Contents
DFT Link Service (DCA)

Configuring a DFT Link Service

Specifying the Adapter Base Address

Changing the Link Service Title


Configuring a DFT Link Service

IRMA WorkStation provides a default title and one default base address for the service; however, you can change these defaults.  You need to supply the address for the IRMA 3 adapter(s) you will be using with the DFT driver.  The DFT driver supports up to four adapters.  The address must range from hexadecimal 0x1000 through 0xFF000, and is specified in multiples of hexadecimal 0x1000.

To configure a DFT link service:

1	To change the default title, choose Change.  The Link Service Title dialog box is displayed.

2	In the Title box, delete the default, type the new title for the link service, and then choose OK.

3	To change the value of the base address, choose Configure.  The Adapter Base Address dialog box is displayed.

4	In the Base Address box, delete the default, type the new base address, and then choose Continue.

5	For additional adapters, choose Add New.  The Adapter Base Address dialog box is displayed.

6	In the Adapter Base Address dialog box, type the new base address, and then choose Continue.  Repeat this step for any other adapters you are using.  You can use up to four adapters with this service.

7	Choose Continue.  Setup copies the required files and the Link Service Configuration dialog box appears listing the entry for this link service.


Specifying the Adapter Base Address

Use the Adapter Base Address dialog box to change the default value of the base address or to enter a base address for an additional adapter card.

To specify an adapter base address:

1	In the Base Address box of the Adapter Base Address dialog box, delete the default if there is one, and type the new base address.

2	Choose Continue.


Changing the Link Service Title

You can change the default title for the DFT link service.

To change the default title:

1	In the Title box of the Link Service Title dialog box, delete the default, and type the new title for the link service.

2	Choose OK.