;
;  Definitions of SNA Server performance counter string constants,
;  to be included by SNAPERF.INI.  These are for the SnaServr
;  component only -- link services (and other components that add
;  counters) have their own .DEF and .INI files.
;

#define SNA_0010    0
#define SNA_0020    2
#define SNA_0030    4
#define SNA_0040    6
#define SNA_0050    8
#define SNA_0060   10
#define SNA_0070   12
#define SNA_0080   14
#define SNA_0090   16
#define SNA_0100   18
#define SNA_0110   20
#define SNA_0120   22
#define SNA_0130   24
#define SNA_0140   26
#define SNA_0150   28
#define SNA_0160   30
#define SNA_0170   32
