

Collecting Traces and Other Detailed System Information


Administration Guide

Using Diagnostic Tools

Collecting Traces and Other Detailed System Information


Administration Guide

Basic SDLC Configuration


Administration Guide

Changing the SNA Server Dialing Method

Installation Guide

Configuring an SDLC Link Service

Command String Examples

Configuring an X.25 Link Service


Installation Guide

Configuring an SDLC Link Service

Configuring an X.25 Link Service


Installation Guide

Using Dialog Boxes


Installation Guide

Using Dialog Boxes


Planning Guide

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Administration Guide

Configuration Files on Primary and Backup SNA Servers


Reference

Directory Tree Created by Setup


Installation Guide

Accessibility for People with Disabilities


TN3270 Service

Stopping TN3270 Service


Administration Guide

Configuring the Default DISPLAY Connection

APPC Programmer's Guide

APPC Verbs

DISPLAY

DISPLAY Differences


3270/5250 Applet User's Guide

Copying and Pasting Displayed Information


Administration Guide

Modifying the Display for the LU Pools Window


Administration Guide

Moving the Split Line


Administration Guide

Options Menu


Administration Guide

Modifying the Display for the Servers and Connections Window


Administration Guide

Modifying the Display for the Users and Groups Window


Administration Guide

View Menu


Administration Guide

Configuring Properties for a 3270 LU

Configuring Properties for a 3270 LU Range

Configuring Properties for a 3270 LU Pool


APPC Programmer's Guide

OS/2 Considerations

Installation Guide

Configuring a DLC 802.2 Link Service

Managing Microsoft SNA Server

Connecting to the Network

Planning Guide

AS/400 Clients Using PC Support


Administration Guide

How SNA Server Components Provide Secure Access


Planning Guide

Deciding About Domain Controllers (Logon Servers)


Planning Guide

Client Logons and the Storing of Passwords

Domain and Password Settings for Clients Running Windows for Workgroups


TN3270 Service

Specifying Administrative Options


Planning Guide

Important Setup Options on a Client


Planning Guide

Important Setup Options on an SNA Server


Planning Guide

Domain and Password Settings for Clients Running Windows for Workgroups


Installation Guide

Planning SNA Server Domains


Administration Guide

Changing the Domain of Focus

Managing Microsoft SNA Server

Management of the SNA Server


Planning Guide

Deciding About Domains and Server Roles


Installation Guide

Planning SNA Server Domains


Administration Guide

Uses for SNA Server


Installation Guide

Product Support Within the United States and Canada


Administration Guide

Associating Downstream LUs with a Downstream Connection

Moving an LU to a Different Host Connection

Managing Microsoft SNA Server

Associating Downstream LUs with a Downstream Connection

Planning Guide

Associating Downstream LUs with Downstream Connections


Administration Guide

Configuring Downstream Connections and LUs

Managing Microsoft SNA Server

Configuring Downstream Connections and LUs


Administration Guide

Configuring Servers and Connections


Planning Guide

Overview of the Example Configuration


Planning Guide

Host Connection: SDLC


Planning Guide

Overview of the Example Configuration


Planning Guide

Example of a Configuration for Downstream Connections


Planning Guide

Downstream Connections: Token Ring


Administration Guide

Moving an LU to a Different Host Connection


Administration Guide

Associating Downstream LUs with a Downstream Connection

Moving an LU to a Different Host Connection

Managing Microsoft SNA Server

Associating Downstream LUs with a Downstream Connection

Planning Guide

Associating Downstream LUs with Downstream Connections


Managing Microsoft SNA Server

Configuring Downstream Connections and LUs


Administration Guide

Configuring Individual Downstream LUs


Administration Guide

Configuring Individual Downstream LUs


Planning Guide

Overview of the Example Configuration

Creating Downstream LUs on the Host Connection


Administration Guide

Guidelines for Downstream Connections and LUs


Administration Guide

Configuring Downstream Connections and LUs


Administration Guide

Configuring Properties for a Downstream LU


Administration Guide

Deleting LUs


Planning Guide

Overview of the Example Configuration

Creating Downstream LUs on the Host Connection


Planning Guide

Overview of the Example Configuration


Administration Guide

Configuring Properties for a Downstream LU

Adjusting the Numbering of Downstream LUs

Planning Guide

Associating Downstream LUs with Downstream Connections


Planning Guide

Example of a Configuration for Downstream Connections


Administration Guide

Configuring Properties for a Downstream LU


Administration Guide

Configuring a Range of Downstream LUs


Administration Guide

Configuring Downstream Connections and LUs


Administration Guide

Uses for SNA Server


Administration Guide

Configuring Downstream Connections and LUs


Administration Guide

Basic Elements of SNA Server Configurations

Remote System Types


Administration Guide

Configuring Downstream Connections and LUs


Administration Guide

Carrying Out Actions by Dragging with the Mouse


Administration Guide

Advanced SDLC Configuration

Planning Guide

Settings to Check on SDLC Connections


Comprehensive Index - E
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Editing LU configuration

EHNAPPC-based emulators

EIMPCS.SYS driver

Emulation

3270  See 3270 emulation

5250  See 5250 emulation

Applets for  See 3270 Applets; 5250 Applet

Enable Automatic Partnering

Encoding setting

Encryption

Enhanced 101 keyboard, mapping

to 3270 keyboard

to 5250 keyboard

Entries, Registry  See Registry variables

Environment section, 3270 Applet Configuration Utility

Environment variables

list

OS/2

Windows

Error logs

Error messages

See also Errors

546

list

sense codes

TN3270 Service

Error strings

Errors

See also Error messages; Events

critical

identifier

overview

reporting, CPI-C calls for

Establishing connections  See specific connection type; Connections

Ethernet connections

See also 802.2 connections; Connections

a brief overview

described, speeds

Evaluating hardware, demand

Evaluating performance

overview

with Admin tool

with Performance Monitor

Event logs

See also Error logs; Errors; Events

diagnostic value

event types, specifying

introduced

servers, specifying

SNA Server auditing events

interpreting

viewing

storage

TN3270 Service

trace files, compared with

viewing using Windows NT Event Viewer

Event tracing for DEFINE_TRACE

Event Viewer

Events

See also Errors; Event logs

23

182

230

2001

APPC

identifier errors

LUA

overview

Examples

3270 emulation configuration

5250 emulation configuration

APPC

changing conversation state

confirmation processing

issuing CSVs

mapped conversation

using macros in byte ordering

command strings

CONFIG.SYS

CPI-C

changing conversation state

confirmation processing

mapped conversation

using asynchronous call completion

downstream system configuration

facility data string

host definitions (VTAM)

increasing communication buffers for Router

LUA

communication sequence

using macros in byte ordering

NVALERT.INI

SNA Server installation

specifying link identifier for Router

tracing

Extension numbering format, modifying

Extensions for Windows environment (APPC)

GetAppcConfig

GetAppcReturnCode

GetCsvReturnCode

introduced

WinAPPCCancelAsyncRequest

WinAPPCCancelBlockingCall

WinAPPCCleanup

WinAPPCIsBlocking

WinAPPCSetBlockingHook

WinAPPCStartup

WinAPPCUnhookBlockingHook

WinAsyncAPPC

WinAsyncAPPCEx

WinAsyncCSV

WinCSVCleanup

WinCSVStartup

Extensions for Windows environment (CPI-C)

data, receiving

introduced

WinCPICCleanup

WinCPICIsBlocking

WinCPICSetBlockingHook

WinCPICStartup

WinCPICUnhookBlockingHook

Extensions for Windows environment (LUA)

GetLuaReturnCode

introduced

RUI/SLI

WinRUI/WinSLI

WinRUICleanup/WinSLICleanup

WinRUIGetLastInitStatus

WinRUIStartup/WinSLIStartup

Extract_Conversation_Security_Type (xcecst)

Extract_Conversation_Security_User_ID (cmecsu)

Extract_Conversation_State (cmecs)

Extract_Conversation_Type (cmect)

Extract_CPIC_Side_Information (xcmesi)

Extracting information, CPI-C calls for

Extract_Mode_Name (cmemn)

Extract_Partner_LU_Name (cmepln)

Extract_Sync_Level (cmesl)

Extract_TP_Name (cmetpn)


TN3270 Service

Editing a TN3270 LU Configuration


Planning Guide

5250 Clients Using Direct Windows APPC or EHNAPPC


Installation Guide

Installing an MS-DOS – Based Client


Administration Guide

Configuring Local APPC LU Properties

Configuring Remote APPC LU Properties

Configuring Modes for LU-LU Pairs


Administration Guide

Advanced SDLC Configuration

Installation Guide

Configuring an X.25 Link Service

Planning Guide

Settings to Check on SDLC Connections


LUA Programmer's Guide

RUI_INIT


3270/5250 Applet User's Guide

Keyboard Mapping Tables


3270/5250 Applet User's Guide

Keyboard Mapping Tables


3270/5250 Applet User's Guide

The Environment Section


Reference

Environment Variables Used on Clients Running Windows Version 3.x, MS-DOS, or OS/2

APPC API

CPI-C API

CSV API

LUA API

SnaBase

Variables for Clients Not Running Microsoft Networking

Variable for Windows-Based Clients Running the 3270 Applet


APPC Programmer's Guide

Clients Running OS/2

CPI-C Programmer's Guide

Clients Running OS/2


APPC Programmer's Guide

Clients Running Windows Version 3.x

CPI-C Programmer's Guide

Clients Running Windows Version 3.x


APPC Programmer's Guide

Basic and Mapped Conversations Compared


Planning Guide

Error Message 546 on a Client

Error Message 546 on a Client

Memory Problems on Client Systems


Reference

Error Messages


Reference

SNA Sense Codes

Request Reject (Category X'08')

Request Errors (Category X'10')

State Errors (Category X'20')

RH Usage Errors (Category X'40')

Path Errors (Category X'80')

LUSTAT Sense Codes

Sense Data Specific to LU Type 6.2

Sense Codes


TN3270 Service

Messages


LUA Programmer's Guide

GetLuaReturnCode( )


Administration Guide

Avoiding Critical Errors in Commands

APPC Programmer's Guide

Basic and Mapped Conversations Compared


Planning Guide

Settings to Check on All Connections


Planning Guide

Interpreting Events or Errors on SNA Servers or Clients


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


Managing Microsoft SNA Server

Connecting to the Network


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Planning Guide

Basic Methods for Evaluating Hardware Requirements


Planning Guide

Evaluating Demand and Performance on an SNA Server


Planning Guide

Status Information in SNA Server Admin


Planning Guide

Performance Monitor


Administration Guide

Using Event Logs


Administration Guide

Using Event Logs


Administration Guide

Using Diagnostic Tools

Using Event Logs


Administration Guide

Using Event Logs


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Using Event Logs

Collecting Traces and Other Detailed System Information


TN3270 Service

Specifying Administrative Options

Using TN3270 Trace Option

Messages


Administration Guide

Trace Files


Administration Guide

Using Event Logs


APPC Programmer's Guide

OS/2 Considerations


Administration Guide

Using Event Logs

Managing Microsoft SNA Server

Diagnostic Information Tools


Planning Guide

Event 23 on an SNA Server


Planning Guide

Event 182 on an SNA Server


Planning Guide

Event 230 on an SNA Server


Planning Guide

Event 2001 on an SNA Server


APPC Programmer's Guide

Windows NT Considerations


Planning Guide

Settings to Check on All Connections


LUA Programmer's Guide

Windows NT System Considerations


Planning Guide

Interpreting Events or Errors on SNA Servers or Clients


Planning Guide

Examples of Configurations for 3270


Planning Guide

Examples of Configurations for 5250


APPC Programmer's Guide

Conversation States


APPC Programmer's Guide

Confirmation Processing


APPC Programmer's Guide

Issuing a CSV


APPC Programmer's Guide

Basic and Mapped Conversations Compared


APPC Programmer's Guide

Windows NT Considerations


Administration Guide

Command String Examples

Installation Guide

Command String Examples


Installation Guide

Installing an MS-DOS – Based Client


CPI-C Programmer's Guide

Conversation States


CPI-C Programmer's Guide

Confirmation Processing


CPI-C Programmer's Guide

Basic and Mapped Conversations Compared


CPI-C Programmer's Guide

Before Using Windows CPIC


Planning Guide

Overview of the Example Configuration


Administration Guide

Advanced X.25 Configuration


Reference

VTAM Sample Definitions for 3270

Token Ring Definition

SDLC Definition (for Switched and Leased Lines)

X.25 Definition

CICS and VTAM Sample Definitions for LU 6.2

CICS Tables

VTAM Definitions


Installation Guide

Installing an MS-DOS – Based Client


LUA Programmer's Guide

A Sample LUA Communication Sequence


LUA Programmer's Guide

Windows NT System Considerations


Administration Guide

Example of NVALERT.INI Section


Managing Microsoft SNA Server

Planning


Installation Guide

Installing an MS-DOS – Based Client


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients

Tracing on MS-DOS Based Clients

Tracing on OS/2-Based Clients


Administration Guide

Modifying the Extension Numbering Format

Modifying the Extension Numbering Format

Modifying the Extension Numbering Format


APPC Programmer's Guide

SNA Server Enhancements to the Windows Environment


APPC Programmer's Guide

GetAppcReturnCode( )


APPC Programmer's Guide

GetCsvReturnCode( )


APPC Programmer's Guide

APPC Extensions for the Windows Environment

CSV Extensions for the Windows Environment


APPC Programmer's Guide

WinAPPCCancelAsyncRequest( )


APPC Programmer's Guide

WinAPPCCancelBlockingCall( )


APPC Programmer's Guide

WinAPPCCleanup( )


APPC Programmer's Guide

WinAPPCIsBlocking( )


APPC Programmer's Guide

WinAPPCSetBlockingHook( )


APPC Programmer's Guide

WinAPPCStartup( )


APPC Programmer's Guide

WinAPPCUnhookBlockingHook( )


APPC Programmer's Guide

WinAsyncAPPC( )


APPC Programmer's Guide

WinAsyncAPPCEx( )


APPC Programmer's Guide

Before Using Windows CSV

WinAsyncCSV( )


APPC Programmer's Guide

Before Using Windows CSV

WinCSVCleanup( )


APPC Programmer's Guide

Before Using Windows CSV

WinCSVStartup( )


CPI-C Programmer's Guide

Receiving Data


CPI-C Programmer's Guide

Extensions for the Windows Environment


CPI-C Programmer's Guide

WinCPICCleanup( )


CPI-C Programmer's Guide

WinCPICIsBlocking( )


CPI-C Programmer's Guide

WinCPICSetBlockingHook( )


CPI-C Programmer's Guide

WinCPICStartup( )


CPI-C Programmer's Guide

WinCPICUnhookBlockingHook( )


LUA Programmer's Guide

SNA Server Enhancements to the Windows Environment


LUA Programmer's Guide

Extensions for the Windows Environment


LUA Programmer's Guide

RUI( ) / SLI( )


LUA Programmer's Guide

WinRUI( ) / WinSLI( )


LUA Programmer's Guide

WinRUICleanup( ) / WinSLICleanup( )


LUA Programmer's Guide

WinRUIGetLastInitStatus( )


LUA Programmer's Guide

WinRUIStartup( ) / WinSLIStartup( )


CPI-C Programmer's Guide

Extract_Conversation_Security_Type (xcecst)


CPI-C Programmer's Guide

Extract_Conversation_Security_User_ID (cmecsu)


CPI-C Programmer's Guide

Extract_Conversation_State (cmecs)


CPI-C Programmer's Guide

Extract_Conversation_Type (cmect)


CPI-C Programmer's Guide

Extract_CPIC_Side_Information (xcmesi)


CPI-C Programmer's Guide

Getting Information


CPI-C Programmer's Guide

Extract_Mode_Name (cmemn)


CPI-C Programmer's Guide

Extract_Partner_LU_Name (cmepln)


CPI-C Programmer's Guide

Extract_Sync_Level (cmesl)


CPI-C Programmer's Guide

Extract_TP_Name (cmetpn)


Comprehensive Index - F
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Facility data string

common identifiers for

example

X.25 settings

Facility requests

Failures  See Error logs; Error messages; Errors; Event logs; Events

FastTips

Fault tolerance  See Hot backup of 3270 sessions; Hot backup of 5250 sessions; Load balancing

FDDI connections

See also 802.2 connections; Connections

described, speeds

settings

FEPs

Fiber Distributed Data Interface  See FDDI connections

File menu (SNA Server Admin)

File transfer with 3270 Applet

First Extension for LU range

First LU Number for LU range

FLUSH

Flush (cmflus)

Flushing buffer defined

FM profiles

Format 3 XIDs

Formats

link alerts

link statistics

Forms

802.2 Settings

3270 LU Pools

3270 LUs (for Individual LUs)

3270 LUs (for Ranges of LUs)

3270 RTM Settings

a brief overview

Channel Settings

CPI-C Properties

Initial Connection Settings

Local APPC LUs

Mode Properties for LU-LU Pairs

Remote APPC LUs

SDLC Settings

Server Information

Server Resources Planning

Users and Groups

X.25 Settings

Frame data

Frame defined

Frame Type registry entry

Freeing memory on clients

Front-end processors

Fully qualified names

Function management

data requests

profiles


Administration Guide

Advanced X.25 Configuration


Administration Guide

Advanced X.25 Configuration


Administration Guide

Advanced X.25 Configuration


Administration Guide

Advanced X.25 Configuration


Installation Guide

Product Support Within the United States and Canada


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Planning Guide

Settings to Check on 802.2 Connections


Managing Microsoft SNA Server

SNA Model #1: Hierarchical SNA

Planning Guide

Settings to Check on 802.2 Connections


Administration Guide

Initiating Actions with Menu Commands


3270/5250 Applet User's Guide

Defining File Transfer Settings (3270 Emulation Only)

Transferring Files


Administration Guide

Modifying the Extension Numbering Format

Modifying the Extension Numbering Format

Modifying the Extension Numbering Format


Administration Guide

Configuring Numbering for a 3270 LU Range

Configuring Numbering for an LUA LU Range

Configuring Numbering for a Downstream LU Range


APPC Programmer's Guide

APPC Verbs

[MC_]FLUSH


CPI-C Programmer's Guide

Flush (cmflus)


APPC Programmer's Guide

Basic and Mapped Conversations Compared

CPI-C Programmer's Guide

Basic and Mapped Conversations Compared


Reference

Transmission Service and Function Management Profiles

FM Profile 0


Administration Guide

Local and Remote Configuration Parameters

Configuring Servers


Reference

Link Alert Format and Common Subvectors


Reference

Link Statistics


Administration Guide

802.2 Settings Form


Administration Guide

3270 LU Pools Form


Administration Guide

3270 LUs Form (for Individual LUs)


Administration Guide

3270 LUs Form (for Ranges of LUs)


Administration Guide

3270 RTM Settings Form


Managing Microsoft SNA Server

Completing the Forms


Administration Guide

Channel Settings Form


Administration Guide

CPI-C Properties Form


Administration Guide

Initial Connection Settings Form


Administration Guide

Local APPC LUs Form


Administration Guide

Mode Properties for LU-LU Pairs Form


Administration Guide

Remote APPC LUs Form


Administration Guide

SDLC Settings Form


Administration Guide

Server Information Form


Administration Guide

Server Resources Planning Form


Administration Guide

Users and Groups Form


Administration Guide

X.25 Settings Form


APPC Programmer's Guide

OS/2 Considerations


Administration Guide

Performance Monitor Options for SNA Server


Installation Guide

Configuring a DLC 802.2 Link Service


Planning Guide

Memory Problems on Client Systems


Managing Microsoft SNA Server

SNA Model #1: Hierarchical SNA

Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Settings to Check on All Connections


Reference

Command Request Support


Reference

Transmission Service and Function Management Profiles

TS Profile 4


Comprehensive Index - G
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Generation of sense codes

GetAppcConfig

GetAppcReturnCode

GET_ATTRIBUTES

GET_CP_CONVERT_TABLE

GetCsvReturnCode

GetLuaReturnCode

Getting help

accessing from dialog box

product support services

Getting started

See also Installing SNA Server

an introduction to SNA

an introduction to SNA Server

configuration design

configuring SNA Server

diagnostic tools

installing SNA Server

installing the client

GET_TP_PROPERTIES

GET_TYPE

Glossary

Groups

3270 emulation with hot backup

across connections

across servers

5250 emulation with hot backup

access

adding to list used by SNA Server

assigning LUs, LU pools to

changing order of LUs in lists seen by

configuring properties

copying LUs between

copying properties between

deleting assignment of LU to

modifying

viewing

Guests


Reference

SNA Sense Codes

Sense Codes


APPC Programmer's Guide

GetAppcConfig( )


APPC Programmer's Guide

GetAppcReturnCode( )


APPC Programmer's Guide

APPC Verbs

[MC_]GET_ATTRIBUTES


APPC Programmer's Guide

OS/2 Considerations

GET_CP_CONVERT_TABLE


APPC Programmer's Guide

GetCsvReturnCode( )


LUA Programmer's Guide

GetLuaReturnCode( )


Installation Guide

Starting the SNA Server Setup Program


Installation Guide

Microsoft Support Services


Managing Microsoft SNA Server

Overview

What You Will Learn

IBM Systems Network Architecture

SNA Model #1: Hierarchical SNA

SNA Model #2: Peer-Oriented SNA

Finding More Information


Managing Microsoft SNA Server

Microsoft SNA Server Overview

What You Will Learn

The Microsoft SNA Server

Connecting to the Network

Microsoft SNA Server Functions

SNA Server Components

Finding Additional Information


Managing Microsoft SNA Server

Overview

What You Will Learn

Planning

Preparing the IBM SNA Host for Installation

Completing the Forms

Finding Additional Information


Managing Microsoft SNA Server

Overview

What You Will Learn

The Configuration Process

Configuring Servers

Configuring Connections

Basic 802.2 Settings

Basic SDLC Settings

Basic X.25 Settings

Configuring LUs

User and Group Access for 3270

Using 3270 LU Pools

Configuring for APPC (LU6.2)

Configuring Modes

User and Groups Designation and Assigning Default APPC

Configuring Downstream Connections and LUs

Configuring Individual Downstream LUs

Configuring Properties for a Downstream LU

Associating Downstream LUs with a Downstream Connection

Management of the SNA Server


Managing Microsoft SNA Server

Overview

What You Will Learn

Diagnostic Information Tools


Managing Microsoft SNA Server

Overview

What You Will Learn

Installation Overview

The Setup Program

Using the SNA Server Setup Program

Installing an SNA Server

Installing a Link Service


Managing Microsoft SNA Server

Installing the Client

Client Option Modification

Removing Clients

Finding Additional Information


APPC Programmer's Guide

APPC Verbs

GET_TP_PROPERTIES


APPC Programmer's Guide

APPC Verbs

GET_TYPE


Microsoft SNA Server Glossary

Microsoft SNA Server Glossary


Planning Guide

Users and Groups for 3270 with Hot Backup Across Connections


Planning Guide

Users and Groups for 3270 with Hot Backup Across Servers


Planning Guide

Users and Groups for 5250 with Hot Backup Across Servers

Users and Groups for 5250 (Multiple LU Example)


Administration Guide

Setting Up User and Group Access


Administration Guide

Adding, Viewing, or Modifying Users or Groups


Administration Guide

Configuring for 3270

Giving Users Access to 3270 LUs

Assigning Default APPC LUs to Users or Groups


Administration Guide

Giving Users Access to 3270 LUs


Administration Guide

Adding, Viewing, or Modifying Users or Groups


Administration Guide

Copying Properties and LUs Between Users and/or Groups


Administration Guide

Copying Properties and LUs Between Users and/or Groups


Administration Guide

Deleting LUs


Administration Guide

Adding, Viewing, or Modifying Users or Groups


Administration Guide

Adding, Viewing, or Modifying Users or Groups


Administration Guide

Adding, Viewing, or Modifying Users or Groups


Comprehensive Index - H
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Handicaps, users with

Hardware requirements

for SNA Server

for TN3270 Service

sample installation

Hearing impaired users, accessibility information

Help

accessing from dialog box

product support services

Hexadecimal values, symbolic constants

Hierarchies, network

High Priority LU setting, LUA LUs

High Priority Mode setting for mode

Host code page defined

Host systems defined

Hosting, direct

Hosts

accessing

from Windows, Windows NT  See 3270 Applets; 5250 Applet

with TN3270 Service

applications, connecting to, with Applets

configuration

for SNA Server installation

for TN3270 Service

connections

configuring

downstream systems

settings

3270 emulation

5250 emulation

downstream system

overview

VTAM definition samples

Hot backup of 3270 sessions

across connections

connections

host settings

illustration

LU configuration

LU pools

users, groups

across servers

connections

host settings

illustration

LU configuration

LU pools

users, groups

basic strategy

LU pools

across connections

across servers

overview

Hot backup of 5250 sessions

AS/400 and SNA Server settings

configuring for (overview)

connections

local LUs

overview, illustration

remote LUs

server settings

user and computer names, viewing

users, groups


Installation Guide

Accessibility for People with Disabilities


Planning Guide

Basic Methods for Evaluating Hardware Requirements


TN3270 Service

Overview of TN3270 Service Installation


Managing Microsoft SNA Server

Planning


Installation Guide

Microsoft Services for People Who Are Deaf or Hard-of-Hearing


Installation Guide

Starting the SNA Server Setup Program


Installation Guide

Microsoft Support Services


APPC Programmer's Guide

APPC Management Verbs

APPC TP Verbs

APPC Conversation Verbs

Common Service Verbs


Managing Microsoft SNA Server

IBM Systems Network Architecture


Administration Guide

Configuring Properties for an LUA LU


Administration Guide

Configuring Modes for LU-LU Pairs


APPC Programmer's Guide

GET_CP_CONVERT_TABLE


Administration Guide

Remote System Types


Planning Guide

SYSTEM.INI Setting for Clients Running Windows for Workgroups


TN3270 Service

Pre-Installation Considerations


3270/5250 Applet User's Guide

Connecting to the Host Application


Managing Microsoft SNA Server

Planning


TN3270 Service

SNA Server and Host Configuration


Administration Guide

Configuring Host Connections


Planning Guide

Host Connection: SDLC

Creating Downstream LUs on the Host Connection


Planning Guide

Host Settings Corresponding to Example

Connections for 3270 with Hot Backup Across Connections


Planning Guide

AS/400 and SNA Server Settings (for Servers and Connections)

AS/400 and SNA Server Settings (for Server and Connection)


Planning Guide

Host Connection: SDLC


Planning Guide

Overview of Connections


Reference

VTAM Sample Definitions for 3270

Token Ring Definition

SDLC Definition (for Switched and Leased Lines)

X.25 Definition

CICS and VTAM Sample Definitions for LU 6.2

CICS Tables

VTAM Definitions


Planning Guide

Connections for 3270 with Hot Backup Across Connections


Planning Guide

Host Settings Corresponding to Example


Planning Guide

Configuring for 3270 with Hot Backup Across Connections


Planning Guide

LUs for 3270 with Hot Backup Across Connections


Planning Guide

LU Pools for 3270 with Hot Backup Across Connections


Planning Guide

Users and Groups for 3270 with Hot Backup Across Connections


Planning Guide

Connections for 3270 with Hot Backup Across Servers


Planning Guide

Host Settings Corresponding to Example


Planning Guide

Configuring for 3270 with Hot Backup Across Servers


Planning Guide

LUs for 3270 with Hot Backup Across Servers


Planning Guide

LU Pools for 3270 with Hot Backup Across Servers


Planning Guide

Users and Groups for 3270 with Hot Backup Across Servers


Planning Guide

Examples of Configurations for 3270


Planning Guide

Configuring for 3270 with Hot Backup Across Connections

LU Pools for 3270 with Hot Backup Across Connections


Planning Guide

Configuring for 3270 with Hot Backup Across Servers

LU Pools for 3270 with Hot Backup Across Servers


Administration Guide

Using LU Pools to Maximize Access

Planning Guide

Examples of Configurations for 3270


Planning Guide

AS/400 and SNA Server Settings (for Servers and Connections)


Administration Guide

Strategies for Assigning LU Names and Aliases


Planning Guide

Connections for 5250 with Hot Backup Across Servers


Planning Guide

Local LUs for 5250 with Hot Backup Across Servers


Planning Guide

Configuring for 5250 with Hot Backup Across Servers


Planning Guide

Remote LUs for 5250 with Hot Backup Across Servers


Planning Guide

Server Settings for 5250 with Hot Backup Across Servers


Planning Guide

Viewing User and Computer Names of 5250 Users


Planning Guide

Users and Groups for 5250 with Hot Backup Across Servers


Comprehensive Index - I
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

IBM Client Access

IBM ES for OS/2 version 1.0, compatibility of CSVs

IBM Extended character set

IBM PC Support

IBM SNA  See SNA

IBM terminal types

Icons, working with

IDBLK identifier

Identifiers

See also specific type

downstream systems

errors

settings

Identifying problems  See Troubleshooting connections

Idle Retry Limit for SDLC connections

Idle timeout

IDNUM identifier

IDs

See also Identifiers

in Servers and Connections window

IEEE 802.2 protocol  See 802.2 connections

I-frame  See BTUs, maximum length

Ignored input message

Implicit Incoming Mode, remote APPC LUs

Implicit Incoming Remote LU, local APPC LUs

Implicit mode

Inactivity (t1) Timeout for 802.2 connections

Inbound RU size

Incoming filter setting, X.25 link service

Incoming string setting

SDLC link service

X.25 link service

Incoming SVC setting, X.25 link service

Independent APPC

defined

LUs  See APPC LUs

Indicators

5250 Applet status line

OIA (3270 session)

Informational messages

Init Status Delay

Initial Connections Settings form

INITIALIZE conversation state

Initialize_Conversation (cminit)

Initiating conversations with invoking TPs  See Transaction programs

Initiation of TN3270 session

Inserting connections  See Connections

Inserting LUs

3270 emulation

5250 emulation (APPC)

local

remote

dialog box

downstream

Installation planning

See also Installing SNA Server

3270 emulation

5250 emulation

a brief overview

centralized vs. noncentralized

domains, server roles

forms

hardware needs, evaluation of

network protocols

See also Network protocols

client-server

overview

server broadcasts

server placement, configuration

Installing

clients  See Clients

link services  See Link services

SNA Server  See Installing SNA Server

TN3270 Service

Installing SNA Server

For complete installation instructions, refer to the SNA Server Installation Guide.

See also Components; Link services; Setup; Software

a brief overview

client-server protocols, selecting

components automatically installed

directory tree created

installation path

network domain name, selecting

overview

primary server used

Registry keys created

shares created

steps to follow

Intel-based clients

Interface specifications

3270 emulator  Refer to the SNA Server 3270 Emulator Interface Specification.

SNA device  Refer to the SNA Server SNA Device Interface Specification.

Interfaces for programming  See specific API

Internet support services

Introduction

to SNA

to SNA Server

to TN3270 Service

Invokable TPs

See also Transaction programs

APPC

CPI-C

Invoking TPs

See also Transaction programs

APPC

CPI-C

IP routers

installing SNA servers over

server broadcasts

IPX/SPX

client logon process

client-server communication

overview

server broadcasts

Setup options

on clients

on servers

Windows for Workgroups adjustments


Planning Guide

Software and Configurations on AS/400 Clients

AS/400 Clients Using CA/400


APPC Programmer's Guide

OS/2 Considerations


3270/5250 Applet User's Guide

Character Tables


APPC Programmer's Guide

MS-DOS Considerations

Installation Guide

Installing an MS-DOS – Based Client

Planning Guide

Software and Configurations on AS/400 Clients


TN3270 Service

IBM Terminal Type Support


Administration Guide

Working with Windows and Icons


Planning Guide

Settings to Check on All Connections


Planning Guide

Downstream Connections: Token Ring


Planning Guide

Settings to Check on All Connections


Planning Guide

Settings to Check on All Connections


Administration Guide

Advanced SDLC Configuration


Administration Guide

Advanced SDLC Configuration

TN3270 Service

Specifying Administrative Options


Planning Guide

Settings to Check on All Connections


TN3270 Service

Server and Connection User  Fields


TN3270 Service

Ignore Error Message

Event Log Messages


Administration Guide

SNA Server Features That Simplify APPC Configuration

Configuring Remote APPC LU Properties


Administration Guide

SNA Server Features That Simplify APPC Configuration

Configuring Local APPC LU Properties


APPC Programmer's Guide

[MC_]CONFIRM


Administration Guide

Advanced 802.2 Configuration


TN3270 Service

Specifying Administrative Options


Installation Guide

Configuring an X.25 Link Service


Installation Guide

Configuring an SDLC Link Service


Installation Guide

Configuring an X.25 Link Service


Installation Guide

Configuring an X.25 Link Service


Administration Guide

How LUs Work Together for APPC


3270/5250 Applet User's Guide

5250 Applet Status Line


3270/5250 Applet User's Guide

Operator Information Area (OIA) Indicators For 3270


TN3270 Service

Ignore Error Message

Messages


TN3270 Service

Specifying Administrative Options


Administration Guide

Initial Connection Settings Form


CPI-C Programmer's Guide

Conversation States


CPI-C Programmer's Guide

Initialize_Conversation (cminit)


TN3270 Service

Session Initiation


Planning Guide

LUs for 3270 with Hot Backup Across Servers

LUs for 3270 with Hot Backup Across Connections

LU Pools for 3270 with Hot Backup Across Connections


Planning Guide

Local LUs for 5250 with Hot Backup Across Servers

Local LUs for 5250 (Multiple LU Example)


Planning Guide

Remote LUs for 5250 with Hot Backup Across Servers

Remote LU for 5250 (Multiple Local LU Example)


Administration Guide

Configuring Individual LUA LUs

Configuring a Range of LUA LUs

Configuring Individual Downstream LUs

Configuring a Range of Downstream LUs


Planning Guide

Creating Downstream LUs on the Host Connection


Planning Guide

3270 Users Connecting to a Mainframe


Planning Guide

5250 Users Connecting to an AS/400


Managing Microsoft SNA Server

Overview

What You Will Learn

Planning

Preparing the IBM SNA Host for Installation

Completing the Forms

Finding Additional Information


Installation Guide

Planning SNA Server Domains


Planning Guide

Centralized and Branch Configurations


Administration Guide

Server Resources Planning Form

Server Information Form

Initial Connection Settings Form

802.2 Settings Form

SDLC Settings Form

X.25 Settings Form

Channel Settings Form

3270 LUs Form (for Individual LUs)

3270 LUs Form (for Ranges of LUs)

3270 LU Pools Form

Users and Groups Form

Local APPC LUs Form

Remote APPC LUs Form

Mode Properties for LU-LU Pairs Form

CPI-C Properties Form

3270 RTM Settings Form


Planning Guide

Basic Methods for Evaluating Hardware Requirements


Planning Guide

Network Protocol Choices for SNA Servers

Finding Additional Information About Client-Server Protocols


Planning Guide

Choosing and Setting Up Network Protocols on SNA Servers

Finding Additional Information About Client-Server Protocols


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Centralized and Branch Configurations


TN3270 Service

Overview of TN3270 Service Installation

Installing TN3270 Service


Managing Microsoft SNA Server

Overview

What You Will Learn

Installation Overview

The Setup Program

Using the SNA Server Setup Program

Installing an SNA Server

Installing a Link Service


Installation Guide

Selecting Client/Server Protocols

Planning Guide

Network Protocol Choices for SNA Servers


Installation Guide

Components Installed by Setup


Reference

Directory Tree Created by Setup


Installation Guide

Specifying the Installation Path


Installation Guide

Specifying the Network Domain Name


Installation Guide

Overview of SNA Server Installation

Installing SNA Servers


Installation Guide

SNA Server Components


Reference

Registry Keys Created by Setup


Reference

Shares Created by Setup


Managing Microsoft SNA Server

Overview

What You Will Learn

Installation Overview

The Setup Program

Using the SNA Server Setup Program

Installing an SNA Server

Installing a Link Service


Installation Guide

Client Installation from Floppy Disks


Installation Guide

Product Support Within the United States and Canada


Managing Microsoft SNA Server

Overview

What You Will Learn

IBM Systems Network Architecture

SNA Model #1: Hierarchical SNA

SNA Model #2: Peer-Oriented SNA

Finding More Information


Managing Microsoft SNA Server

Microsoft SNA Server Overview

What You Will Learn

The Microsoft SNA Server

Connecting to the Network

Microsoft SNA Server Functions

SNA Server Components

Finding Additional Information


TN3270 Service

Overview of TN3270 Service

Overview of TN3270 Service Installation

System Requirements

Pre-Installation Considerations

SNA Server and Host Configuration

TN3270 Service and Host Configuration


Administration Guide

Invoking and Invokable TPs

APPC Programmer's Guide

Fundamental Terms for TPs and LUs

Invoking TPs

Invokable TPs

How an Invokable TP is Matched to an Invoking TP's Request

Troubleshooting for Invokable TPs


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs

Invokable TPs

Troubleshooting for Invokable TPs


Administration Guide

Invoking and Invokable TPs

APPC Programmer's Guide

Fundamental Terms for TPs and LUs

Using Invoking and Invokable TPs


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs

Invoking TPs


Installation Guide

Installing SNA Servers in an IP Routed Network


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Client Logons and the Storing of Passwords


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using NetWare (IPX/SPX)


Planning Guide

Communication Between Clients and SNA Servers

Overview of Network Protocols for Clients


Planning Guide

Communication Between SNA Servers

Network Protocol Choices for SNA Servers


Planning Guide

Important Setup Options on a Client


Planning Guide

Important Setup Options on an SNA Server


Planning Guide

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Comprehensive Index - K
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Keyboard mappings

ANSI character set

ASCII character set

IBM Extended character set

5250 to Enhanced 101

3270 to Enhanced 101

Keys, initiating actions with

Keys, Registry

See also Registry variables

created by Setup


3270/5250 Applet User's Guide

Character Tables


3270/5250 Applet User's Guide

Character Tables


3270/5250 Applet User's Guide

Character Tables


3270/5250 Applet User's Guide

Keyboard Mapping Tables


3270/5250 Applet User's Guide

Keyboard Mapping Tables


Administration Guide

Initiating Actions with Keys or Toolbar Buttons


Reference

Shares Created by Setup


Comprehensive Index - L
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

L2 window size setting, X.25 link service

LAN Manager

clients

Registry variables

LAN protocols

a brief overview

changing selections

client-server

AppleTalk

Banyan VINES

Microsoft Networking

NetBIOS

NetWare IPX/SPX

overview

TCP/IP

number of, types

overview

selecting, setup

interfaces for

on a client

on a server

overview

Windows for Workgroups adjustments

server broadcasts, selecting

TN3270 Service

types (list)

Windows for Workgroups adjustments

LANs

LANs, hot backup across  See Hot backup of 3270 sessions; Hot backup of 5250 sessions

Length, BTU  See Maximum BTU length

Limits, APPC, CSV and system

Line, dialing

by modem

manually

Link alerts

format, subvectors

overview

SDLC failure

token ring failure

Link library

Link role, determining for connections

Link services

802.2

adding

alerts  See Link alerts

configuring

802.2

DFT

DLC

SDLC

X.25

defined

Ethernet

failures, event 23

installing

a brief overview

during Setup

steps

unlisted types

Registry

keys created by Setup

variables

removing

SDLC

specifying for connections

TN3270 Service

token ring

traces available for

X.25

Link statistics

Link support software, developing

Refer to the SNA Server SNA Device Interface Specification.

Load balancing

See also Hot backup of 3270 sessions; Hot backup of 5250 sessions

5250 emulation and

invokable TP on multiple systems

pools and

Load-time linking

Local APPC LUs  See APPC LUs

Local area networks  See LANs

Local clients

Local logging

network management data

SDLC link alerts

Local LUs

APPC  See APPC LUs

APPCLLU environment specifies

configuring

defined

for 5250 sessions

Local node identifiers

Local TPs  See Transaction programs

Local X.25 address setting

Log verbs

Logging, event  See Logs, event

Logging, local

network management data

SDLC link alerts

Logical records

Logical unit application programming interface  See LUA

Logical units  See LUs

LOG_MESSAGE

Logmode entries

Logon

simplifying with batch files

to Windows NT domain from Windows for Workgroups

Logon ID display

Logon servers

Logs, event

See also Error logs; Errors; Events

diagnostic value

event types, specifying

introduced

servers, specifying

SNA Server auditing events

interpreting

viewing

storage

TN3270 Service

trace files, compared with

viewing using Windows NT Event Viewer

LT Number for DFT LUs

LU  See LUs

LU 6.2  See LU type 6.2

LU alias

CPI-C transaction programs and

for APPC LUs

LU names

for LUs

for ranges of LUs

LU names based on user names (5250 sessions)

AS/400 and SNA Server settings

connection configuration

local LUs

overview

server settings

snacfg command

assigning LUs

creating LUs

overview

user, group accounts creation

LU numbers

for LUs

for ranges of LUs

LU pools  See Pools

LU Pools window (SNA Server Admin)

LU sessions

LU status

defined

diagnostic information

LU type 6.2

CICS and

functions not supported by CPI-C

sense codes

used by TPs

used in APPC

VTAM and

LU Type for 3270 LUs

LUA

applications

See also LUA verbs

compiling, linking

platforms for, considerations

portability

samples

SNA considerations

concepts

defined

environment variables

introduced

LUs  See LUA LUs

Registry variables

return codes

primary

secondary

VCBs

command-specific structure

common structure

defined

format

introduced

segment

LUA LUs

See also Pools

configuring

accessing existing

assigning new

introduced

properties

DFT connection, on, numbers needed

high priority

moving to different connection

properties

ranges

resetting

LUA verbs

completion

issuing

RUI_BID

RUI_INIT

RUI_PURGE

RUI_READ

RUI_TERM

RUI_WRITE

SLI_BID

SLI_BIND_ROUTINE

SLI_CLOSE

SLI_OPEN

SLI_PURGE

SLI_RECEIVE

SLI_SEND

SLI_STSN_ROUTINE

summarized

using

LU-LU pairs

LU-LU sessions

LU-LU state

LUs

See also 3270 LUs; APPC LUs; Downstream LUs; Local LUs; LU type 6.2; LUA LUs; Pools; Remote LUs

access to

adding

APPC TPs and

assigned to DFT adapter

assigning

3270 emulation

5250 emulation (APPC)

a brief overview

downstream

to pools

to users

with snacfg command

changing order in lists seen by user

configuring

contention

copying between users

copying properties

defined

deleting

deleting assignment to user

display in SNA Server Admin, modifying

in hierarchical SNAs

in peer-oriented SNAs

mapped TN clients

moving

multiple, creating

parameter required

partner

pools  See Pools

removing from pool

required for communication between TPs

resetting

resource information

states, monitoring

status

LUSTAT sense codes


Installation Guide

Configuring an X.25 Link Service


Installation Guide

Maximum Network Connections on Clients Using LAN Manager


Reference

Lan Manager Workstation: Location and Name of Variable


Managing Microsoft SNA Server

Microsoft SNA Server Overview


Installation Guide

Changing Client/Server Protocol Selections


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using AppleTalk


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using Banyan VINES IP


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using Microsoft Networking (Named Pipes)


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using NetWare (IPX/SPX)


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using TCP/IP


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Choosing and Setting Up Network Protocols on SNA Servers

Finding Additional Information About Client-Server Protocols

Network Protocols and Client-Server Communication


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Important Setup Options on a Client


Planning Guide

Important Setup Options on a Client


Planning Guide

Important Setup Options on an SNA Server


Installation Guide

Selecting Client/Server Protocols

Planning Guide

Choosing and Setting Up Network Protocols on SNA Servers

Important SNA Server Setup Options


Planning Guide

Adjusting Clients Running Windows for Workgroups


Planning Guide

Communication Between SNA Servers

Network Protocol Choices for SNA Servers


TN3270 Service

TN3270 Protocol Overview


Planning Guide

Communication Between Clients and SNA Servers

Overview of Network Protocols for Clients


Planning Guide

Adjusting Clients Running Windows for Workgroups


Installation Guide

Overview of SNA Server

Planning SNA Server Domains


APPC Programmer's Guide

Windows NT Considerations

Windows Considerations

MS-DOS Considerations

OS/2 Considerations


Administration Guide

Changing the SNA Server Dialing Method

Installation Guide

Configuring an SDLC Link Service

Command String Examples

Configuring an X.25 Link Service


Installation Guide

Configuring an SDLC Link Service

Configuring an X.25 Link Service


Reference

Link Alert Format and Common Subvectors


Reference

Link Alerts for SDLC and Token Ring


Reference

SDLC Failure Alerts


Reference

Token Ring Failure Alerts


APPC Programmer's Guide

MS-DOS Considerations


Administration Guide

Determining a Connection’s Link Role


Planning Guide

Settings to Check on 802.2 Connections


Installation Guide

Adding or Removing a Link Service


Installation Guide

Configuring a DLC 802.2 Link Service


Installation Guide

Configuring a DFT Link Service


Installation Guide

Configuring a DLC 802.2 Link Service


Installation Guide

Configuring an SDLC Link Service


Installation Guide

Configuring an X.25 Link Service


Administration Guide

Getting Started

Installation Guide

SNA Server Components

Installing a Link Service


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Event 23 on an SNA Server


Administration Guide

Getting Started

Managing Microsoft SNA Server

Installing a Link Service


Installation Guide

Components Installed by Setup


Installation Guide

Installing a Link Service


Installation Guide

Installing Other Link Services


Reference

Keys Created for Link Services


Reference

DLC (802.2) Link Service: Location and Name of Variable


Installation Guide

Adding or Removing a Link Service


Planning Guide

Settings to Check on SDLC Connections


Administration Guide

Initial Connection Configuration


TN3270 Service

TN3270 Service and Host Configuration


Planning Guide

Settings to Check on 802.2 Connections


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Planning Guide

Settings to Check on X.25 Connections


Reference

Link Statistics


Administration Guide

Strategies for Assigning LU Names and Aliases


Administration Guide

Invoking and Invokable TPs


Administration Guide

Using LU Pools to Maximize Access


APPC Programmer's Guide

Windows Considerations

OS/2 Considerations

CPI-C Programmer's Guide

Windows Considerations

OS/2 Considerations

LUA Programmer's Guide

Windows NT System Considerations

Windows Environment Considerations

MS-DOS System Considerations

OS/2 Considerations


Installation Guide

Clients in Relation to the Domain of Servers


Reference

Local Logging of Network Management Data


Reference

SDLC Alert Local Logging


CPI-C Programmer's Guide

Windows Considerations

OS/2 Considerations


Managing Microsoft SNA Server

Configuring for APPC (LU6.2)


APPC Programmer's Guide

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


Planning Guide

Local LUs for 5250 with Hot Backup Across Servers

Local LUs for 5250 (Multiple LU Example)


Administration Guide

Basic 802.2 Configuration

Basic SDLC Configuration

Basic X.25 Configuration

Basic Channel Configuration

Planning Guide

Settings to Check on All Connections


Installation Guide

Configuring an X.25 Link Service


APPC Programmer's Guide

MS-DOS Considerations

LOG_MESSAGE


Reference

Local Logging of Network Management Data


Reference

SDLC Alert Local Logging


APPC Programmer's Guide

Basic and Mapped Conversations Compared

CPI-C Programmer's Guide

Basic and Mapped Conversations Compared


APPC Programmer's Guide

MS-DOS Considerations

LOG_MESSAGE


TN3270 Service

TN3270 Service and Host Configuration

Adding an LU

IBM Terminal Type Support


Planning Guide

Client Logons and the Storing of Passwords


Planning Guide

Domain and Password Settings for Clients Running Windows for Workgroups


TN3270 Service

Server and Connection User  Fields


Planning Guide

Deciding About Domain Controllers (Logon Servers)


Administration Guide

Using Event Logs


Administration Guide

Using Event Logs


Administration Guide

Using Diagnostic Tools

Using Event Logs


Administration Guide

Using Event Logs


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Using Event Logs

Collecting Traces and Other Detailed System Information


TN3270 Service

Specifying Administrative Options

Using TN3270 Trace Option

Messages


Administration Guide

Trace Files


Administration Guide

Using Event Logs


Administration Guide

Configuring Properties for a 3270 LU

Configuring Properties for an LUA LU


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


Administration Guide

Configuring Local APPC LU Properties

Configuring Remote APPC LU Properties


Administration Guide

Configuring Properties for a 3270 LU

Configuring Local APPC LU Properties

Configuring Remote APPC LU Properties

Configuring Properties for an LUA LU

Configuring Properties for a Downstream LU


Administration Guide

Configuring Properties for a 3270 LU Range

Configuring Properties for an LUA LU Range


Planning Guide

AS/400 and SNA Server Settings (for Server and Connection)


Planning Guide

Connection for 5250 (Multiple LU Example)


Planning Guide

Local LUs for 5250 (Multiple LU Example)


Planning Guide

Configuring for 5250 with LU Names Based on User Names


Planning Guide

Server Settings for 5250 (Multiple LU Example)

AS/400 and SNA Server Settings (for Server and Connection)


Planning Guide

Local LUs for 5250 (Multiple LU Example)


Planning Guide

Local LUs for 5250 (Multiple LU Example)


Planning Guide

Configuring for 5250 with LU Names Based on User Names


Planning Guide

Users and Groups for 5250 (Multiple LU Example)


Administration Guide

Configuring Properties for a 3270 LU

Configuring Local APPC LU Properties

Configuring Properties for an LUA LU

Configuring Properties for a Downstream LU


Administration Guide

Configuring Properties for a 3270 LU Range

Configuring Properties for an LUA LU Range


Administration Guide

Modifying the Display for the LU Pools Window


LUA Programmer's Guide

LUs and Sessions

Reference

LU Support


Administration Guide

Using Diagnostic Tools


Administration Guide

Using Diagnostic Tools


Administration Guide

Sample CICS Configuration Screens for Use with LU 6.2


CPI-C Programmer's Guide

CPIC and LU 6.2


Reference

SNA Sense Codes

Path Errors (Category X'80')

Sense Codes


Administration Guide

Transaction Programs


Administration Guide

Configuring LUs for APPC


Administration Guide

Sample VTAM Parameters for Use with LU 6.2


Administration Guide

Configuring Properties for a 3270 LU

Configuring Properties for a 3270 LU Range


LUA Programmer's Guide

Compiling and Linking an LUA Application


LUA Programmer's Guide

Windows NT System Considerations


LUA Programmer's Guide

Writing Portable Applications


LUA Programmer's Guide

LUA Code Samples in the SDK


LUA Programmer's Guide

SNA Considerations

SNA Server Enhancements to the Windows Environment


LUA Programmer's Guide

Concepts


Administration Guide

Configuring LUs for LUA

LUA Programmer's Guide

Concepts


Reference

LUA API


LUA Programmer's Guide

Concepts


Reference

LUA API: Location and Name of Variable


LUA Programmer's Guide

Primary Return Codes


LUA Programmer's Guide

Secondary Return Codes


LUA Programmer's Guide

Command-Specific Structure of LUA VCBs


LUA Programmer's Guide

Common Structure of LUA VCBs


LUA Programmer's Guide

RUI/SLI Definition


LUA Programmer's Guide

The LUA VCB Format


LUA Programmer's Guide

Verb Control Block


LUA Programmer's Guide

OS/2 Considerations


Administration Guide

Configuring Individual LUA LUs


Administration Guide

Configuring Individual LUA LUs


Administration Guide

Configuring Individual LUA LUs


Administration Guide

Configuring Properties for an LUA LU


Administration Guide

Configuring Properties for an LUA LU


Administration Guide

Configuring Properties for an LUA LU Range

Configuring Properties for an LUA LU Pool


Administration Guide

Moving an LU to a Different Connection


Administration Guide

Configuring Properties for an LUA LU


Administration Guide

Configuring a Range of LUA LUs

Modifying the Extension Numbering Format

Configuring Properties for an LUA LU Range


LUA Programmer's Guide

Resetting LUA LUs


LUA Programmer's Guide

Synchronous and Asynchronous Verb Completion

Synchronous Verb Completion

Asynchronous Verb Completion


LUA Programmer's Guide

Issuing an LUA Verb


LUA Programmer's Guide

RUI_BID


LUA Programmer's Guide

RUI_INIT


LUA Programmer's Guide

RUI_PURGE


LUA Programmer's Guide

RUI_READ


LUA Programmer's Guide

RUI_TERM


LUA Programmer's Guide

RUI_WRITE


LUA Programmer's Guide

SLI_BID


LUA Programmer's Guide

SLI_BIND_ROUTINE


LUA Programmer's Guide

SLI_CLOSE


LUA Programmer's Guide

SLI_OPEN


LUA Programmer's Guide

SLI_PURGE


LUA Programmer's Guide

SLI_RECEIVE


LUA Programmer's Guide

SLI_SEND


LUA Programmer's Guide

SLI_STSN_ROUTINE


LUA Programmer's Guide

Verb Summary


LUA Programmer's Guide

Using LUA Verbs

RUI/SLI Definition

Issuing an LUA Verb


Managing Microsoft SNA Server

Configuring Modes


APPC Programmer's Guide

Fundamental Terms for TPs and LUs

Invoking TPs

CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs

Invoking TPs

LUA Programmer's Guide

LUs and Sessions


TN3270 Service

Viewing TN3270 Service Session Status


Administration Guide

Giving Users Access to 3270 LUs

Assigning Default APPC LUs to Users or Groups

Allowing Open-Ended Access to LUs


TN3270 Service

Adding an LU


APPC Programmer's Guide

Communication Between TPs

Invoking TPs


Administration Guide

Determining the LUs Assigned to a DFT Adapter


Administration Guide

Giving Users Access to 3270 LUs

Planning Guide

LUs for 3270 with Hot Backup Across Servers

LU Pools for 3270 with Hot Backup Across Servers

Host Settings Corresponding to Example

LU Pools for 3270 with Hot Backup Across Connections


Administration Guide

Assigning Default APPC LUs to Users or Groups

Planning Guide

Local LUs for 5250 with Hot Backup Across Servers

Connections for 5250 with Hot Backup Across Servers

Remote LUs for 5250 with Hot Backup Across Servers

AS/400 and SNA Server Settings (for Server and Connection)


Managing Microsoft SNA Server

Configuring for APPC (LU6.2)


Planning Guide

Creating Downstream LUs on the Host Connection


Administration Guide

Specifying the LUs in an LU Pool


Administration Guide

Giving Users Access to 3270 LUs


Planning Guide

Local LUs for 5250 (Multiple LU Example)


Administration Guide

Giving Users Access to 3270 LUs


Installation Guide

Setup Versus SNA Server Admin

TN3270 Service

Exiting Setup

Adding an LU

Editing a TN3270 LU Configuration


CPI-C Programmer's Guide

Invoking TPs


Administration Guide

Setting Up User and Group Access

Copying Properties and LUs Between Users and/or Groups


Administration Guide

Copying Properties Between LUs

Copying Properties Between LUs

Copying Properties Between LUs


Administration Guide

Basic Elements of SNA Server Configurations

Configuring for 3270

Configuring LUs for APPC

Configuring LUs for LUA

Configuring Downstream Connections and LUs


TN3270 Service

Deleting an LU


Administration Guide

Deleting LUs


Administration Guide

Modifying the Display for the Servers and Connections Window


Managing Microsoft SNA Server

SNA Model #1: Hierarchical SNA


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA


TN3270 Service

IBM Terminal Type Support


Administration Guide

Moving an LU to a Different Connection

Specifying the LUs in an LU Pool


Administration Guide

Commonly Required LU Parameters


Administration Guide

Commonly Required LU Parameters


Administration Guide

Configuring Properties for CPI-C

APPC Programmer's Guide

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Side Information

Fundamental Terms for TPs and LUs


Administration Guide

Specifying the LUs in an LU Pool


CPI-C Programmer's Guide

Communication Between TPs


Administration Guide

Resetting LUs

LUA Programmer's Guide

Resetting LUA LUs


TN3270 Service

Viewing SNA Resource Information


TN3270 Service

Viewing TN3270 Service Session Status


Administration Guide

Viewing the Status of Servers, Connections, and LUs


Reference

LUSTAT Sense Codes

Sense Codes


Comprehensive Index - M
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Macintosh

as SNA Server client

available protocols

Macintosh AppleTalk

client-server communication

overview

Setup options

on clients

on servers

Macros

3270, 5250 Applets

used in byte ordering, examples

Mainframes

See also 3270 emulation

communication with SNA servers

connection types (list)

identifiers

in hierarchical SNAs

remote network address setting

XIDs

Management verbs

Managing SNA Server

See also Configuration files; Diagnostic tools; Getting started

deactivating APPC LU-LU session

domain of focus, changing

introduced

resetting LUs

restarting server

starting services

stopping services

Mapped conversations

ALLOCATE used with

calls used for

compared to basic

defined

example

introduced

Max Receive RU Size for mode

Max Send RU Size for mode

Maximizing throughput

See also Performance evaluation

options for

Maximum BTU length

802.2 connections

3270 emulation example configuration

5250 emulation example configuration

Channel connections

downstream systems

Ethernet connections

SDLC connections

token ring connections

X.25 connections

MC_ALLOCATE

MC_CONFIRM

MC_CONFIRMED

MC_DEALLOCATE

MC_FLUSH

MC_GET_ATTRIBUTES

MC_PREPARE_TO_RECEIVE

MC_RECEIVE_AND_POST

MC_RECEIVE_AND_WAIT

MC_RECEIVE_IMMEDIATE

MC_REQUEST_TO_SEND

MC_SEND_CONVERSATION

MC_SEND_DATA

MC_SEND_ERROR

MC_TEST_RTS

Meanings of terms (glossary)

Member servers

Memory

increasing

requirements

TN3270 Service requirements

Menu commands (SNA Server Admin)

File menu

Options menu

Pools menu

Security menu

Services menu

Users menu

View menu

Message Close Delay

Message tracing  See Tracing

Messages

546

client

errors

See also Error messages

list

event log

ignored input

overview

sense codes

Microsoft C-based applications using APPC

See also APPC; APPC verbs

communication between

CSV extensions

CSV return codes

CSVs

design, coding

introduced

invokable TPs

configuring

samples

return codes

SNA Server configuration

troubleshooting

Windows enhancements

Windows extensions

Windows prototype

Microsoft C-based applications using CPI-C

See also Transaction programs

calls

See also specific call

for administering side information

for confirming receipt of data

for ending conversations

for getting information

for receiving data

for reporting errors

for sending data

for starting conversations

in C programs

reference introduction

communication between

communication with LU 6.2 applications

data types

introduction

OS/2 considerations

output parameters

overview

return codes

side information

strings

symbolic constants

Windows considerations

Windows CPI-C

asynchronous support

enhancements for

overview

Windows NT considerations

Microsoft C-based applications using LUA

See also LUA; LUA verbs

compiling, linking

concepts

introduced

LUs

platforms for, considerations

portability

return codes

primary

secondary

samples

SNA considerations

VCBs

command-specific structure

common structure

defined

format

introduced

segment

Microsoft DOS  See MS-DOS; MS-DOS-based clients

Microsoft Networking protocol

client logon process

client-server communication

overview

server broadcasts

Setup options

on clients

on servers

Microsoft Router

Microsoft SNA Server  See SNA Server

Microsoft support services

Microsoft Windows  See Windows; Windows-based clients

Microsoft Windows NT  See Windows NT; Windows NT-based clients

Minimum Contention Winner Limit for mode

MKMSGF utility

Model can be overridden for 3270 LUs

Modems

dial string sent to

dialing

phone numbers

types

Modes

APPC Mode Properties dialog box

configuring

defined

implicit

names, CPI-C

properties

QPCSUPP

standard

Modifying SNA servers

Monitoring session status

Mouse, dragging with

MRCV

MS-DOS

APPC considerations

AS/400 software

available protocols

command-line interface  See snacfg

CPI-C considerations

environment variables

LUA considerations

Microsoft Networking used with

MS-DOS-based 3270 Applet  See 3270 Applets

MS-DOS-based clients

environment variables

installing

maximizing memory

modifying options selected during Setup

removing

system requirements for

tracing on

MSEND

MSENDRCV

Multidrop connections

Multidrop Primary for SDLC connections

Multiple connections, creating

Multiple DFT adapters

Multiple LUs, creating

Multiple parallel sessions

Multiple processes

Multiple sessions

Multiple threads

Multithreaded APINGD

Multithreaded TPs


Planning Guide

Clients Using AppleTalk


Planning Guide

Important Setup Options on a Client


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using AppleTalk


Planning Guide

Communication Between Clients and SNA Servers

Overview of Network Protocols for Clients


Planning Guide

Important Setup Options on a Client


Planning Guide

Important Setup Options on an SNA Server


3270/5250 Applet User's Guide

Using Macros


APPC Programmer's Guide

Windows NT Considerations

LUA Programmer's Guide

Windows NT System Considerations


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Planning Guide

Settings to Check on All Connections


Managing Microsoft SNA Server

SNA Model #1: Hierarchical SNA


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Settings to Check on All Connections


APPC Programmer's Guide

APPC Verbs

CNOS (Change Number of Sessions)

DISPLAY


Administration Guide

Resetting LUs


Administration Guide

Changing the Domain of Focus


Administration Guide

Managing SNA Server

Managing SNA Server


Administration Guide

Resetting LUs


Administration Guide

Starting and Stopping Servers and Connections


Administration Guide

Starting and Stopping Servers and Connections


Administration Guide

Managing SNA Server

Starting and Stopping Servers and Connections


APPC Programmer's Guide

APPC Verbs

[MC_]ALLOCATE


APPC Programmer's Guide

APPC Verbs

Basic and Mapped Conversations Compared

CPI-C Programmer's Guide

Basic and Mapped Conversations Compared


CPI-C Programmer's Guide

Basic and Mapped Conversations Compared


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


APPC Programmer's Guide

Basic and Mapped Conversations Compared

CPI-C Programmer's Guide

Basic and Mapped Conversations Compared


APPC Programmer's Guide

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


Administration Guide

Configuring Modes for LU-LU Pairs


Administration Guide

Configuring Modes for LU-LU Pairs


Planning Guide

Options for Maximizing Communications Throughput


Administration Guide

Advanced 802.2 Configuration

Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Host Settings Corresponding to Example

Host Settings Corresponding to Example


Planning Guide

Connections for 5250 with Hot Backup Across Servers

Connection for 5250 (Multiple LU Example)


Administration Guide

Advanced Channel Configuration

Planning Guide

Settings to Check on Channel, DFT, and Twinax Connections


Planning Guide

Overview of Downstream Connections and LUs

Downstream Connections: Token Ring


Planning Guide

Settings to Check on 802.2 Connections


Administration Guide

Advanced SDLC Configuration

Planning Guide

Settings to Check on SDLC Connections


Planning Guide

Settings to Check on 802.2 Connections


Administration Guide

Advanced X.25 Configuration

Planning Guide

Settings to Check on X.25 Connections


APPC Programmer's Guide

[MC_]ALLOCATE

[MC_]CONFIRM

Multithreaded Send and Receive TPs


APPC Programmer's Guide

[MC_]CONFIRM


APPC Programmer's Guide

[MC_]CONFIRMED


APPC Programmer's Guide

[MC_]DEALLOCATE


APPC Programmer's Guide

[MC_]FLUSH


APPC Programmer's Guide

[MC_]GET_ATTRIBUTES


APPC Programmer's Guide

[MC_]PREPARE_TO_RECEIVE


APPC Programmer's Guide

Windows Considerations

MS-DOS Considerations

[MC_]RECEIVE_AND_POST


APPC Programmer's Guide

Conversation States

[MC_]RECEIVE_AND_WAIT


APPC Programmer's Guide

[MC_]RECEIVE_IMMEDIATE


APPC Programmer's Guide

Conversation States

[MC_]REQUEST_TO_SEND


APPC Programmer's Guide

[MC_]SEND_CONVERSATION


APPC Programmer's Guide

[MC_]SEND_DATA


APPC Programmer's Guide

[MC_]SEND_ERROR


APPC Programmer's Guide

[MC_]TEST_RTS


Microsoft SNA Server Glossary

Microsoft SNA Server Glossary


Installation Guide

Selecting the Server Role

Planning Guide

Deciding About Primary, Backup, and Member SNA Servers


Planning Guide

Memory Problems on Client Systems


Planning Guide

Basic Methods for Evaluating Hardware Requirements


TN3270 Service

System Requirements


Administration Guide

Initiating Actions with Menu Commands


Administration Guide

Initiating Actions with Menu Commands


Administration Guide

Initiating Actions with Menu Commands


Administration Guide

Initiating Actions with Menu Commands


Administration Guide

Initiating Actions with Menu Commands


Administration Guide

Initiating Actions with Menu Commands


Administration Guide

View Menu


TN3270 Service

Specifying Administrative Options


Planning Guide

Error Message 546 on a Client

Error Message 546 on a Client

Memory Problems on Client Systems


TN3270 Service

Client Messages


Reference

Error Messages


TN3270 Service

Messages


TN3270 Service

Ignore Error Message

Event Log Messages


TN3270 Service

Messages


Reference

SNA Sense Codes

Sense Codes


APPC Programmer's Guide

Communication Between TPs


APPC Programmer's Guide

CSV Extensions for the Windows Environment


APPC Programmer's Guide

Common CSV Return Codes


APPC Programmer's Guide

Common Service Verbs


APPC Programmer's Guide

Designing and Coding TPs


APPC Programmer's Guide

Introduction to APPC


APPC Programmer's Guide

Clients Running Windows NT


APPC Programmer's Guide

Sample APPC TPs in the SDK


APPC Programmer's Guide

Common APPC Return Codes


APPC Programmer's Guide

Invoking TPs and the SNA Server Configuration


APPC Programmer's Guide

Troubleshooting for Invokable TPs


APPC Programmer's Guide

SNA Server Enhancements to the Windows Environment


APPC Programmer's Guide

APPC Extensions for the Windows Environment


APPC Programmer's Guide

WinAPPCStartup( )


CPI-C Programmer's Guide

Administering Side Information


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


CPI-C Programmer's Guide

Ending a Conversation


CPI-C Programmer's Guide

Getting Information


CPI-C Programmer's Guide

Receiving Data


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


CPI-C Programmer's Guide

Sending Data


CPI-C Programmer's Guide

Starting a Conversation


CPI-C Programmer's Guide

CPIC Calls in C Programs


CPI-C Programmer's Guide

CPI-C Calls


CPI-C Programmer's Guide

Communication Between TPs


CPI-C Programmer's Guide

CPIC and LU 6.2


CPI-C Programmer's Guide

Data Types


CPI-C Programmer's Guide

Introduction to CPIC


CPI-C Programmer's Guide

OS/2 Considerations


CPI-C Programmer's Guide

Validity of Output Parameters


CPI-C Programmer's Guide

Writing CPI-C Applications


CPI-C Programmer's Guide

Accept_Conversation (cmaccp)


CPI-C Programmer's Guide

Administering Side Information

Side Information


CPI-C Programmer's Guide

Strings


CPI-C Programmer's Guide

Symbolic Constants


CPI-C Programmer's Guide

Windows Considerations


CPI-C Programmer's Guide

Windows CPI-C Asynchronous Support


CPI-C Programmer's Guide

Before Using Windows CPIC


CPI-C Programmer's Guide

Windows CPIC Overview


CPI-C Programmer's Guide

Windows NT Considerations


LUA Programmer's Guide

Compiling and Linking an LUA Application


LUA Programmer's Guide

Concepts


LUA Programmer's Guide

Concepts


LUA Programmer's Guide

Resetting LUA LUs


LUA Programmer's Guide

Windows NT System Considerations


LUA Programmer's Guide

Writing Portable Applications


LUA Programmer's Guide

Primary Return Codes


LUA Programmer's Guide

Secondary Return Codes


LUA Programmer's Guide

LUA Code Samples in the SDK


LUA Programmer's Guide

SNA Considerations

SNA Server Enhancements to the Windows Environment


LUA Programmer's Guide

Command-Specific Structure of LUA VCBs


LUA Programmer's Guide

Common Structure of LUA VCBs


LUA Programmer's Guide

RUI/SLI Definition


LUA Programmer's Guide

The LUA VCB Format


LUA Programmer's Guide

Verb Control Block


LUA Programmer's Guide

OS/2 Considerations


Planning Guide

Client Logons and the Storing of Passwords


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using Microsoft Networking (Named Pipes)


Planning Guide

Communication Between Clients and SNA Servers

Overview of Network Protocols for Clients


Planning Guide

Communication Between SNA Servers

Network Protocol Choices for SNA Servers


Planning Guide

Important Setup Options on a Client


Planning Guide

Important Setup Options on an SNA Server


Planning Guide

Software and Configurations on AS/400 Clients


Installation Guide

Microsoft Support Services


Administration Guide

Configuring Modes for LU-LU Pairs


APPC Programmer's Guide

LOG_MESSAGE


Administration Guide

Configuring Properties for a 3270 LU

Configuring Properties for a 3270 LU Range

Configuring Properties for a 3270 LU Pool


Administration Guide

SNA Server Actions When Sending a Phone Number


Administration Guide

Changing the SNA Server Dialing Method

Installation Guide

Configuring an SDLC Link Service

Configuring an X.25 Link Service


Administration Guide

Basic SDLC Configuration

Phone Number Storage and Modem Types


Administration Guide

Phone Number Storage and Modem Types


Administration Guide

Configuring Modes for LU-LU Pairs


Administration Guide

Configuring Modes for LU-LU Pairs

Managing Microsoft SNA Server

Configuring Modes


Administration Guide

Configuring Modes for LU-LU Pairs

CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


APPC Programmer's Guide

[MC_]CONFIRM


Administration Guide

Configuring Properties for CPI-C

CPI-C Programmer's Guide

Side Information


Administration Guide

Configuring Modes for LU-LU Pairs

Mode Properties for LU-LU Pairs Form


Administration Guide

Configuring Modes for LU-LU Pairs


Administration Guide

Configuring Modes for LU-LU Pairs


Installation Guide

Modifying or Removing SNA Servers


Planning Guide

Status Information in SNA Server Admin

TN3270 Service

Administering TN3270 Service


Administration Guide

Carrying Out Actions by Dragging with the Mouse


APPC Programmer's Guide

Multithreaded Send and Receive TPs


APPC Programmer's Guide

MS-DOS Considerations


Planning Guide

Software and Configurations on AS/400 Clients


Planning Guide

Important Setup Options on a Client


CPI-C Programmer's Guide

Clients Running MS-DOS


Reference

Environment Variables Used on Clients Running Windows Version 3.x, MS-DOS, or OS/2


LUA Programmer's Guide

MS-DOS System Considerations


Planning Guide

Domain and Password Settings for Clients Running Windows for Workgroups


Reference

Environment Variables Used on Clients Running Windows Version 3.x, MS-DOS, or OS/2


Installation Guide

Installing an MS-DOS – Based Client

Managing Microsoft SNA Server

Installing the Client


Planning Guide

Memory Problems on Client Systems


Installation Guide

Modifying Clients


Installation Guide

Removing SNA Server Clients


Installation Guide

SNA Server Clients Running MS-DOS


Administration Guide

Tracing on MS-DOS Based Clients


APPC Programmer's Guide

Multithreaded Send and Receive TPs


APPC Programmer's Guide

Multithreaded Send and Receive TPs


Administration Guide

Advanced SDLC Configuration

Installation Guide

Configuring an SDLC Link Service


Administration Guide

Advanced SDLC Configuration


Administration Guide

Local and Remote Configuration Parameters


Administration Guide

Determining the LUs Assigned to a DFT Adapter


Administration Guide

Commonly Required LU Parameters


Administration Guide

How LUs Work Together for APPC

Configuring Modes for LU-LU Pairs


APPC Programmer's Guide

OS/2 Considerations

CPI-C Programmer's Guide

OS/2 Considerations

LUA Programmer's Guide

Multiple Processes and Multiple Sessions


Administration Guide

How LUs Work Together for APPC

Configuring Modes for LU-LU Pairs

APPC Programmer's Guide

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs

LUA Programmer's Guide

Multiple Processes and Multiple Sessions


APPC Programmer's Guide

Windows NT Considerations

OS/2 Considerations

CPI-C Programmer's Guide

Windows NT Considerations

OS/2 Considerations

LUA Programmer's Guide

Windows NT System Considerations

OS/2 Considerations


CPI-C Programmer's Guide

Multithreaded APINGD


APPC Programmer's Guide

Multithreaded Send and Receive TPs


Comprehensive Index - N
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Named Pipes

client logon process

client-server communication

overview

server broadcasts

Setup options

on clients

on servers

Names

computer

control point

domain

fully qualified

LU  See LU names based on user names

network

resolution

StreetTalk

user

NAP

NCP parameter

802.2 connections

3270 LUs

affecting independent APPC

SDLC connections

settings

X.25 connections

Negative response

Negative response sense codes

net logon command

NetBEUI

NetBIOS

NETID identifier

NetSoft Midrange Bundle

NetSoft Router

NetView

alerts

configuring for

connections used for

defined

diagnostic information

management information

NVAlert

NVRunCmd

options

NetWare IPX/SPX

client logon process

client-server communication

overview

server broadcasts

Setup options

on clients

on servers

Windows for Workgroups adjustments

Network adapters  See Adapters

Network addresses, remote

802.2 connections

downstream systems

X.25 connections

Network names

APPC LUs

remote node, for connections

selecting

server

XID

Network protocols

a brief overview

changing selections

client-server

AppleTalk

Banyan VINES

Microsoft Networking

NetBIOS

NetWare IPX/SPX

overview

TCP/IP

number of, types

overview

selecting, setup

interfaces for

on a client

on a server

overview

Windows for Workgroups adjustments

server broadcasts

TN3270 Service

types (list)

Windows for Workgroups adjustments

Network shares created by Setup

Network, SNA

See also SNA servers

client requests  See Client requests

overview

Networking models

evolution of

hierarchical SNA

peer-oriented SNA

New LUs

3270

5250 (APPC)

downstream

New pools

dialog box

for hot backup

across connections

across servers

New users, groups

3270 emulation

5250 emulation

No retry limit setting, X.25 link service

No Session-Level Security for remote APPC LUs

Node identifiers

See also SNA servers

downstream systems

remote

settings

Nodes  See SNA servers

Nonqueued TPs  See Transaction programs

Novell NetWare  See NetWare IPX/SPX

NRZ, selecting

NRZI, selecting

NS/Router

NT  See Windows NT; Windows NT-based clients

Number of LUs in LU range

Numbers

downstream LU, changing

LU

LU ranges

NVAlert

NVRunCmd


Planning Guide

Client Logons and the Storing of Passwords


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using Microsoft Networking (Named Pipes)


Planning Guide

Communication Between Clients and SNA Servers

Overview of Network Protocols for Clients


Planning Guide

Communication Between SNA Servers

Network Protocol Choices for SNA Servers


Planning Guide

Important Setup Options on a Client


Planning Guide

Important Setup Options on an SNA Server


Planning Guide

Viewing User and Computer Names of 5250 Users

Configuring for 5250 with LU Names Based on User Names


Planning Guide

Settings to Check on All Connections


Planning Guide

Important Setup Options on an SNA Server

Important Setup Options on a Client

Domain and Password Settings for Clients Running Windows for Workgroups


Planning Guide

Settings to Check on All Connections


Planning Guide

Settings to Check on All Connections


TN3270 Service

Specifying Administrative Options


Planning Guide

Network Protocol Choices for SNA Servers

Clients Using Banyan VINES IP


Planning Guide

Viewing User and Computer Names of 5250 Users

Configuring for 5250 with LU Names Based on User Names


Planning Guide

Communication Between SNA Servers

Memory Problems on Client Systems


Administration Guide

Configuring Host Connections

Sample VTAM Parameters for a Token Ring Connection


Administration Guide

Assigning 3270 LUs to Users


Administration Guide

NCP Parameters Needed for Independent APPC


Administration Guide

Configuring Host Connections

Sample VTAM Parameters for an SDLC Connection


Planning Guide

Overview of Connections


Administration Guide

Configuring Host Connections

Sample VTAM Parameters for an X.25 Connection


LUA Programmer's Guide

SNA Considerations


Reference

Sense Codes


Planning Guide

Domain and Password Settings for Clients Running Windows for Workgroups


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Network Protocol Choices for SNA Servers

AS/400 Clients Using the NetSoft Router

Important Setup Options on an SNA Server

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Planning Guide

Settings to Check on All Connections


Planning Guide

AS/400 Clients Using the NetSoft Router


Planning Guide

Network Protocol Choices for SNA Servers

Software and Configurations on AS/400 Clients


Administration Guide

SNA Server NetView Extensions

APPC Programmer's Guide

Creating Specific NetView User Alerts

Managing Microsoft SNA Server

Diagnostic Information Tools

Reference

Alerts Used by Applications, NVAlert, and NVRunCmd


Administration Guide

Configuring for NetView

Managing Microsoft SNA Server

Management of the SNA Server


Reference

Connections Used for NetView and RTM


Administration Guide

SNA Server NetView Extensions


Administration Guide

Using Diagnostic Tools


Administration Guide

Using Diagnostic Tools


Administration Guide

The NVAlert Service

Installation Guide

Components Installed by Setup

Managing Microsoft SNA Server

Diagnostic Information Tools

Reference

Alerts Used by Applications, NVAlert, and NVRunCmd


Administration Guide

The NVRunCmd Service

Installation Guide

Components Installed by Setup

Managing Microsoft SNA Server

Diagnostic Information Tools

Reference

Alerts Used by Applications, NVAlert, and NVRunCmd


Managing Microsoft SNA Server

Diagnostic Information Tools


Planning Guide

Client Logons and the Storing of Passwords


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using NetWare (IPX/SPX)


Planning Guide

Communication Between Clients and SNA Servers

Overview of Network Protocols for Clients


Planning Guide

Communication Between SNA Servers

Network Protocol Choices for SNA Servers


Planning Guide

Important Setup Options on a Client


Planning Guide

Important Setup Options on an SNA Server


Planning Guide

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Downstream Connections: Token Ring


Planning Guide

Settings to Check on X.25 Connections


Administration Guide

Configuring Local APPC LU Properties

Configuring Remote APPC LU Properties


Administration Guide

Basic 802.2 Configuration

Basic SDLC Configuration

Basic X.25 Configuration


Installation Guide

Specifying the Network Domain Name

Planning Guide

Settings to Check on All Connections


Administration Guide

Configuring Servers


Administration Guide

Local and Remote Configuration Parameters


Managing Microsoft SNA Server

What You Will Learn


Installation Guide

Changing Client/Server Protocol Selections


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using AppleTalk


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using Banyan VINES IP


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using Microsoft Networking (Named Pipes)


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using NetWare (IPX/SPX)


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using TCP/IP


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Choosing and Setting Up Network Protocols on SNA Servers

Finding Additional Information About Client-Server Protocols

Network Protocols and Client-Server Communication


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Important Setup Options on a Client


Planning Guide

Important Setup Options on a Client


Planning Guide

Important SNA Server Setup Options


Installation Guide

Selecting Client/Server Protocols

Planning Guide

Choosing and Setting Up Network Protocols on SNA Servers

Planning Guide

Important SNA Server Setup Options


Planning Guide

Adjusting Clients Running Windows for Workgroups


Planning Guide

Communication Between SNA Servers

Network Protocol Choices for SNA Servers


TN3270 Service

TN3270 Protocol Overview


Planning Guide

Communication Between Clients and SNA Servers

Overview of Network Protocols for Clients


Planning Guide

Adjusting Clients Running Windows for Workgroups


Reference

Shares Created by Setup


Planning Guide

SNA Server: Network Overview


Managing Microsoft SNA Server

IBM Systems Network Architecture


Managing Microsoft SNA Server

SNA Model #1: Hierarchical SNA


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA


Planning Guide

3270 Users Connecting to a Mainframe

LUs for 3270 with Hot Backup Across Connections


Planning Guide

Local LUs for 5250 with Hot Backup Across Servers

Remote LUs for 5250 with Hot Backup Across Servers

Remote LU for 5250 (Multiple Local LU Example)


Administration Guide

Configuring Individual Downstream LUs

Configuring Properties for a Downstream LU


Administration Guide

3270 LU Pools

LUA Pools

Configuring Properties for an LUA LU Pool


Planning Guide

LUs for 3270 with Hot Backup Across Connections


Planning Guide

LU Pools for 3270 with Hot Backup Across Servers


Planning Guide

Users and Groups for 3270 with Hot Backup Across Servers

Users and Groups for 3270 with Hot Backup Across Connections


Planning Guide

Users and Groups for 5250 with Hot Backup Across Servers

Users and Groups for 5250 (Multiple LU Example)


Installation Guide

Configuring an X.25 Link Service


Administration Guide

Configuring Session Security for Remote LUs


Planning Guide

Downstream Connections: Token Ring


Administration Guide

Local and Remote Configuration Parameters

Basic 802.2 Configuration

Basic SDLC Configuration

Basic X.25 Configuration


Planning Guide

Settings to Check on All Connections


Planning Guide

Settings to Check on SDLC Connections


Planning Guide

Settings to Check on SDLC Connections


Planning Guide

Network Protocol Choices for SNA Servers

Software and Configurations on AS/400 Clients


Administration Guide

Configuring Numbering for a 3270 LU Range

Configuring Numbering for an LUA LU Range

Configuring Numbering for a Downstream LU Range


Planning Guide

Associating Downstream LUs with Downstream Connections


Administration Guide

Configuring Properties for a 3270 LU

Configuring Local APPC LU Properties

Configuring Properties for an LUA LU

Configuring Properties for a Downstream LU

Planning Guide

Associating Downstream LUs with Downstream Connections


Administration Guide

Modifying the Extension Numbering Format

Configuring Properties for a 3270 LU Range

Modifying the Extension Numbering Format

Modifying the Extension Numbering Format


Administration Guide

Code Page Settings for NVAlert and NVRunCmd

Installation Guide

Components Installed by Setup

Managing Microsoft SNA Server

Diagnostic Information Tools

Reference

Alerts Used by Applications, NVAlert, and NVRunCmd


Administration Guide

Code Page Settings for NVAlert and NVRunCmd

The NVRunCmd Service

Installation Guide

Components Installed by Setup

Managing Microsoft SNA Server

Diagnostic Information Tools

Reference

Alerts Used by Applications, NVAlert, and NVRunCmd


Comprehensive Index - O
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Object types

Offline configurations

adapter properties, specifying

adding servers to

differences from on-site configurations

files for

interfaces

link service properties, specifying

server and service names, specifying

Offline version of SNA Server Admin

differences from regular version

starting

using

OIA (3270 session)

Operating systems

See also specific operating system

AS/400 client software choices

on client, available protocols

Registry variables

TN3270 Service requirements

Operator Information Area (3270 session)

Operator-started invokable TPs  See Transaction programs

Optimizing throughput

See also Performance evaluation

options for

Option set support

Options menu (SNA Server Admin)

initiating actions with

modifying active window by using

Original string defined

OS/2

APPC considerations

available protocols

CPI-C considerations

environment variables

LUA considerations

Microsoft Networking used with

OS/2-based clients

environment variables

installing

modifying options selected during Setup

removing

system requirements for

tracing on

OS/400

Outbound RU size

Outgoing string setting

SDLC link service

X.25 link service

Outgoing SVC setting, X.25 link service

Overview

of SNA

of SNA Server

of TN3270 Service


TN3270 Service

Performance Counters


Administration Guide

Specifying Adapter Properties in an Offline Configuration


Administration Guide

Adding a Server to an Offline Configuration


Administration Guide

Differences Between Offline Configuration and OnSite Configuration


Administration Guide

Guidelines for Offline Configuration


Administration Guide

Offline Configuration


Administration Guide

Specifying Adapter Properties in an Offline Configuration


Administration Guide

Adding a Server to an Offline Configuration


Administration Guide

Using the Offline Version of SNA Server Admin


Administration Guide

Starting the Offline Version of SNA Server Admin


Administration Guide

Using the Offline Version of SNA Server Admin

Adding a Server to an Offline Configuration

Specifying Adapter Properties in an Offline Configuration


3270/5250 Applet User's Guide

Operator Information Area (OIA) Indicators For 3270


Planning Guide

Software and Configurations on AS/400 Clients


Planning Guide

Important Setup Options on a Client


Reference

Setting Variables on Different Operating Systems


TN3270 Service

Overview of TN3270 Service


3270/5250 Applet User's Guide

Operator Information Area (OIA) Indicators For 3270


Planning Guide

Options for Maximizing Communications Throughput


Reference

Option Set Support


Administration Guide

Initiating Actions with Menu Commands


Administration Guide

Options Menu


APPC Programmer's Guide

GET_CP_CONVERT_TABLE


APPC Programmer's Guide

OS/2 Considerations


Planning Guide

Important Setup Options on a Client


CPI-C Programmer's Guide

OS/2 Considerations

Clients Running Windows Version 3.x


APPC Programmer's Guide

Clients Running OS/2

CPI-C Programmer's Guide

Clients Running OS/2

Reference

Environment Variables Used on Clients Running Windows Version 3.x, MS-DOS, or OS/2


LUA Programmer's Guide

OS/2 Considerations


Planning Guide

Clients Using Microsoft Networking (Named Pipes)


APPC Programmer's Guide

Clients Running OS/2

CPI-C Programmer's Guide

Clients Running OS/2

Reference

Environment Variables Used on Clients Running Windows Version 3.x, MS-DOS, or OS/2


Installation Guide

Installing an MS-DOS – Based Client

Managing Microsoft SNA Server

Installing the Client


Installation Guide

Modifying Clients


Installation Guide

Removing SNA Server Clients


Installation Guide

SNA Server Clients Running OS/2


Administration Guide

Tracing on OS/2-Based Clients


Planning Guide

Software and Configurations on AS/400 Clients


TN3270 Service

Specifying Administrative Options


Installation Guide

Configuring an SDLC Link Service


Installation Guide

Configuring an X.25 Link Service


Installation Guide

Configuring an X.25 Link Service


Managing Microsoft SNA Server

Overview


Managing Microsoft SNA Server

Microsoft SNA Server Overview


TN3270 Service

Overview of TN3270 Service


Comprehensive Index - P
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Pacing

Packet Size for X.25 connections

Packing

Paging  See Performance evaluation

Pairing APPC LUs

Parallel sessions

Parameters

See also VTAM

configuration

LU

LUA

Partner LUs

Partner Min Contention Winner Limit for mode

Partner TPs  See Transaction programs

Passwords

storing to simplify logon

Windows for Workgroups settings

Path Errors sense codes

Path, installation

PC code page defined

PC Support

AS/400 clients and

configuration file

Router API

router replacement

Windows for Workgroups and

PCs

connecting to SNA Server

names

PD_STATS subvector type

Peer system defined

Peer-oriented SNAs

Peer-to-peer communication  See APPC

Peer-to-peer networking

Performance counters

Performance evaluation

overview

with Admin tool

with Performance Monitor

Performance Monitor

counters

defined

described

viewing explanation text

Phone numbers (modem)

dial attempt failure

modem requirements for accepting

SDLC connections

SNA Server actions when sending

storage

Phone numbers (product support)

Physical disabilities, users with, accessibility information

Physical units

for 3270 emulation

for 5250 emulation

in hierarchical SNAs

in peer-oriented SNAs

ping utility

Placement of servers

Planning an SNA Server installation

3270 emulation

5250 emulation

a brief overview

centralized vs. noncentralized

domains, server roles

forms

hardware needs, evaluation of

network protocols

See also Network protocols

client-server

overview

server broadcasts

server placement, configuration

PLU-SLU sessions

Poll Address for SDLC connections

Poll Rate for SDLC connections

Poll Retry Limit for SDLC connections

Poll Timeout for SDLC connections

Pools

3270 LU

accessing existing

adding new

assigning LUs to

assigning to user

assigning to users or groups

grouping LUs into

a brief overview

adding

configuring

defined

deleting

display in SNA Server Admin, modifying

downstream LU

accessing existing

adding new

assigning LUs to

associating with downstream connection

introduced

LUA LU

moving LUs to different

names

overview

removing LUs from

resetting LU in, steps

resource information

states, monitoring

Pools for hot backup

across connections

creating, configuring

illustration

across servers

creating, configuring

illustration

overview

Pools menu (SNA Server Admin)

Pop-up windows

Port Number for DFT LUs

Port settings

PREPARE_TO_RECEIVE

Prepare_To_Receive (cmptr)

Primary domain controllers

Primary servers

Problem solving  See Troubleshooting connections

Process support

Processing power requirements

Processors

3720, 3725, 3745

requirements

Product support services

Profiles

FM

TS

Program check codes

Programming Interface for Communications  See CPI-C

Programs using APPC

See also APPC; APPC verbs

communication between

CSV extensions

CSV return codes

CSVs

design, coding

introduced

invokable TPs

configuring

samples

return codes

SNA Server configuration

troubleshooting

Windows enhancements

Windows extensions

Windows prototype

Programs using CPI-C

See also Transaction programs

calls

See also specific call

for administering side information

for confirming receipt of data

for ending conversations

for getting information

for receiving data

for reporting errors

for sending data

for starting conversations

in C programs

reference introduction

communication between

communication with LU 6.2 applications

data types

introduction

OS/2 considerations

output parameters

overview

return codes

side information

strings

symbolic constants

Windows considerations

Windows CPI-C

asynchronous support

enhancements for

overview

Windows NT considerations

Programs using LUA

See also LUA; LUA verbs

compiling, linking

concepts

introduced

LUs

platforms for, considerations

portability

return codes

primary

secondary

samples

SNA considerations

VCBs

command-specific structure

common structure

defined

format

introduced

segment

Protocols, connection  See Connections

Protocols, network

a brief overview

changing selections

client-server

AppleTalk

Banyan VINES

Microsoft Networking

NetBIOS

NetWare IPX/SPX

overview

TCP/IP

number of, types

overview

selecting, setup

interfaces for

on a client

on a server

overview

Windows for Workgroups adjustments

server broadcasts

TN3270 Service

types (list)

Windows for Workgroups adjustments

Protocols, SNA  See Connections

PU-SSCP session

PUs

for 3270 emulation

for 5250 emulation

in hierarchical SNAs

in peer-oriented SNAs

PVC Alias for X.25 connections

PVC setting, X.25 link service


Administration Guide

Configuring Modes for LU-LU Pairs

LUA Programmer's Guide

SNA Considerations


Administration Guide

Advanced X.25 Configuration


APPC Programmer's Guide

Windows NT Considerations

Windows Considerations

MS-DOS Considerations

OS/2 Considerations

CPI-C Programmer's Guide

Windows Considerations

OS/2 Considerations

LUA Programmer's Guide

Windows NT System Considerations

Windows Environment Considerations

MS-DOS System Considerations

OS/2 Considerations


Administration Guide

Pairing Local and Remote LUs


Administration Guide

How LUs Work Together for APPC

Configuring Modes for LU-LU Pairs

APPC Programmer's Guide

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


Administration Guide

Local and Remote Configuration Parameters


Administration Guide

Commonly Required LU Parameters


LUA Programmer's Guide

Using LUA Verbs

Common Data Structure

Specific Data Structure


Administration Guide

Configuring Properties for CPI-C

APPC Programmer's Guide

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Side Information

Fundamental Terms for TPs and LUs


Administration Guide

Configuring Modes for LU-LU Pairs


Planning Guide

Client Logons and the Storing of Passwords


Planning Guide

Domain and Password Settings for Clients Running Windows for Workgroups


Reference

SNA Sense Codes

Path Errors (Category X'80')

Sense Codes


TN3270 Service

Specifying the Installation Path


APPC Programmer's Guide

GET_CP_CONVERT_TABLE


Planning Guide

Software and Configurations on AS/400 Clients


Installation Guide

Installing an MS-DOS – Based Client


APPC Programmer's Guide

MS-DOS Considerations


Installation Guide

Installing an MS-DOS – Based Client


Installation Guide

Installing an MS-DOS – Based Client


Planning Guide

SNA Server: Network Overview


Planning Guide

Viewing User and Computer Names of 5250 Users

Configuring for 5250 with LU Names Based on User Names


APPC Programmer's Guide

OS/2 Considerations


Administration Guide

Remote System Types


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA


Administration Guide

Performance Monitor Options for SNA Server

Planning Guide

Performance Monitor

TN3270 Service

Performance Counters


Planning Guide

Evaluating Demand and Performance on an SNA Server


Planning Guide

Status Information in SNA Server Admin


Planning Guide

Performance Monitor


Administration Guide

Performance Monitor Options for SNA Server

Planning Guide

Performance Monitor


Administration Guide

Performance Monitor Options for SNA Server


Managing Microsoft SNA Server

Diagnostic Information Tools

Planning Guide

Performance Monitor


Planning Guide

Performance Monitor


Administration Guide

SNA Server Actions When Sending a Phone Number


Administration Guide

Modem Requirements for Accepting a Phone Number from SNA Server


Administration Guide

Basic SDLC Configuration


Administration Guide

SNA Server Actions When Sending a Phone Number


Administration Guide

Basic SDLC Configuration

Phone Number Storage and Modem Types


Installation Guide

Product Support Within the United States and Canada


Installation Guide

Accessibility for People with Disabilities


Planning Guide

3270 Users Connecting to a Mainframe


Planning Guide

5250 Users Connecting to an AS/400


Managing Microsoft SNA Server

SNA Model #1: Hierarchical SNA


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA


Planning Guide

Clients Using TCP/IP


Planning Guide

Centralized and Branch Configurations


Planning Guide

3270 Users Connecting to a Mainframe


Planning Guide

5250 Users Connecting to an AS/400


Managing Microsoft SNA Server

Overview


Installation Guide

Planning SNA Server Domains


Planning Guide

Deciding About Domains and Server Roles


Administration Guide

SNA Server Preparation Forms


Planning Guide

Basic Methods for Evaluating Hardware Requirements


Planning Guide

Network Protocol Choices for SNA Servers

Finding Additional Information About Client-Server Protocols


Planning Guide

Choosing and Setting Up Network Protocols on SNA Servers

Finding Additional Information About Client-Server Protocols


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Centralized and Branch Configurations


Reference

Session Support


Administration Guide

Advanced SDLC Configuration


Administration Guide

Advanced SDLC Configuration


Administration Guide

Advanced SDLC Configuration


Administration Guide

Advanced SDLC Configuration


Administration Guide

3270 LU Pools


Administration Guide

3270 LU Pools


Administration Guide

Specifying the LUs in an LU Pool


Administration Guide

Giving Users Access to 3270 LUs


Administration Guide

Configuring for 3270


Administration Guide

Configuring for 3270


Managing Microsoft SNA Server

Using 3270 LU Pools


TN3270 Service

Adding an LU


TN3270 Service

Exiting Setup

Adding an LU

Editing a TN3270 LU Configuration


Administration Guide

Using LU Pools to Maximize Access


TN3270 Service

Deleting an LU


Administration Guide

Modifying the Display for the LU Pools Window


Administration Guide

Downstream Pools


Administration Guide

Downstream Pools


Administration Guide

Specifying the LUs in an LU Pool


Administration Guide

Associating Downstream LUs with a Downstream Connection


Administration Guide

Using LU Pools to Maximize Access


Administration Guide

LUA Pools

Specifying the LUs in an LU Pool

LUA Programmer's Guide

Configuring for LUA

LUA Pools: Programming Techniques


Administration Guide

Specifying the LUs in an LU Pool


Administration Guide

Configuring Properties for a 3270 LU Pool

Configuring Properties for an LUA LU Pool

Downstream Pools


Administration Guide

Basic Elements of SNA Server Configurations


Administration Guide

Specifying the LUs in an LU Pool


Administration Guide

Resetting an LU in an LU Pool


TN3270 Service

Viewing SNA Resource Information


TN3270 Service

Viewing TN3270 Service Session Status


Planning Guide

LU Pools for 3270 with Hot Backup Across Connections


Planning Guide

Configuring for 3270 with Hot Backup Across Connections


Planning Guide

LU Pools for 3270 with Hot Backup Across Servers


Planning Guide

Configuring for 3270 with Hot Backup Across Servers


Planning Guide

Examples of Configurations for 3270


Administration Guide

Initiating Actions with Menu Commands


3270/5250 Applet User's Guide

Displaying of Pop-Up Messages in the 5250 Applet

Installation Guide

Using Dialog Boxes


Administration Guide

Configuring Properties for a 3270 LU

Configuring Properties for an LUA LU


Installation Guide

Configuring an SDLC Link Service

Configuring an X.25 Link Service


APPC Programmer's Guide

APPC Verbs

[MC_]PREPARE_TO_RECEIVE


CPI-C Programmer's Guide

Prepare_To_Receive (cmptr)


Planning Guide

Deciding About Domain Controllers (Logon Servers)


Administration Guide

Configuration Files on Primary and Backup SNA Servers

Installation Guide

SNA Server Components

Selecting the Server Role

Planning Guide

Deciding About Primary, Backup, and Member SNA Servers


LUA Programmer's Guide

OS/2 Considerations


Planning Guide

Basic Methods for Evaluating Hardware Requirements


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Basic Methods for Evaluating Hardware Requirements


Installation Guide

Microsoft Support Services


Reference

Transmission Service and Function Management Profiles

TS Profile 4


Reference

Transmission Service and Function Management Profiles


Reference

Program Check Codes


APPC Programmer's Guide

Communication Between TPs


APPC Programmer's Guide

CSV Extensions for the Windows Environment


APPC Programmer's Guide

Common CSV Return Codes


APPC Programmer's Guide

Common Service Verbs


APPC Programmer's Guide

Designing and Coding TPs


APPC Programmer's Guide

Introduction to APPC


APPC Programmer's Guide

Clients Running Windows NT


APPC Programmer's Guide

Sample APPC TPs in the SDK


APPC Programmer's Guide

Common APPC Return Codes


APPC Programmer's Guide

Invoking TPs and the SNA Server Configuration


APPC Programmer's Guide

Troubleshooting for Invokable TPs


APPC Programmer's Guide

SNA Server Enhancements to the Windows Environment


APPC Programmer's Guide

APPC Extensions for the Windows Environment


APPC Programmer's Guide

WinAPPCStartup( )


CPI-C Programmer's Guide

Administering Side Information


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


CPI-C Programmer's Guide

Ending a Conversation


CPI-C Programmer's Guide

Getting Information


CPI-C Programmer's Guide

Receiving Data


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


CPI-C Programmer's Guide

Sending Data


CPI-C Programmer's Guide

Starting a Conversation


CPI-C Programmer's Guide

CPIC Calls in C Programs


CPI-C Programmer's Guide

CPI-C Calls


CPI-C Programmer's Guide

Communication Between TPs


CPI-C Programmer's Guide

CPIC and LU 6.2


CPI-C Programmer's Guide

Data Types


CPI-C Programmer's Guide

Introduction to CPIC


CPI-C Programmer's Guide

OS/2 Considerations


CPI-C Programmer's Guide

Validity of Output Parameters


CPI-C Programmer's Guide

Writing CPI-C Applications


CPI-C Programmer's Guide

Accept_Conversation (cmaccp)


CPI-C Programmer's Guide

Administering Side Information

Side Information


CPI-C Programmer's Guide

Strings


CPI-C Programmer's Guide

Symbolic Constants


CPI-C Programmer's Guide

Windows Considerations


CPI-C Programmer's Guide

Windows CPI-C Asynchronous Support


CPI-C Programmer's Guide

Before Using Windows CPIC


CPI-C Programmer's Guide

Windows CPIC Overview


CPI-C Programmer's Guide

Windows NT Considerations


LUA Programmer's Guide

Compiling and Linking an LUA Application


LUA Programmer's Guide

Concepts


LUA Programmer's Guide

Concepts


LUA Programmer's Guide

Resetting LUA LUs


LUA Programmer's Guide

Windows NT System Considerations


LUA Programmer's Guide

Writing Portable Applications


LUA Programmer's Guide

Primary Return Codes


LUA Programmer's Guide

Secondary Return Codes


LUA Programmer's Guide

LUA Code Samples in the SDK


LUA Programmer's Guide

SNA Considerations

SNA Server Enhancements to the Windows Environment


LUA Programmer's Guide

Command-Specific Structure of LUA VCBs


LUA Programmer's Guide

Common Structure of LUA VCBs


LUA Programmer's Guide

RUI/SLI Definition


LUA Programmer's Guide

The LUA VCB Format


LUA Programmer's Guide

Verb Control Block


LUA Programmer's Guide

OS/2 Considerations


Managing Microsoft SNA Server

Microsoft SNA Server Overview


Installation Guide

Changing the Server Role


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using AppleTalk


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using Banyan VINES IP


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using Microsoft Networking (Named Pipes)


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using NetWare (IPX/SPX)


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using TCP/IP


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Choosing and Setting Up Network Protocols on SNA Servers

Finding Additional Information About Client-Server Protocols

Network Protocols and Client-Server Communication


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Important Setup Options on a Client


Planning Guide

Important Setup Options on a Client


Planning Guide

Important Setup Options on an SNA Server


Installation Guide

Selecting Client/Server Protocols

Planning Guide

Choosing and Setting Up Network Protocols on SNA Servers

Important SNA Server Setup Options


Planning Guide

Adjusting Clients Running Windows for Workgroups


Planning Guide

Communication Between SNA Servers

Network Protocol Choices for SNA Servers


TN3270 Service

Session Initiation


Planning Guide

Communication Between Clients and SNA Servers

Overview of Network Protocols for Clients


Planning Guide

Adjusting Clients Running Windows for Workgroups


LUA Programmer's Guide

LUs and Sessions


Planning Guide

3270 Users Connecting to a Mainframe


Planning Guide

5250 Users Connecting to an AS/400


Managing Microsoft SNA Server

SNA Model #1: Hierarchical SNA


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA


Administration Guide

Advanced X.25 Configuration


Installation Guide

Configuring an X.25 Link Service


Comprehensive Index - Q
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

QLLC

Queued TPs  See Transaction programs


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Comprehensive Index - R
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

RAM

requirements

shortages

TN3270 Service requirements

Ranges of LUs

See also LUs

configuring

README file, TN3270 Service

Receive (cmrcv)

Receive ACK (t2) Timeout for 802.2 connections

Receive ACK Threshold for 802.2 connections

RECEIVE conversation state

RECEIVE_ALLOCATE

RECEIVE_AND_POST

RECEIVE_AND_WAIT

RECEIVE_IMMEDIATE

Receiving data, CPI-C calls for

Reconfiguring LUs  See LUs

RECVTP

Redundancy

Registering applications

Registry variables

APPC

CPIC

for TN3270 Service

keys created by Setup

list

Remote clients

Remote End for connections

Remote LUs

APPC  See APPC LUs

configuring

CPI-C transaction programs and

defined

for 5250 sessions

with hot backup

with multiple local LUs

Remote network addresses

802.2 connections

downstream systems

X.25 connections

Remote node identifiers

See also SNA servers

downstream systems

overview

settings

Remote SAP Address for 802.2 connections

Remote station response failure

Remote system types

Remote TPs  See Transaction programs

Remote X.25 Address for X.25 connections

Remove tool (TN3270 Service)

Removing

LUs

SNA Server

TN3270 Service

Renumbering downstream LUs

Reporting errors, CPI-C calls for

Request Errors sense codes

Request Reject sense codes

Requests, client

network protocols

overview

Requests, command

sense codes

SNA Server support for

Requests for confirmation

Requests, invoking TP

REQUEST_TO_SEND

Request_To_Send (cmrts)

RESET conversation state

Resetting LU defined

Resolver use

Resource access

Resource information

Resource object type

Resource shortages

Response (t1) Timeout for 802.2 connections

Response Time Monitor

a brief overview

connections used for

data, parameters

settings

Retry Limit

RH Usage Errors sense codes

RMTCPNAME identifier

RMTNETID identifier

Router, SNA Server

Routers, IP

Routers, software for AS/400 clients

Routines  See specific API

RTM

a brief overview

connections used for

data, parameters

settings

RUI function

RUI_BID

RUI_INIT

RUI_PURGE

RUI_READ

RUI/SLI

RUI_TERM

RUI_WRITE

Run-time linking

RUs


Planning Guide

Basic Methods for Evaluating Hardware Requirements


Planning Guide

Memory Problems on Client Systems


TN3270 Service

System Requirements


Administration Guide

Configuring a Range of Downstream LUs

Managing Microsoft SNA Server

Configuring LUs


TN3270 Service

Overview of TN3270 Service Installation


CPI-C Programmer's Guide

Receive (cmrcv)


Administration Guide

Advanced 802.2 Configuration


Administration Guide

Advanced 802.2 Configuration


CPI-C Programmer's Guide

Conversation States


APPC Programmer's Guide

APPC Verb Summary

RECEIVE_ALLOCATE


APPC Programmer's Guide

Windows Considerations

MS-DOS Considerations

[MC_]RECEIVE_AND_POST

WinAsyncAPPCEx( )


APPC Programmer's Guide

APPC Verb Summary

[MC_]RECEIVE_AND_WAIT

WinAsyncAPPCEx( )


APPC Programmer's Guide

APPC Verb Summary

[MC_]RECEIVE_IMMEDIATE


CPI-C Programmer's Guide

Receiving Data


APPC Programmer's Guide

APPC Send and Receive TPs


TN3270 Service

Pre-Installation Considerations


APPC Programmer's Guide

Windows NT Considerations

Windows Considerations

LUA Programmer's Guide

Windows NT System Considerations

Windows Environment Considerations


APPC Programmer's Guide

Clients Running Windows NT


CPI-C Programmer's Guide

Clients Running Windows NT


TN3270 Service

Setup Versus TN3270 Service Admin

Registry Value Entries


Reference

Registry Keys Created by Setup


Reference

Lists of Available Variables


Installation Guide

Clients in Relation to the Domain of Servers


Administration Guide

Initial Connection Configuration


Managing Microsoft SNA Server

Configuring for APPC (LU6.2)


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


APPC Programmer's Guide

Fundamental Terms for TPs and LUs


Planning Guide

Remote LUs for 5250 with Hot Backup Across Servers


Planning Guide

AS/400 and SNA Server Settings (for Server and Connection)


Administration Guide

Local and Remote Configuration Parameters

Basic 802.2 Configuration

Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Overview of Downstream Connections and LUs

Downstream Connections: Token Ring


Planning Guide

Settings to Check on X.25 Connections


Planning Guide

Overview of Downstream Connections and LUs

Downstream Connections: Token Ring


Administration Guide

Local and Remote Configuration Parameters


Administration Guide

Basic 802.2 Configuration

Basic SDLC Configuration

Basic X.25 Configuration

Planning Guide

Settings to Check on All Connections


Administration Guide

Advanced 802.2 Configuration


Planning Guide

Event 230 on an SNA Server


Administration Guide

Remote System Types


Administration Guide

Local and Remote Configuration Parameters

Basic X.25 Configuration


TN3270 Service

Components Installed by Setup

Removing TN3270 Service


TN3270 Service

Deleting an LU


Installation Guide

Removing SNA Server


TN3270 Service

Removing TN3270 Service


Planning Guide

Associating Downstream LUs with Downstream Connections


CPI-C Programmer's Guide

Confirming Receipt of Data and Reporting Errors


Reference

Request Errors (Category X'10')

Sense Codes


Reference

Request Reject (Category X'08')

Sense Codes


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Planning Guide

Communication Between Clients and SNA Servers

Network Protocol Choices for SNA Servers


Reference

SNA Sense Codes

Sense Codes


Reference

Command Request Support


CPI-C Programmer's Guide

Confirmation Processing


CPI-C Programmer's Guide

How an Invokable TP is Matched to an Invoking TP’s Request


APPC Programmer's Guide

APPC Verb Summary

[MC_]REQUEST_TO_SEND


CPI-C Programmer's Guide

Conversation States

Request_To_Send (cmrts)


CPI-C Programmer's Guide

Conversation States


Administration Guide

Resetting an LU in an LU Pool


TN3270 Service

Specifying Administrative Options


TN3270 Service

Adding an LU


TN3270 Service

Viewing SNA Resource Information


TN3270 Service

TN3270 SNA Resource Object


Planning Guide

Event 2001 on an SNA Server


Administration Guide

Advanced 802.2 Configuration


Managing Microsoft SNA Server

Diagnostic Information Tools


Reference

Connections Used for NetView and RTM


Reference

Collecting RTM Data and Sending it to the Host


Administration Guide

Configuring RTM Settings


Administration Guide

Advanced 802.2 Configuration


Reference

SNA Sense Codes

State Errors (Category X'20')

Sense Codes


Planning Guide

Settings to Check on All Connections


Planning Guide

Settings to Check on All Connections


Planning Guide

Software and Configurations on AS/400 Clients

AS/400 Clients Using PC Support


Installation Guide

Completing Setup

Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

AS/400 Clients Using PC Support


Managing Microsoft SNA Server

Diagnostic Information Tools


Reference

Connections Used for NetView and RTM


Reference

Collecting RTM Data and Sending it to the Host


Administration Guide

Configuring RTM Settings


LUA Programmer's Guide

RUI/SLI Definition


LUA Programmer's Guide

RUI_BID


LUA Programmer's Guide

RUI_INIT


LUA Programmer's Guide

RUI_PURGE


LUA Programmer's Guide

RUI_READ


LUA Programmer's Guide

RUI( ) / SLI( )


LUA Programmer's Guide

RUI_TERM


LUA Programmer's Guide

RUI_WRITE


APPC Programmer's Guide

Windows NT Considerations

Windows Considerations

OS/2 Considerations

CPI-C Programmer's Guide

Windows NT Considerations

Windows Considerations

OS/2 Considerations

LUA Programmer's Guide

Windows NT System Considerations

Windows Environment Considerations

OS/2 Considerations


TN3270 Service

Specifying Administrative Options


Comprehensive Index - S
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Samples  See Examples

SAP

Saving configurations

See also Configuration files

3270 and 5250 Applets

TN3270 Service

Saving passwords to simplify logon

SDK

SDLC connections

See also Connections

3270 emulation

5250 emulation

a brief overview

avoiding address or interrupt conflicts

capacity

configuring

creating new

described, speeds

downstream system

link alerts  See Link alerts

link service, configuring

link statistics

NCP and SNA Server parameters

settings

troubleshooting

VTAM

Security

administrative access

administrative permissions

AS/400 and

configuration files

auditing access to

controlling

conversation

FAT partition and

HPFS partition and

increasing, steps for

link services and

logon process used by client

LUs, allowing open-ended access to

mainframes and

Microsoft networking and

non-Microsoft networking and

NTFS partition and

overview

session, for remote APPC LUs

SNA Server Admin and

SnaBase and

snacfg program and

SnaNetMn and

SnaServer and

TN3270 Service and

Windows NT and

Security keys, remote APPC LUs

Security menu (SNA Server Admin)

Segmentation

Select standby setting

Selecting items, commands

Semaphores, implementing

SEND conversation state

SEND_CONVERSATION

SEND_DATA

Send_Data (cmsend)

SEND_ERROR

Send_Error (cmserr)

Sending data, CPI-C calls for

SEND-PENDING conversation state

SENDTP

Sense codes

Server broadcasts

configuring

introduced

network protocols for

introduction

number of

selecting, setup

Server Information form

Server Resources Planning form

Servers and Connections window (SNA Server Admin)

Servers, logon

Servers, SNA

adding to offline configurations

as domain controllers

assigning local APPC LUs to

backup

capacity of

changing configuration role

communication between

communication with clients

communication with hosts

components

configuring

connection types (list)

events

hardware requirements

hot backup across  See Hot backup of 3270 sessions; Hot backup of 5250 sessions

installing

Macintosh client support

maximizing throughput

member

network protocol selection, setup

See also Network protocols

client-server

overview

server broadcasts

number required

parameters required

performance evaluation

placement, configuration

primary

roles of

settings

for 5250 with hot backup

for 5250 with multiple local LUs

overview

starting or restarting

status

stopping

user access rights

Servers, Windows NT, domain control

Service access point

Service object type

Service TPs  See Transaction programs

Services  See specific service; Link services

Services menu (SNA Server Admin)

Session connections  See Connections

Session contention

Session control requests

Session object type

Session section, 3270 Applet Configuration Utility

Sessions

See also specific type; 3270 emulation; 5250 emulation

control requests

LU contention

multiple

RUI

settings, Applets

simultaneous

SLI

TN3270 Service

types, number supported

Set_Conversation_Security_Password (cmscsp)

Set_Conversation_Security_Type (cmscst)

Set_Conversation_Security_User_ID (cmscsu)

Set_Conversation_Type (cmsct)

Set_CPIC_Side_Information (xcmssi)

Set_Deallocate_Type (cmsdt)

Set_Error_Direction (cmsed)

Set_Fill (cmsf)

Set_Log_Data (cmsld)

Set_Mode_Name (cmsmn)

Set_Partner_LU_Name (cmspln)

Set_Prepare_To_Receive_Type (cmsptr)

Set_Processing_Mode (cmspm)

Set_Receive_Type (cmsrt)

Set_Return_Control (cmsrc)

Set_Send_Type (cmsst)

Set_Sync_Level (cmssl)

Settings, configuration

See also Connections

802.2 connections

Channel connections

DFT connections

downstream connections  See Downstream connections

identifiers

overview

SDLC connections

Twinax connections

X.25 connections

Settings, host

3270 emulation

5250 emulation

downstream system

overview

Settings, SNA servers

5250 emulation

with hot backup

with multiple local LUs

overview

Set_TP_Name (cmstpn)

Setup

See also Installation planning; Link services

a brief overview

already installed SNA Server

components installed by

dialog box

directory tree created

exiting

first installation of SNA Server

introduced

link services, after installing and configuring

network protocol selection

client-server

overview

server broadcasts

pop-up windows

Registry keys created

requirements to use

running again

selecting by double-clicking

shares created

starting

steps to follow

TN3270 Service

Setup Options dialog box

SET_USER_LOG_QUEUE

Shares

configuration file and

created by Setup

Shortages

memory, on clients

resource

Side information

Simultaneous conversations

Single-system APPC, configuring

SLI function

SLI_BID

SLI_BIND_ROUTINE

SLI_CLOSE

SLI_OPEN

SLI_PURGE

SLI_RECEIVE

SLI_SEND

SLI_STSN_ROUTINE

SNA

a brief overview

LUA applications and

TN3270 Service and

SNA applications, tracing  See Tracing

SNA clients  See Client requests; Clients; MS-DOS-based clients; OS/2-based clients; TN clients; Windows-based clients; Windows for Workgroups-based clients; Windows NT-based clients

SNA network

See also SNA servers

client requests  See Client requests

models  See Networking models

overview

SNA Resource object type

SNA Server

See also specific subject, component; Administering SNA Server; Managing SNA Server; SNA servers

3270 emulation installation

5250 emulation installation

a brief overview

additions, accessing

architecture (illustration)

CD-ROM, contents of

Comm Server and

command request support

communication between versions, enabling

components

configuration

See also Configurations

a brief overview

connections  See Connections

connectivity options

described

error messages (list)

features, overview

in hierarchical SNAs

in peer-oriented SNAs

installation

See also Installing SNA Server

a brief overview

details

steps to follow

new features in this release

option set support

overview

profiles

FM

TS

Registry variables

Router  See SNA Server Router

sense codes

session support limits

Setup

See also Setup

a brief overview

details

steps to follow

starting, stopping

TN3270 Service as client of

upgrading to  See Upgrading

version 2.0 support

SNA Server Admin

a brief overview

display

contents

introduced

modifying

initiating actions with

introduced

keys

mouse

Toolbar buttons

introduced

link services, installing

menu commands

network protocol selection

offline version

performance evaluation using status information

security and

selecting

server broadcast options

Setup program

TN3270 Service and

Toolbar

upgrading, using after

window

SNA Server Router

before installing

communication buffers, increasing number of, example

CONFIG.PCS

CONFIG.SYS

configuration file, modifying

defined

drivers loaded with PC Support

installing

link identification identifier, specifying, example

removing

software overview

starting

SNA Server Setup  See Setup

SNA Server Trace

SNA servers

adding to offline configurations

as domain controllers

assigning local APPC LUs to

backup

capacity of

changing configuration role

communication between

communication with clients

communication with hosts

components

configuring

connection types (list)

events

hardware requirements

hot backup across  See Hot backup of 3270 sessions; Hot backup of 5250 sessions

installing

Macintosh client support

maximizing throughput

member

network protocol selection, setup

See also Network protocols

client-server

overview

server broadcasts

number required

parameters required

performance evaluation

placement, configuration

primary

roles of

settings

for 5250 with hot backup

for 5250 with multiple local LUs

overview

starting or restarting

status

stopping

user access rights

SNA tracing  See Tracing

SnaBase

SnaBase tracing  See Tracing

snacfg

/add option

command files

commands

Snacfg APPCLLU

Snacfg APPCRLU

Snacfg Connection

Snacfg CPIC

Snacfg Diagnostic

Snacfg Link

Snacfg LU

Snacfg LUA

Snacfg LUD

Snacfg Mode

Snacfg Pool

Snacfg PoolA

Snacfg PoolD

Snacfg Server

Snacfg User

configuration file, specifying

connections, options

802.2

all connection types

downstream

SDLC

X.25

LUs

assigning

creating

overview

overview

/print option

SNADFTLU.EXE utility

SNALinks, developing

Refer to the SNA Server SNA Device Interface Specification.

SnaNMVT

SnaServer service

defined

installed by Setup

security and

Registry variables

tracing  See Tracing

snatrace utility

Sockets  See TCP/IP

Software

link support, developing  Refer to the SNA Server SNA Device Interface Specification.

on AS/400 clients

recording identifying information

router

TN3270 Service requirements

upgrading

Software Development Kit

Solution Providers

Source code page defined

Source string used with CONVERT

Specifications, interface

3270 emulator  Refer to the SNA Server 3270 Emulator Interface Specification.

SNA device  Refer to the SNA Server SNA Device Interface Specification.

Specify_Local_TP_Name (cmsltp)

Specify_Windows_Handle (xchwnd)

Speed of connections  See specific connection type

Split line, moving

Sponsor connections

See also Connections

APPC

CPI-C

error message 546

establishing

overview

protocols

SQL Server

SSCP sessions

SSCP-LU sessions

SSCP-LU state

SSCPNAME identifier

SSCP-PU sessions

Stack size

Starting

services

SNA Server

TN3270 Service

tracing

Startup restart setting, X.25 link service

Startup section, 3270 Applet Configuration Utility

State check  See Conversation states

State Errors sense codes

States  See Conversation states

Statistics, link

Status information (SNA Server Admin tool)

Stopping

services

SNA Server

TN3270 Service

tracing

Storing passwords to simplify logon

StreetTalk names

Subvectors

link alerts

other alerts

Success messages

Support services, Microsoft Support Network

Supports Parallel Sessions setting, remote APPC LUs

SVC connections

Switched Connection Establishment Timeout for SDLC connections

Switched: Manual Dial setting, X.25 link service

Switched: Modem-Stored Number setting, X.25 link service

Symbolic constants

Symbolic destination names

Synchronization levels

Synchronous Data Link Control  See SDLC connections

Synchronous verbs

completion

defined

System requirements

adapter support

clients running

MS-DOS

OS/2

Windows

Windows NT

evaluating hardware, demand

for TN3270 Service

Windows-based APIs supported

Windows NT-based SNA server

SYSTEM.INI, Windows for Workgroups settings

Systems, downstream  See Downstream connections; Downstream systems

Systems Network Architecture  See SNA


Installation Guide

Configuring a DLC 802.2 Link Service


3270/5250 Applet User's Guide

Saving a Configuration

Saving the Configuration


TN3270 Service

Configuring TN3270 Service


Planning Guide

Client Logons and the Storing of Passwords


APPC Programmer's Guide

Verb Control Block

Sample APPC TPs in the SDK

CPI-C Programmer's Guide

Sample CPI-C TPs in the SDK


Planning Guide

Connections for 3270 with Hot Backup Across Servers

Connections for 3270 with Hot Backup Across Connections


Planning Guide

Connections for 5250 with Hot Backup Across Servers


Managing Microsoft SNA Server

Connecting to the Network


Installation Guide

Avoiding Interrupt or Address Conflicts Between Adapters


Administration Guide

SNA Server Adapter and Connection Capacities


Installation Guide

Overview of SNA Server

Avoiding Interrupt or Address Conflicts Between Adapters

Configuring an SDLC Link Service


Administration Guide

Initial Connection Configuration


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Planning Guide

Host Connection: SDLC


Installation Guide

Configuring an SDLC Link Service


Reference

Link Statistics

Format for Link Statistics


Administration Guide

Configuring Host Connections


Administration Guide

Initial Connection Configuration

Basic SDLC Configuration

Advanced SDLC Configuration

SDLC Settings Form

Installation Guide

Overview of SNA Server

Managing Microsoft SNA Server

Basic SDLC Settings

Planning Guide

Settings to Check on SDLC Connections


Planning Guide

Settings to Check on SDLC Connections


Administration Guide

Configuring Host Connections

Reference

SDLC Definition (for Switched and Leased Lines)


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Resources to Consider When Establishing Security

Installation Guide

File System Choices and Security

File System Choices and Security


Administration Guide

Security with Windows NT, SNA Server, and Other SNA Systems


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Security with Windows NT, SNA Server, and Other SNA Systems

Increasing the Security of SNA Servers in a Domain

File System Choices and Security

Resources to Consider When Establishing Security


Administration Guide

Configuring Properties for CPI-C

APPC Programmer's Guide

Conversation Security

CPI-C Programmer's Guide

Side Information

Conversation Security


Administration Guide

File System Choices and Security

Resources to Consider When Establishing Security


Administration Guide

File System Choices and Security

Resources to Consider When Establishing Security


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Client Logon


Administration Guide

Allowing Open-Ended Access to LUs


Administration Guide

Security with Windows NT, SNA Server, and Other SNA Systems


Administration Guide

Client Logon


Administration Guide

Client Logon


Administration Guide

File System Choices and Security

Resources to Consider When Establishing Security

Installation Guide

File System Choices and Security

File System Choices and Security


Administration Guide

Security with Windows NT, SNA Server, and Other SNA Systems

Client Logon


Administration Guide

Configuring Session Security for Remote LUs


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Resources to Consider When Establishing Security


TN3270 Service

System Requirements


Administration Guide

Security with Windows NT, SNA Server, and Other SNA Systems


Administration Guide

Configuring Session Security for Remote LUs


Administration Guide

Initiating Actions with Menu Commands


LUA Programmer's Guide

SNA Considerations


Administration Guide

Advanced SDLC Configuration

Installation Guide

Configuring an X.25 Link Service


Administration Guide

Selecting Items


LUA Programmer's Guide

MS-DOS System Considerations


CPI-C Programmer's Guide

Conversation States


APPC Programmer's Guide

APPC Verbs

[MC_]SEND_CONVERSATION


APPC Programmer's Guide

APPC Verbs

[MC_]SEND_DATA


CPI-C Programmer's Guide

Send_Data (cmsend)


APPC Programmer's Guide

APPC Verbs

[MC_]SEND_ERROR


CPI-C Programmer's Guide

Send_Error (cmserr)


CPI-C Programmer's Guide

Sending Data


CPI-C Programmer's Guide

Conversation States


APPC Programmer's Guide

APPC Send and Receive TPs


Reference

SNA Sense Codes

Request Reject (Category X'08')

Request Errors (Category X'10')

State Errors (Category X'20')

RH Usage Errors (Category X'40')

Path Errors (Category X'80')

LUSTAT Sense Codes

Sense Data Specific to LU Type 6.2

Sense Codes


Administration Guide

Configuring Server Broadcasts


Administration Guide

Configuring Servers


Planning Guide

Communication Between SNA Servers


Planning Guide

Network Protocol Choices for SNA Servers


Planning Guide

Network Protocol Choices for SNA Servers


Administration Guide

Server Information Form


Administration Guide

Server Resources Planning Form


Administration Guide

Modifying the Display for the Servers and Connections Window

Planning Guide

Status Information in SNA Server Admin

TN3270 Service

SNA Server and Host Configuration

Server and Connection User  Fields


Planning Guide

Deciding About Domain Controllers (Logon Servers)


Administration Guide

Specifying Adapter Properties in an Offline Configuration


Planning Guide

Deciding About Domain Controllers (Logon Servers)


Administration Guide

Assigning a Local APPC LU to a Server


Administration Guide

Configuration Files on Primary and Backup SNA Servers

Installation Guide

SNA Server Components

Selecting the Server Role

Planning Guide

Deciding About Primary, Backup, and Member SNA Servers


Administration Guide

SNA Server Adapter and Connection Capacities


Installation Guide

Changing the Server Role


Planning Guide

Communication Between SNA Servers


Planning Guide

Communication Between Clients and SNA Servers


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Managing Microsoft SNA Server

SNA Server Components


Administration Guide

Putting Configuration Changes into Effect

Configuring Servers

CPI-C Programmer's Guide

Invoking TPs and the SNA Server Configuration

Managing Microsoft SNA Server

The Configuration Process


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Planning Guide

Interpreting Events or Errors on SNA Servers or Clients

Event 23 on an SNA Server

Event 182 on an SNA Server

Event 230 on an SNA Server

Event 2001 on an SNA Server


Planning Guide

Variables that Affect Hardware Requirements


Installation Guide

Selecting the Server Role

Configuring a DLC 802.2 Link Service

Installing SNA Servers in an IP Routed Network


Installation Guide

Preparing an SNA Server to Support Macintosh Clients


Planning Guide

Options for Maximizing Communications Throughput


Installation Guide

Selecting the Server Role

Planning Guide

Deciding About Primary, Backup, and Member SNA Servers


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on a Client


Planning Guide

Choosing and Setting Up Network Protocols on SNA Servers

Network Protocol Choices for SNA Servers

Finding Additional Information About Client-Server Protocols

Important SNA Server Setup Options


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server


Planning Guide

Variables that Affect Hardware Requirements


Administration Guide

Local and Remote Configuration Parameters


Planning Guide

Evaluating Demand and Performance on an SNA Server


Planning Guide

Centralized and Branch Configurations


Administration Guide

Configuration Files on Primary and Backup SNA Servers

Installation Guide

SNA Server Components

Selecting the Server Role

Planning Guide

Deciding About Primary, Backup, and Member SNA Servers


Planning Guide

Deciding About Domains and Server Roles


Planning Guide

Server Settings for 5250 with Hot Backup Across Servers

AS/400 and SNA Server Settings (for Servers and Connections)


Planning Guide

Server Settings for 5250 (Multiple LU Example)

AS/400 and SNA Server Settings (for Server and Connection)


Planning Guide

Overview of Connections


Administration Guide

Starting and Stopping Servers and Connections


Administration Guide

Using Diagnostic Tools

Using Diagnostic Tools

Viewing the Status of Servers, Connections, and LUs


Administration Guide

Starting and Stopping Servers and Connections


Planning Guide

User Rights to Access a Server from the Network


Planning Guide

Deciding About Domains and Server Roles


Installation Guide

Configuring a DLC 802.2 Link Service


TN3270 Service

TN3270 Service Object


Administration Guide

Initiating Actions with Menu Commands


APPC Programmer's Guide

Invoking TPs

CPI-C Programmer's Guide

Invoking TPs


Reference

Command Request Support


TN3270 Service

TN3270 Session Object


3270/5250 Applet User's Guide

The Startup Section


Reference

Session Support

Command Request Support


APPC Programmer's Guide

Invoking TPs

CPI-C Programmer's Guide

Invokable TPs


LUA Programmer's Guide

Multiple Processes and Multiple Sessions


LUA Programmer's Guide

RUI and SLI Sessions


3270/5250 Applet User's Guide

Session Settings for the 3270 Applet

The Session Section

The Startup Section


LUA Programmer's Guide

Windows Environment Considerations

OS/2 Considerations


LUA Programmer's Guide

RUI and SLI Sessions


TN3270 Service

Administering TN3270 Service

Viewing TN3270 Service Session Status

Troubleshooting

TN3270 Protocol Overview

Session Initiation


Reference

Session Support


CPI-C Programmer's Guide

Set_Conversation_Security_Password (cmscsp)


CPI-C Programmer's Guide

Set_Conversation_Security_Type (cmscst)


CPI-C Programmer's Guide

Set_Conversation_Security_User_ID (cmscsu)


CPI-C Programmer's Guide

Set_Conversation_Type (cmsct)


CPI-C Programmer's Guide

Set_CPIC_Side_Information (xcmssi)


CPI-C Programmer's Guide

Set_Deallocate_Type (cmsdt)


CPI-C Programmer's Guide

Set_Error_Direction (cmsed)


CPI-C Programmer's Guide

Set_Fill (cmsf)


CPI-C Programmer's Guide

Set_Log_Data (cmsld)


CPI-C Programmer's Guide

Set_Mode_Name (cmsmn)


CPI-C Programmer's Guide

Set_Partner_LU_Name (cmspln)


CPI-C Programmer's Guide

Set_Prepare_To_Receive_Type (cmsptr)


CPI-C Programmer's Guide

Before Using Windows CPIC

Set_Processing_Mode (cmspm)


CPI-C Programmer's Guide

Set_Receive_Type (cmsrt)


CPI-C Programmer's Guide

Set_Return_Control (cmsrc)


CPI-C Programmer's Guide

Set_Send_Type (cmsst)


CPI-C Programmer's Guide

Set_Sync_Level (cmssl)


Planning Guide

Settings to Check on 802.2 Connections

Connections for 3270 with Hot Backup Across Connections

Connection for 5250 (Multiple LU Example)

Downstream Connections: Token Ring


Planning Guide

Settings to Check on Channel, DFT, and Twinax Connections


Planning Guide

Settings to Check on Channel, DFT, and Twinax Connections


Planning Guide

Settings to Check on All Connections


Planning Guide

Establishing a Connection Successfully


Planning Guide

Settings to Check on SDLC Connections

Connections for 3270 with Hot Backup Across Servers

Connections for 3270 with Hot Backup Across Connections

Connections for 5250 with Hot Backup Across Servers

Host Connection: SDLC


Planning Guide

Settings to Check on Channel, DFT, and Twinax Connections


Planning Guide

Settings to Check on X.25 Connections


Planning Guide

Host Settings Corresponding to Example


Planning Guide

AS/400 and SNA Server Settings (for Servers and Connections)


Planning Guide

Host Connection: SDLC


Planning Guide

Overview of Connections


Planning Guide

Server Settings for 5250 with Hot Backup Across Servers

AS/400 and SNA Server Settings (for Servers and Connections)


Planning Guide

Server Settings for 5250 (Multiple LU Example)

AS/400 and SNA Server Settings (for Server and Connection)


Planning Guide

Overview of Connections


CPI-C Programmer's Guide

Set_TP_Name (cmstpn)


Managing Microsoft SNA Server

Overview

What You Will Learn


Installation Guide

Using SNA Server Setup


Installation Guide

Components Installed by Setup


Installation Guide

Modifying or Removing SNA Servers


Reference

Directory Tree Created by Setup


Installation Guide

Completing Setup


Installation Guide

Using SNA Server Setup


Installation Guide

Using SNA Server Setup


Installation Guide

Completing Setup


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on a Client


Planning Guide

Choosing and Setting Up Network Protocols on SNA Servers

Finding Additional Information About Client-Server Protocols

Important SNA Server Setup Options


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server


Installation Guide

Using Dialog Boxes


Reference

Registry Keys Created by Setup


Installation Guide

Using SNA Server Setup


Installation Guide

Modifying or Removing SNA Servers


Installation Guide

Installing a Link Service


Reference

Shares Created by Setup


Installation Guide

Starting the SNA Server Setup Program


Managing Microsoft SNA Server

Installation Overview

The Setup Program


TN3270 Service

Overview of TN3270 Service Installation

Installing TN3270 Service


Installation Guide

Modifying or Removing SNA Servers


APPC Programmer's Guide

OS/2 Considerations


Installation Guide

Selecting the Server Role


Reference

Shares Created by Setup


Planning Guide

Memory Problems on Client Systems


Planning Guide

Event 2001 on an SNA Server


CPI-C Programmer's Guide

Administering Side Information

Side Information

Configuration


APPC Programmer's Guide

Windows Considerations

MS-DOS Considerations

OS/2 Considerations

Multithreaded Send and Receive TPs

CPI-C Programmer's Guide

Windows NT Considerations

Windows Considerations

OS/2 Considerations


Administration Guide

Single-System APPC


LUA Programmer's Guide

RUI/SLI Definition


LUA Programmer's Guide

SLI_BID


LUA Programmer's Guide

SLI_BIND_ROUTINE


LUA Programmer's Guide

SLI_CLOSE


LUA Programmer's Guide

SLI_OPEN


LUA Programmer's Guide

SLI_PURGE


LUA Programmer's Guide

SLI_RECEIVE


LUA Programmer's Guide

SLI_SEND


LUA Programmer's Guide

SLI_STSN_ROUTINE


Managing Microsoft SNA Server

Overview


LUA Programmer's Guide

OS/2 Considerations


TN3270 Service

Overview of TN3270 Service

Viewing SNA Resource Information


Planning Guide

SNA Server: Network Overview


TN3270 Service

TN3270 SNA Resource Object


Planning Guide

3270 Users Connecting to a Mainframe


Planning Guide

5250 Users Connecting to an AS/400


Managing Microsoft SNA Server

Microsoft SNA Server Overview

What You Will Learn

The Microsoft SNA Server


Administration Guide

Using SNA Server Additions


Administration Guide

SNA Architecture


APPC Programmer's Guide

Sample APPC TPs in the SDK

CPI-C Programmer's Guide

Sample CPI-C TPs in the SDK

Installation Guide

Contents of the CD


Administration Guide

Comm Server 1.x and SNA Server Compatibility


Reference

Command Request Support


Administration Guide

Enabling Communication Between Version 2.0 SNA Servers and Version 2.1 SNA Servers


Managing Microsoft SNA Server

SNA Server Components


Managing Microsoft SNA Server

Overview

What You Will Learn


Installation Guide

Overview of SNA Server


Planning Guide

Introduction to SNA Server


Reference

Error Messages


Planning Guide

SNA Server: Network Overview


Managing Microsoft SNA Server

SNA Model #1: Hierarchical SNA


Managing Microsoft SNA Server

SNA Model #2: Peer-Oriented SNA


Managing Microsoft SNA Server

Overview

What You Will Learn

Installation Overview


Reference

Details of the Installation Process


Managing Microsoft SNA Server

What You Will Learn


Installation Guide

New Features with This Release


Reference

Option Set Support


Installation Guide

Overview

Overview of SNA Server

Managing Microsoft SNA Server

Microsoft SNA Server Overview

What You Will Learn

The Microsoft SNA Server


Reference

Transmission Service and Function Management Profiles

FM Profile 0


Reference

Transmission Service and Function Management Profiles


Reference

Registry and Environment Variables for SNA Server


Reference

SNA Sense Codes

Sense Codes


Reference

LU Support


Managing Microsoft SNA Server

Overview


Reference

Details of the Installation Process


Managing Microsoft SNA Server

Overview


Managing Microsoft SNA Server

Management of the SNA Server


TN3270 Service

Overview of TN3270 Service


Planning Guide

Network Protocol Choices for SNA Servers


Installation Guide

Using SNA Server Setup

Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

The SNA Server Admin Display


Administration Guide

The SNA Server Admin Display


Administration Guide

Modifying the SNA Server Admin Display


Administration Guide

Initiating Actions


Administration Guide

Initiating Actions with Keys or Toolbar Buttons


Administration Guide

Carrying Out Actions by Dragging with the Mouse


Administration Guide

Initiating Actions with Keys or Toolbar Buttons


Administration Guide

Getting Started


Administration Guide

Getting Started


Administration Guide

Initiating Actions with Menu Commands


Planning Guide

Network Protocol Choices for SNA Servers


Administration Guide

Starting the Offline Version of SNA Server Admin


Planning Guide

Status Information in SNA Server Admin


Administration Guide

Resources to Consider When Establishing Security


Administration Guide

Selecting Items


Planning Guide

Communication Between SNA Servers


Administration Guide

Getting Started


TN3270 Service

Pre-Installation Considerations

Server and Connection User  Fields


Administration Guide

The SNA Server Admin Display


Administration Guide

Using SNA Server Admin After Upgrading


Administration Guide

Working with Windows and Icons


Installation Guide

Installing an MS-DOS – Based Client


Installation Guide

Installing an MS-DOS – Based Client


Installation Guide

Installing an MS-DOS – Based Client


Installation Guide

Installing an MS-DOS – Based Client


Installation Guide

Installing an MS-DOS – Based Client


Installation Guide

Installing an MS-DOS – Based Client


Installation Guide

Installing an MS-DOS – Based Client


Installation Guide

Installing an MS-DOS – Based Client


Installation Guide

Installing an MS-DOS – Based Client


Installation Guide

Installing an MS-DOS – Based Client


Planning Guide

Software and Configurations on AS/400 Clients


Installation Guide

Installing an MS-DOS – Based Client


Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

Specifying Adapter Properties in an Offline Configuration


Planning Guide

Deciding About Domain Controllers (Logon Servers)


Administration Guide

Assigning a Local APPC LU to a Server


Administration Guide

Configuration Files on Primary and Backup SNA Servers

Installation Guide

SNA Server Components

Selecting the Server Role

Planning Guide

Deciding About Primary, Backup, and Member SNA Servers


Administration Guide

SNA Server Adapter and Connection Capacities


Installation Guide

Changing the Server Role


Planning Guide

Communication Between SNA Servers


Planning Guide

Communication Between Clients and SNA Servers


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Managing Microsoft SNA Server

SNA Server Components


Administration Guide

Putting Configuration Changes into Effect

CPI-C Programmer's Guide

Clients Running MS-DOS

Managing Microsoft SNA Server

The Configuration Process


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Planning Guide

Interpreting Events or Errors on SNA Servers or Clients


Planning Guide

Variables that Affect Hardware Requirements


Installation Guide

Selecting the Server Role

Configuring a DLC 802.2 Link Service

Installing SNA Servers in an IP Routed Network


Installation Guide

Preparing an SNA Server to Support Macintosh Clients


Planning Guide

Options for Maximizing Communications Throughput


Installation Guide

Selecting the Server Role

Planning Guide

Deciding About Primary, Backup, and Member SNA Servers


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server


Planning Guide

Choosing and Setting Up Network Protocols on SNA Servers

Finding Additional Information About Client-Server Protocols

Important SNA Server Setup Options


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server


Planning Guide

Variables that Affect Hardware Requirements


Administration Guide

Local and Remote Configuration Parameters


Planning Guide

Evaluating Demand and Performance on an SNA Server


Planning Guide

Centralized and Branch Configurations


Administration Guide

Configuration Files on Primary and Backup SNA Servers

Installation Guide

SNA Server Components

Selecting the Server Role

Planning Guide

Deciding About Primary, Backup, and Member SNA Servers


Planning Guide

Deciding About Domains and Server Roles


Planning Guide

Server Settings for 5250 with Hot Backup Across Servers

AS/400 and SNA Server Settings (for Servers and Connections)


Planning Guide

Server Settings for 5250 (Multiple LU Example)

AS/400 and SNA Server Settings (for Server and Connection)


Planning Guide

Overview of Connections


Administration Guide

Starting and Stopping Servers and Connections


Administration Guide

Using Diagnostic Tools

Using Diagnostic Tools

Viewing the Status of Servers, Connections, and LUs


Administration Guide

Starting and Stopping Servers and Connections


Planning Guide

Event 2001 on an SNA Server


APPC Programmer's Guide

MS-DOS Considerations

Installation Guide

SNA Server Components

Planning Guide

Communication Between SNA Servers

Memory Problems on Client Systems

Reference

SnaBase Service: Location and Name of Variables

SnaBase: Location and Names of Variables

SnaBase


Administration Guide

Avoiding Critical Errors in Commands


Administration Guide

Using a Command File

Displaying the Contents of a Configuration File


Administration Guide

Snacfg APPCLLU


Administration Guide

Snacfg APPCRLU


Administration Guide

Snacfg Connection


Administration Guide

Snacfg CPIC


Administration Guide

Snacfg Diagnostic


Administration Guide

Snacfg Link


Administration Guide

Snacfg LU


Administration Guide

Snacfg LUA


Administration Guide

Snacfg LUD


Administration Guide

Snacfg Mode


Administration Guide

Snacfg Pool


Administration Guide

Snacfg PoolA


Administration Guide

Snacfg PoolD


Administration Guide

Snacfg Server


Administration Guide

Snacfg User


Administration Guide

Getting Help with the Command-Line Interface


Administration Guide

Snacfg Connection


Administration Guide

Snacfg Connection


Administration Guide

Snacfg Connection


Administration Guide

Snacfg Connection


Administration Guide

Snacfg Connection


Planning Guide

Local LUs for 5250 (Multiple LU Example)


Planning Guide

Local LUs for 5250 (Multiple LU Example)


Planning Guide

Configuring for 5250 with LU Names Based on User Names


Administration Guide

The Command-Line Interface


Administration Guide

General Syntax for the /print Option


Administration Guide

Determining the LUs Assigned to a DFT Adapter


Installation Guide

Components Installed by Setup


Installation Guide

SNA Server Components


Installation Guide

Components Installed by Setup


Administration Guide

Resources to Consider When Establishing Security


Reference

Registry Variables Used Only on an SNA Server


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Planning Guide

5250 Clients Using Direct Windows APPC or EHNAPPC


Installation Guide

Recording Identifying Information


Planning Guide

Software and Configurations on AS/400 Clients


TN3270 Service

System Requirements


Installation Guide

Steps for Upgrading from Comm Server 1.x


APPC Programmer's Guide

Using APPC Verbs in C Programs

Sample APPC TPs in the SDK

CPI-C Programmer's Guide

Sample CPI-C TPs in the SDK


Installation Guide

Product Support Within the United States and Canada


APPC Programmer's Guide

GET_CP_CONVERT_TABLE


APPC Programmer's Guide

CONVERT


CPI-C Programmer's Guide

Specify_Local_TP_Name (cmsltp)


CPI-C Programmer's Guide

Before Using Windows CPIC


Administration Guide

Moving the Split Line


APPC Programmer's Guide

How an Invokable TP is Matched to an Invoking TP's Request


CPI-C Programmer's Guide

How an Invokable TP is Matched to an Invoking TP’s Request


Planning Guide

Error Message 546 on a Client


Installation Guide

Sponsor Connections


Planning Guide

Communication Between Clients and SNA Servers


Planning Guide

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Installation Guide

Planning SNA Server Domains


LUA Programmer's Guide

LUs and Sessions


LUA Programmer's Guide

LUs and Sessions

Reference

Session Support


TN3270 Service

Viewing TN3270 Service Session Status


Planning Guide

Settings to Check on All Connections


Reference

Session Support


APPC Programmer's Guide

OS/2 Considerations

CPI-C Programmer's Guide

OS/2 Considerations

LUA Programmer's Guide

OS/2 Considerations


Administration Guide

Starting and Stopping Servers and Connections


Managing Microsoft SNA Server

Management of the SNA Server


TN3270 Service

Starting TN3270 Service

Continuing TN3270 Service


TN3270 Service

Enabling TN3270 Service Trace Option


Installation Guide

Configuring an X.25 Link Service


3270/5250 Applet User's Guide

The Startup Section


Reference

SNA Sense Codes

State Errors (Category X'20')

Sense Codes


Reference

Link Statistics


Planning Guide

Status Information in SNA Server Admin


Administration Guide

Starting and Stopping Servers and Connections


Managing Microsoft SNA Server

Management of the SNA Server


TN3270 Service

Pausing TN3270 Service

Stopping TN3270 Service


TN3270 Service

Disabling TN3270 Service Trace Option


Planning Guide

Client Logons and the Storing of Passwords


Planning Guide

Network Protocol Choices for SNA Servers

Clients Using Banyan VINES IP


Reference

Link Alert Format and Common Subvectors


Reference

Format for Alerts Used by Applications, NVAlert, and NVRunCmd


TN3270 Service

Messages


Installation Guide

Microsoft Support Services


Administration Guide

Configuring Remote APPC LU Properties


Planning Guide

Settings to Check on X.25 Connections


Administration Guide

Advanced SDLC Configuration


Installation Guide

Configuring an X.25 Link Service


Installation Guide

Configuring an X.25 Link Service


APPC Programmer's Guide

APPC Management Verbs

APPC TP Verbs

APPC Conversation Verbs

Common Service Verbs

CPI-C Programmer's Guide

Symbolic Constants

LUA Programmer's Guide

Using LUA Verbs

Windows NT System Considerations


Administration Guide

Configuring Properties for CPI-C

CPI-C Programmer's Guide

Side Information


CPI-C Programmer's Guide

Confirmation Processing


LUA Programmer's Guide

Synchronous and Asynchronous Verb Completion


APPC Programmer's Guide

Fundamental Terms for TPs and LUs


Installation Guide

Adapter Support


Installation Guide

SNA Server Clients Running MS-DOS


Installation Guide

SNA Server Clients Running OS/2


Installation Guide

SNA Server Clients Running Windows NT


Installation Guide

SNA Server Clients Running Windows NT


Planning Guide

Basic Methods for Evaluating Hardware Requirements


TN3270 Service

System Requirements


Installation Guide

Windows-Based SNA Support


Installation Guide

System Requirements


Planning Guide

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Comprehensive Index - T
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

T1 timeout (0.1s) setting, X.25 link service

Table G

Target code page defined

Target string used with CONVERT

TCP/IP

client logon process

client-server communication

overview

ping utility

server broadcasts

Setup options

on clients

on servers

TN3270 Service use of

TechNet

Technical support services

Telnet protocol

TERM state

Terminal emulation  See 3270 emulation; 5250 emulation

Terminal models

Terminal name strings

Terminal types

Terminate-and-stay-resident programs

Terminating

applications

TN3270 Service sessions

Terms defined (glossary)

Test_Request_To_Send_Received (cmtrts)

TEST_RTS

Text telephone (TT/TDD) services

Threads

MaxThreads Registry variable

number of conversations on

Throughput, maximizing

Time limits

Time-out in basic conversation

TN clients

TN3270 protocol

TN3270 Service

Admin  See TN3270 Service Admin

components

configurations

installation

overview

pausing

removing

resuming

starting

stopping

system requirements

TN3270 Service Admin

accessing from Setup

dialog box options

installed by Setup

session status area

vs. Setup program

TN3270 Service object type

TN3270 Session object type

TN3270 SNA Resource object type

Token ring connections

See also 802.2 connections; Connections

a brief overview

described, speeds

interrupt conflicts and

link alerts  See Link alerts

link statistics

VTAM sample for

Toolbar (SNA Server Admin)

Tools, diagnostic

a brief overview

connection status

event log

Event Viewer

files created by

introduced

LU status

NetView

Performance Monitor

RTM

server status

SNA Server Admin  See SNA Server Admin

SNA Server Trace

status information

trace files

types of

TP_ENDED

TPs  See Transaction programs

TPSETUP program

TPSTART program

TP_STARTED

Trace files

See also Tracing

defined

TN3270 Service

using

Trace information

Tracing

APPC trace verbs

examples

interpreting, information needed for

on MS-DOS-based clients

differences from tracing on SNA server

disabling

enabling

trace options available

types

on OS/2-based clients

differences from tracing on SNA server

enabling and disabling tracing

set command

trace option modifications

trace options available

types

on SNA servers

enabling and disabling options

snatrace utility, starting

software components

trace options available

types

on TN3270 Service

on Windows-based clients

differences from tracing on SNA server

enabling and disabling

trace options available

types

on Windows NT-based clients

enabling and disabling options

snatrace utility, starting

software components

trace options available

types

SNA Server Trace

Transaction defined

Transaction programs

application, defined

arrangements possible

characteristics of, controlling

communication between

configuring, controlling

CPI-C design, coding

basic vs. mapped conversations

confirmation processing

conversation security

conversation states

CPI-C calls in C

LU 6.2 communication

creating

defined

illustration

invokable

APPC

CPI-C

invoking

APPC

CPI-C

local, defined

logical record, sending or receiving

LUA  See LUA

MS-DOS considerations

names

nonqueued, defined

OS/2 considerations

overview

partner

queued, defined

receiving data asynchronously

remote, defined

running, arrangements for

samples

service, defined

SNA server configuration

SnaBase and

starting

Windows considerations

Windows NT considerations

Transfer verbs

TRANSFER_MS_DATA

Transferring data, CPI-C calls for

Transferring files with 3270 Applet

Translated string defined

Transmission service profiles

TRAP 000D

Troubleshooting connections

See also Diagnostic tools; Error messages; Errors; Event logs; Events

802.2

overview

SDLC

TN3270 Service

X.25

TS profiles

TSO, accessing from Windows, Windows NT  See 3270 Applets

TSR programs

TT/TDD services

Twin axial data

Twinax connections

See also Connections

configuration

described, speed

settings

Two-way SVC setting, X.25 link service

Type A character set, conversion table

Type AE character set, conversion table

Type G conversion table


Installation Guide

Configuring an X.25 Link Service


LUA Programmer's Guide

Specifying a Filename for Table G for Code Conversion


APPC Programmer's Guide

GET_CP_CONVERT_TABLE


APPC Programmer's Guide

CONVERT


Planning Guide

Client Logons and the Storing of Passwords


Planning Guide

Network Protocol Choices for SNA Servers

Important Setup Options on an SNA Server

Clients Using TCP/IP


Installation Guide

Planning SNA Server Domains

Planning Guide

Communication Between Clients and SNA Servers

Overview of Network Protocols for Clients


Planning Guide

Clients Using TCP/IP


Planning Guide

Communication Between SNA Servers

Network Protocol Choices for SNA Servers


Planning Guide

Important Setup Options on a Client


Planning Guide

Important Setup Options on an SNA Server


TN3270 Service

Overview of TN3270 Service


Installation Guide

Product Support Within the United States and Canada


Installation Guide

Microsoft Services for People Who Are Deaf or Hard-of-Hearing


TN3270 Service

TN3270 Protocol Overview


TN3270 Service

Viewing TN3270 Service Session Status


TN3270 Service

IBM Terminal Type Support


TN3270 Service

Session Initiation


TN3270 Service

IBM Terminal Type Support


Planning Guide

AS/400 Clients Using PC Support


CPI-C Programmer's Guide

Windows NT Considerations

Windows Considerations

OS/2 Considerations


TN3270 Service

Session Initiation


Microsoft SNA Server Glossary

Microsoft SNA Server Glossary


CPI-C Programmer's Guide

Test_Request_To_Send_Received (cmtrts)


APPC Programmer's Guide

APPC Verbs

[MC_]TEST_RTS


Installation Guide

Product Support Within the United States and Canada


Reference

SnaBase: Location and Names of Variables


APPC Programmer's Guide

Multithreaded Send and Receive TPs


Planning Guide

Options for Maximizing Communications Throughput


TN3270 Service

Specifying Administrative Options


APPC Programmer's Guide

Conversation Security


TN3270 Service

Overview of TN3270 Service Installation

Server and Connection User  Fields

IBM Terminal Type Support


TN3270 Service

TN3270 Protocol Overview


TN3270 Service

Components Installed by Setup


TN3270 Service

Configuring TN3270 Service


TN3270 Service

Overview of TN3270 Service Installation

Installing TN3270 Service


TN3270 Service

Overview of TN3270 Service


TN3270 Service

Pausing TN3270 Service


TN3270 Service

Removing TN3270 Service


TN3270 Service

Continuing TN3270 Service


TN3270 Service

Starting TN3270 Service

Continuing TN3270 Service


TN3270 Service

Pausing TN3270 Service

Stopping TN3270 Service


TN3270 Service

System Requirements


TN3270 Service

Specifying the Installation Path


TN3270 Service

Viewing TN3270 Service Session Status


TN3270 Service

Components Installed by Setup


TN3270 Service

Administering TN3270 Service


TN3270 Service

Setup Versus TN3270 Service Admin


TN3270 Service

TN3270 Service Object


TN3270 Service

TN3270 Session Object


TN3270 Service

TN3270 SNA Resource Object


Managing Microsoft SNA Server

Connecting to the Network


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Installation Guide

Avoiding Interrupt or Address Conflicts Between Adapters


Reference

Format for Link Statistics


Administration Guide

Sample VTAM Parameters for a Token Ring Connection

Reference

Token Ring Definition


Administration Guide

The SNA Server Admin Display

Initiating Actions with Keys or Toolbar Buttons


Managing Microsoft SNA Server

Overview


Administration Guide

Using Diagnostic Tools

Viewing the Status of Servers, Connections, and LUs


Administration Guide

Using Diagnostic Tools

Using Event Logs


Administration Guide

Using Event Logs

Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

Collecting Traces and Other Detailed System Information


Administration Guide

Using Diagnostic Tools


Administration Guide

Using Diagnostic Tools

Viewing the Status of Servers, Connections, and LUs


Administration Guide

Using Diagnostic Tools

Configuring for NetView


Administration Guide

Performance Monitor Options for SNA Server

Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

Using Diagnostic Tools

Configuring RTM Settings

Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

Using Diagnostic Tools

Viewing the Status of Servers, Connections, and LUs


Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

Using Diagnostic Tools


Administration Guide

Using Diagnostic Tools

Collecting Traces and Other Detailed System Information


Administration Guide

Using Diagnostic Tools

Collecting Traces and Other Detailed System Information


APPC Programmer's Guide

APPC Verbs

TP_ENDED


APPC Programmer's Guide

TPSETUP

CPI-C Programmer's Guide

TPSETUP


APPC Programmer's Guide

TPSTART

CPI-C Programmer's Guide

TPSTART


APPC Programmer's Guide

APPC Verbs

TP_STARTED


Administration Guide

Trace Files


TN3270 Service

Using TN3270 Trace Option


Administration Guide

Trace Files


APPC Programmer's Guide

OS/2 Considerations


APPC Programmer's Guide

MS-DOS Considerations

OS/2 Considerations

COPY_TRACE_TO_FILE

DEFINE_TRACE


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients

Tracing on MS-DOS Based Clients

Tracing on OS/2-Based Clients


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Administration Guide

Tracing on MS-DOS Based Clients


Administration Guide

Tracing on MS-DOS Based Clients


Administration Guide

Tracing on MS-DOS Based Clients


Administration Guide

Tracing on MS-DOS Based Clients


Administration Guide

Tracing on MS-DOS Based Clients


Administration Guide

Tracing on OS/2-Based Clients


Administration Guide

Tracing on OS/2-Based Clients


Administration Guide

Tracing on OS/2-Based Clients


Administration Guide

Tracing on OS/2-Based Clients


Administration Guide

Tracing on OS/2-Based Clients


Administration Guide

Tracing on OS/2-Based Clients


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


TN3270 Service

Using TN3270 Trace Option


Administration Guide

Tracing on Clients Running Windows Version 3.x


Administration Guide

Tracing on Clients Running Windows Version 3.x


Administration Guide

Tracing on Clients Running Windows Version 3.x


Administration Guide

Tracing on Clients Running Windows Version 3.x


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Managing Microsoft SNA Server

Diagnostic Information Tools


APPC Programmer's Guide

Transaction Programs

CPI-C Programmer's Guide

Writing CPI-C Applications


APPC Programmer's Guide

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


Administration Guide

Invoking and Invokable TPs


APPC Programmer's Guide

Configuring and Controlling TPs


APPC Programmer's Guide

Communication Between TPs

CPI-C Programmer's Guide

Communication Between TPs


CPI-C Programmer's Guide

Configuring and Controlling TPs


CPI-C Programmer's Guide

Conversation Security


CPI-C Programmer's Guide

Confirmation Processing


CPI-C Programmer's Guide

Conversation Security


CPI-C Programmer's Guide

Conversation States


CPI-C Programmer's Guide

CPIC Calls in C Programs


CPI-C Programmer's Guide

CPIC and LU 6.2


APPC Programmer's Guide

Steps for Creating TPs and the Configuration to Support Them

CPI-C Programmer's Guide

CPIC Calls in C Programs


APPC Programmer's Guide

Transaction Programs


Administration Guide

Transaction Programs


Administration Guide

SNA Server Features That Simplify APPC Configuration

APPC Programmer's Guide

Fundamental Terms for TPs and LUs

Invokable TPs

Troubleshooting for Invokable TPs


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs

Invokable TPs

Troubleshooting for Invokable TPs


Administration Guide

Transaction Programs

APPC Programmer's Guide

Fundamental Terms for TPs and LUs

Using Invoking and Invokable TPs


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs

Invoking TPs


APPC Programmer's Guide

Fundamental Terms for TPs and LUs

Writing CPI-C Applications


APPC Programmer's Guide

Basic and Mapped Conversations Compared


APPC Programmer's Guide

Translating Service TP Names to ASCII for WIN.INI


CPI-C Programmer's Guide

Windows Considerations

OS/2 Considerations

Accept_Conversation (cmaccp)


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


APPC Programmer's Guide

OS/2 Considerations

CPI-C Programmer's Guide

OS/2 Considerations


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


Administration Guide

Configuring Properties for CPI-C

APPC Programmer's Guide

MS-DOS Considerations

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Side Information

Fundamental Terms for TPs and LUs


CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


APPC Programmer's Guide

Receiving Data Asynchronously


APPC Programmer's Guide

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


APPC Programmer's Guide

Possible Arrangements of TPs Within an SNA Network


APPC Programmer's Guide

Sample APPC TPs in the SDK

Building the TPs

TPSETUP

TPSTART

APPC Send and Receive TPs

Multithreaded Send and Receive TPs

CPI-C Programmer's Guide

Sample TPs Illustrating Fundamental Concepts

Sample CPI-C TPs in the SDK

Building the TPs

TPSETUP

TPSTART

APING and APINGD

Multithreaded APINGD

CPI-C Send and Receive TPs

AREXEC and AREXECD


APPC Programmer's Guide

Fundamental Terms for TPs and LUs

CPI-C Programmer's Guide

Fundamental Terms for TPs and LUs


CPI-C Programmer's Guide

Clients Running MS-DOS


Planning Guide

Communication Between SNA Servers


APPC Programmer's Guide

Invokable TPs


APPC Programmer's Guide

Windows Considerations

Translating Service TP Names to ASCII for WIN.INI

CPI-C Programmer's Guide

Windows Considerations


APPC Programmer's Guide

Windows NT Considerations

CPI-C Programmer's Guide

Windows NT Considerations


APPC Programmer's Guide

MS-DOS Considerations

OS/2 Considerations

Before Using Windows CSV

TRANSFER_MS_DATA


APPC Programmer's Guide

MS-DOS Considerations

OS/2 Considerations

Before Using Windows CSV

TRANSFER_MS_DATA


CPI-C Programmer's Guide

Starting a Conversation


3270/5250 Applet User's Guide

Defining File Transfer Settings (3270 Emulation Only)

Using the 3270 Applet for MS-DOS


APPC Programmer's Guide

GET_CP_CONVERT_TABLE


Reference

Transmission Service and Function Management Profiles


CPI-C Programmer's Guide

OS/2 Considerations


Planning Guide

Settings to Check on 802.2 Connections


Planning Guide

Establishing a Connection Successfully


Planning Guide

Settings to Check on SDLC Connections


TN3270 Service

TN3270 Protocol Overview


Planning Guide

Settings to Check on X.25 Connections


Reference

Transmission Service and Function Management Profiles


Planning Guide

AS/400 Clients Using PC Support


Installation Guide

Microsoft Services for People Who Are Deaf or Hard-of-Hearing


APPC Programmer's Guide

OS/2 Considerations


Administration Guide

Organization of Connection Information

Initial Connection Configuration


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Planning Guide

Settings to Check on Channel, DFT, and Twinax Connections


Installation Guide

Configuring an X.25 Link Service


APPC Programmer's Guide

CONVERT

GET_CP_CONVERT_TABLE


APPC Programmer's Guide

CONVERT

GET_CP_CONVERT_TABLE


APPC Programmer's Guide

MS-DOS Considerations

CONVERT


Comprehensive Index - U
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Unacknowledged Send Limit for 802.2 connections

Uninterpreted LU Name for remote APPC LUs

Upgrading

from Comm Server

from previous versions

Upstream connections

downstream LUs on, creating

downstream system

User alerts  See Alerts

User data codes

User Data for X.25 connections

User ID display

User-defined code pages

Users

3270 emulation with hot backup

across connections

across servers

5250 emulation with hot backup

access rights

adding to list used by SNA Server

assigning LU pools to

assigning LUs to  See Assigning LUs

changing order of LUs in lists seen by

copying LUs between

copying properties between

deleting LU assignments

display in SNA Server Admin, modifying

names, viewing in 5250 sessions

multiple LUs

single LU

properties

TN3270 Service  See TN clients

viewing

Users and Groups form

Users and Groups window (SNA Server Admin)

Users menu (SNA Server Admin)

Utilities

Event Viewer

MKMSGF

Performance Monitor

SNADFTLU.EXE

snatrace


Administration Guide

Advanced 802.2 Configuration


Administration Guide

Configuring Remote APPC LU Properties


Installation Guide

Upgrading to SNA Server Version 2.1


Administration Guide

Administering an Installation After Upgrading to SNA Server Version 2.1

Installation Guide

Upgrading from SNA Server Version 2.0


Planning Guide

Creating Downstream LUs on the Host Connection


Planning Guide

Host Connection: SDLC


Planning Guide

Settings to Check on X.25 Connections


Administration Guide

Advanced X.25 Configuration


TN3270 Service

Server and Connection User  Fields


APPC Programmer's Guide

OS/2 Considerations


Planning Guide

Users and Groups for 3270 with Hot Backup Across Connections


Planning Guide

Users and Groups for 3270 with Hot Backup Across Servers


Planning Guide

Users and Groups for 5250 with Hot Backup Across Servers

Users and Groups for 5250 (Multiple LU Example)


Planning Guide

User Rights to Access a Server from the Network


Administration Guide

Adding, Viewing, or Modifying Users or Groups

Assigning Default APPC LUs to Users or Groups


Administration Guide

Giving Users Access to 3270 LUs


Administration Guide

Giving Users Access to 3270 LUs


Administration Guide

Setting Up User and Group Access

Copying Properties and LUs Between Users and/or Groups


Administration Guide

Setting Up User and Group Access

Copying Properties and LUs Between Users and/or Groups


Administration Guide

Deleting LUs


Administration Guide

Modifying the Display for the Servers and Connections Window


Planning Guide

Configuring for 5250 with LU Names Based on User Names


Planning Guide

Viewing User and Computer Names of 5250 Users


Administration Guide

Adding, Viewing, or Modifying Users or Groups


Administration Guide

Adding, Viewing, or Modifying Users or Groups


Administration Guide

Users and Groups Form


Administration Guide

Modifying the Display for the LU Pools Window


Administration Guide

Initiating Actions with Menu Commands


Managing Microsoft SNA Server

Diagnostic Information Tools


APPC Programmer's Guide

LOG_MESSAGE


Managing Microsoft SNA Server

Diagnostic Information Tools


Administration Guide

Determining the LUs Assigned to a DFT Adapter


Administration Guide

Tracing on SNA Servers or Windows NT-Based Clients


Comprehensive Index - V
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Variables, environment

list

OS/2

Windows

Variables, Registry

APPC

CPIC

for TN3270 Service

keys created by Setup

list

VCBs

address parameters

command-specific structure

common structure

defined

format

introduced

segments

Verb control blocks  See VCBs

Verbs  See specific API

View menu (SNA Server Admin)

Viewing

SNA resource information

TN3270 session status

user, computer names in 5250 sessions

multiple LUs

single LU

VINES  See Banyan VINES

Virtual Circuit Type for X.25 connections

Vision impaired users, accessibility information

VM/CMS, accessing from Windows, Windows NT  See 3270 Applets

VTAM

definition samples

identifiers

parameters

settings

TN3270 Service and


Reference

APPC API


APPC Programmer's Guide

Clients Running OS/2

CPI-C Programmer's Guide

Clients Running OS/2


APPC Programmer's Guide

Clients Running Windows Version 3.x

CPI-C Programmer's Guide

Clients Running Windows Version 3.x


APPC Programmer's Guide

Clients Running Windows NT


CPI-C Programmer's Guide

Clients Running Windows NT


TN3270 Service

Setup Versus TN3270 Service Admin

Registry Value Entries


Reference

Registry Keys Created by Setup


Reference

Lists of Available Variables


APPC Programmer's Guide

APPC Definition


LUA Programmer's Guide

Command-Specific Structure of LUA VCBs


LUA Programmer's Guide

Common Structure of LUA VCBs


APPC Programmer's Guide

Verb Control Block

Verb Control Block

LUA Programmer's Guide

RUI/SLI Definition


LUA Programmer's Guide

The LUA VCB Format


LUA Programmer's Guide

Verb Control Block


APPC Programmer's Guide

OS/2 Considerations

LUA Programmer's Guide

OS/2 Considerations


Administration Guide

View Menu


TN3270 Service

Viewing SNA Resource Information


TN3270 Service

Administering TN3270 Service


Planning Guide

Configuring for 5250 with LU Names Based on User Names


Planning Guide

Viewing User and Computer Names of 5250 Users


Administration Guide

Initial Connection Configuration


Installation Guide

Products for People Who Are Blind or Have Low Vision


Reference

VTAM Sample Definitions for 3270

Token Ring Definition

SDLC Definition (for Switched and Leased Lines)

X.25 Definition

CICS and VTAM Sample Definitions for LU 6.2

CICS Tables

VTAM Definitions


Planning Guide

Settings to Check on All Connections


Administration Guide

Configuring Host Connections

Sample VTAM Parameters for Use with LU 6.2

SNA Server Adapter and Connection Capacities


Planning Guide

Overview of Connections


TN3270 Service

IBM Terminal Type Support


Comprehensive Index - W
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Wait_For_Conversation (cmwait)

WANs

Warnings, TN3270 Service

Wide area networks

WINAPPC_C.H file, finding

WinAPPCCancelAsyncRequest

WinAPPCCancelBlockingCall

WinAPPCCleanup

WinAPPCIsBlocking

WinAPPCSetBlockingHook

WinAPPCStartup

WinAPPCUnhookBlockingHook

WinAsyncAPPC

WinAsyncAPPCEx

WinAsyncCSV

WinCPICCleanup

WinCPICIsBlocking

WinCPICSetBlockingHook

WinCPICStartup

WinCPICUnhookBlockingHook

WinCSVCleanup

WINCSV.H file

WinCSVStartup

Window Size for X.25 connections

Windows

See also Windows-based clients

APPC considerations

AS/400 software

available protocols

CPI-C considerations

environment variables

LUA considerations

Microsoft Networking used by

Windows and icons, working with

Windows APPC

See also APPC

asynchronous support

before using

extensions to  See Windows extensions (APPC)

prototype

supported by SNA Server

Windows Applets  See 3270 Applets; 5250 Applet

Windows-based APIs

See also specific API

supported by SNA Server

Windows-based clients

environment variables

installation

memory buffer reduction

removing

system requirements

tracing on

Windows CPI-C

See also CPI-C

asynchronous support

enhancements for

extensions to  See Windows extensions (CPI-C)

overview

prototype

supported by SNA Server

Windows CSVs

See also CSVs

before using

defined

overview

supported by SNA Server

Windows extensions (APPC)

GetAppcConfig

GetAppcReturnCode

GetCsvReturnCode

introduced

WinAPPCCancelAsyncRequest

WinAPPCCancelBlockingCall

WinAPPCCleanup

WinAPPCIsBlocking

WinAPPCSetBlockingHook

WinAPPCStartup

WinAPPCUnhookBlockingHook

WinAsyncAPPC

WinAsyncAPPCEx

WinAsyncCSV

WinCSVCleanup

WinCSVStartup

Windows extensions (CPI-C)

data, receiving

introduced

WinCPICCleanup

WinCPICIsBlocking

WinCPICSetBlockingHook

WinCPICStartup

WinCPICUnhookBlockingHook

Windows extensions (LUA)

GetLuaReturnCode

introduced

RUI/SLI

WinRUI/WinSLI

WinRUICleanup/WinSLICleanup

WinRUIGetLastInitStatus

WinRUIStartup/WinSLIStartup

Windows for Workgroups-based clients

AS/400 software choices

available protocols

client settings

domain, password

overview

SYSTEM.INI

DDE disabling to free memory

Microsoft Networking used by

Windows LUA

See also LUA

asynchronous support

before using

extensions for

supported by SNA Server

Windows NT

See also Windows NT-based clients

APPC considerations

AS/400 software

available protocols

Control Panel, network protocol selection from

CPI-C considerations

domain controllers

domain logon

domains

Event Viewer

LUA considerations

Microsoft Networking used with

Performance Monitor

counters

defined

described

viewing explanation text

Registry variables  See Registry variables

servers

SNA and

Windows NT Applets  See 3270 Applets; 5250 Applet

Windows NT-based clients

installing

modifying options selected during Setup

Registry variables  See Registry variables

removing

system requirements for

tracing on

Windows NT Service

Windows Sockets  See TCP/IP

WIN.INI

WinRUICleanup/WinSLICleanup

WinRUIGetLastInitStatus

WinRUIStartup/WinSLIStartup

WinRUI/WinSLI

WNAP

Workgroups  See Windows for Workgroups-based clients

Writing applications  See specific API


CPI-C Programmer's Guide

Before Using Windows CPIC

Wait_For_Conversation (cmwait)


Installation Guide

Planning SNA Server Domains


TN3270 Service

Messages


Installation Guide

Planning SNA Server Domains


APPC Programmer's Guide

Verb Control Block


APPC Programmer's Guide

WinAPPCCancelAsyncRequest( )


APPC Programmer's Guide

WinAPPCCancelBlockingCall( )


APPC Programmer's Guide

WinAPPCCleanup( )


APPC Programmer's Guide

WinAPPCIsBlocking( )


APPC Programmer's Guide

WinAPPCSetBlockingHook( )


APPC Programmer's Guide

WinAPPCStartup( )


APPC Programmer's Guide

WinAPPCUnhookBlockingHook( )


APPC Programmer's Guide

WinAsyncAPPC( )


APPC Programmer's Guide

WinAsyncAPPCEx( )


APPC Programmer's Guide

Before Using Windows CSV

WinAsyncCSV( )


CPI-C Programmer's Guide

Before Using Windows CPIC

Windows Considerations

WinCPICCleanup( )


CPI-C Programmer's Guide

Before Using Windows CPIC

WinCPICIsBlocking( )


CPI-C Programmer's Guide

Windows Considerations

WinCPICSetBlockingHook( )


CPI-C Programmer's Guide

Windows Considerations

WinCPICStartup( )


CPI-C Programmer's Guide

Windows Considerations

WinCPICUnhookBlockingHook( )


APPC Programmer's Guide

Before Using Windows CSV

WinCSVCleanup( )


APPC Programmer's Guide

WINCSV.H File


APPC Programmer's Guide

Before Using Windows CSV

WinCSVStartup( )


Administration Guide

Advanced X.25 Configuration


APPC Programmer's Guide

Windows Considerations


Planning Guide

Software and Configurations on AS/400 Clients


Planning Guide

Important Setup Options on a Client


CPI-C Programmer's Guide

Windows Considerations

Clients Running Windows Version 3.x


CPI-C Programmer's Guide

Clients Running Windows Version 3.x

Reference

Environment Variables Used on Clients Running Windows Version 3.x, MS-DOS, or OS/2


LUA Programmer's Guide

Windows Environment Considerations

Extensions for the Windows Environment


Planning Guide

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Administration Guide

Working with Windows and Icons


APPC Programmer's Guide

Windows APPC Asynchronous Support


APPC Programmer's Guide

Before Using Windows APPC


APPC Programmer's Guide

WinAPPCStartup( )


Installation Guide

Windows-Based SNA Support


Installation Guide

Windows-Based SNA Support


CPI-C Programmer's Guide

Clients Running Windows Version 3.x

Reference

Environment Variables Used on Clients Running Windows Version 3.x, MS-DOS, or OS/2


Installation Guide

Installing a Client Running Windows Version 3.x

Modifying Clients

Managing Microsoft SNA Server

Installing the Client


Planning Guide

Memory Problems on Client Systems


Installation Guide

Installing a Client Running Windows Version 3.x

Removing SNA Server Clients


Installation Guide

SNA Server Clients Running Windows NT


Administration Guide

Tracing on Clients Running Windows Version 3.x


CPI-C Programmer's Guide

Windows CPI-C Asynchronous Support


CPI-C Programmer's Guide

Before Using Windows CPIC


CPI-C Programmer's Guide

Windows CPIC Overview


CPI-C Programmer's Guide

WinCPICStartup( )


Installation Guide

Windows-Based SNA Support


APPC Programmer's Guide

Before Using Windows CSV


APPC Programmer's Guide

WINCSV Definition


APPC Programmer's Guide

Windows CSV Overview


Installation Guide

Windows-Based SNA Support


APPC Programmer's Guide

SNA Server Enhancements to the Windows Environment


APPC Programmer's Guide

GetAppcReturnCode( )


APPC Programmer's Guide

GetCsvReturnCode( )


APPC Programmer's Guide

APPC Extensions for the Windows Environment

CSV Extensions for the Windows Environment


APPC Programmer's Guide

WinAPPCCancelAsyncRequest( )


APPC Programmer's Guide

WinAPPCCancelBlockingCall( )


APPC Programmer's Guide

WinAPPCCleanup( )


APPC Programmer's Guide

WinAPPCIsBlocking( )


APPC Programmer's Guide

WinAPPCSetBlockingHook( )


APPC Programmer's Guide

WinAPPCStartup( )


APPC Programmer's Guide

WinAPPCUnhookBlockingHook( )


APPC Programmer's Guide

WinAsyncAPPC( )


APPC Programmer's Guide

WinAsyncAPPCEx( )


APPC Programmer's Guide

Before Using Windows CSV

WinAsyncCSV( )


APPC Programmer's Guide

Before Using Windows CSV

WinCSVCleanup( )


APPC Programmer's Guide

Before Using Windows CSV

WinCSVStartup( )


CPI-C Programmer's Guide

Receiving Data


CPI-C Programmer's Guide

Extensions for the Windows Environment


CPI-C Programmer's Guide

WinCPICCleanup( )


CPI-C Programmer's Guide

WinCPICIsBlocking( )


CPI-C Programmer's Guide

WinCPICSetBlockingHook( )


CPI-C Programmer's Guide

WinCPICStartup( )


CPI-C Programmer's Guide

WinCPICUnhookBlockingHook( )


LUA Programmer's Guide

SNA Server Enhancements to the Windows Environment


LUA Programmer's Guide

Extensions for the Windows Environment


LUA Programmer's Guide

RUI( ) / SLI( )


LUA Programmer's Guide

WinRUI( ) / WinSLI( )


LUA Programmer's Guide

WinRUICleanup( ) / WinSLICleanup( )


LUA Programmer's Guide

WinRUIGetLastInitStatus( )


LUA Programmer's Guide

WinRUIStartup( ) / WinSLIStartup( )


Planning Guide

Software and Configurations on AS/400 Clients


Planning Guide

Important Setup Options on a Client


Planning Guide

Domain and Password Settings for Clients Running Windows for Workgroups


Planning Guide

Adjusting Clients Running Windows for Workgroups


Planning Guide

SYSTEM.INI Setting for Clients Running Windows for Workgroups


Planning Guide

Memory Problems on Client Systems


Planning Guide

Clients Using Microsoft Networking (Named Pipes)


LUA Programmer's Guide

Windows LUA Asynchronous Support


LUA Programmer's Guide

Before Using Windows LUA


LUA Programmer's Guide

SNA Server Enhancements to the Windows Environment


Installation Guide

Windows-Based SNA Support


APPC Programmer's Guide

Windows NT Considerations


Planning Guide

Software and Configurations on AS/400 Clients


Planning Guide

Important Setup Options on a Client


Planning Guide

Network Protocol Choices for SNA Servers


CPI-C Programmer's Guide

Windows NT Considerations

Clients Running Windows NT


Planning Guide

Deciding About Domain Controllers (Logon Servers)


Planning Guide

Domain and Password Settings for Clients Running Windows for Workgroups


Planning Guide

Deciding Whether to Create a Separate Domain


Administration Guide

Using Event Logs

Managing Microsoft SNA Server

Diagnostic Information Tools


LUA Programmer's Guide

Windows NT System Considerations


Planning Guide

Clients Using Microsoft Networking (Named Pipes)


Administration Guide

Performance Monitor Options for SNA Server

Planning Guide

Performance Monitor


Administration Guide

Performance Monitor Options for SNA Server


Managing Microsoft SNA Server

Diagnostic Information Tools

Planning Guide

Performance Monitor


Planning Guide

Performance Monitor


Installation Guide

Overview of SNA Server Installation

Planning Guide

Deciding About Domains and Server Roles


Managing Microsoft SNA Server

IBM Systems Network Architecture


Installation Guide

Installing a Windows NT-Based Client

Managing Microsoft SNA Server

Installing the Client


Installation Guide

Modifying Clients


Installation Guide

Removing SNA Server Clients


Installation Guide

SNA Server Clients Running Windows NT


Administration Guide

Trace Files


TN3270 Service

Components Installed by Setup


CPI-C Programmer's Guide

Clients Running Windows Version 3.x

Reference

Environment Variables Used on Clients Running Windows Version 3.x, MS-DOS, or OS/2


LUA Programmer's Guide

WinRUICleanup( ) / WinSLICleanup( )


LUA Programmer's Guide

WinRUIGetLastInitStatus( )


LUA Programmer's Guide

WinRUIStartup( ) / WinSLIStartup( )


LUA Programmer's Guide

WinRUI( ) / WinSLI( )


Planning Guide

Communication Between SNA Servers

Memory Problems on Client Systems


Comprehensive Index - X
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

X.25 API verbs, OS/2 support of

X.25 communications

line

link service, configuring

X.25 connections

See also Connections

a brief overview

capacity

creating new

described, speed

facility data strings

NCP and SNA Server parameters

settings

troubleshooting

VTAM

xcecst  See Extract_Conversation_Security_Type (xcecst)

xchwnd  See Specify_Windows_Handle (xchwnd)

xcmdsi  See Delete_CPIC_Side_Information (xcmdsi)

xcmesi  See Extract_CPIC_Side_Information (xcmesi)

xcmssi  See Set_CPIC_Side_Information (xcmssi)

XID Retries for 802.2 connections

XID Type for connections

XIDs


APPC Programmer's Guide

OS/2 Considerations


Installation Guide

Configuring an X.25 Link Service


Installation Guide

Configuring an X.25 Link Service


Managing Microsoft SNA Server

Basic X.25 Settings


Administration Guide

SNA Server Adapter and Connection Capacities


Administration Guide

Initial Connection Configuration


Planning Guide

Communication Between SNA Servers and Host Computers: Connections


Administration Guide

Advanced X.25 Configuration


Administration Guide

Configuring Host Connections


Administration Guide

Initial Connection Configuration

Basic X.25 Configuration

X.25 Settings Form

Installation Guide

Overview of SNA Server

Managing Microsoft SNA Server

Basic X.25 Settings

Planning Guide

Settings to Check on X.25 Connections


Planning Guide

Settings to Check on X.25 Connections


Administration Guide

Configuring Host Connections

Sample VTAM Parameters for an X.25 Connection

Reference

X.25 Definition


Administration Guide

Advanced 802.2 Configuration


Administration Guide

Advanced SDLC Configuration

Advanced X.25 Configuration

Advanced Channel Configuration


Administration Guide

Local and Remote Configuration Parameters

Configuring Servers

Planning Guide

Settings to Check on All Connections


Comprehensive Index - Y
Microsoft SNA Server Comprehensive Index

Numbers A B C D E F G H I K L M N O P Q R S T U V W X Y

Yielding to other components


APPC Programmer's Guide

Windows NT Considerations

Windows Considerations

CPI-C Programmer's Guide

Windows NT Considerations