SNA Remote Access Service Setup

Type the number of logical ports to be made available to SNA Remote Access Service.

You must define an SNA Remote Access Service port for each simultaneous dial-in connection the SNA Remote Access Service server will support. You must also define an additional port if the SNA Server will initiate a connection to a remote SNA Remote Access Service server as a RAS client. For example, a server that will support five incoming client connections and will be used to connect to a remote server through SNA Remote Access Service requires six ports for use by SNA Remote Access Service.